Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Visão geral do uso de memória

Verificar uso de memória

Verificar o uso da memória no IOSd

Verificar o uso da memória no IOS XE

Verifique o uso da memória no QFP

Informações Relacionadas

Introduction

Este documento fornece informações sobre como manter e verificar o tamanho da memória do sistema nos Cisco ASR 1000 Series Aggregation Services Routers (ASR). Este documento aplica-se a todas as versões do Cisco IOS XE Software que suportam os Cisco ASR 1000 Series Aggregation Services Routers.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Todos os roteadores de serviços de agregação Cisco ASR 1000 Series, que incluem roteadores 1002, 1004 e 1006.

- Todas as versões do software Cisco IOS XE que suportam os Cisco ASR 1000 Series Aggregation Services Routers.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Visão geral do uso de memória

O processador de rotas (RP) do Cisco ASR 1000 Series Aggregation Services Router tem RAM dinâmica síncrona (SDRAM), que fornece armazenamento para código, dados e pacotes. O RP oferece escalabilidade de memória de até 4 GB para ASR1000-RP1 e 16 GB para ASR1000-RP2.

Os Cisco ASR 1000 Series Aggregation Services Routers apresentam o software Cisco IOS XE como sua arquitetura de software. Baseado no software Cisco IOS, o software Cisco IOS XE é um sistema operacional modular construído em um kernel Linux no processador de rotas. O daemon IOS (IOSd) é executado como um processo padrão no nível do usuário no Linux e fornece o conjunto de recursos do Cisco IOS, que inclui protocolos de roteamento. Na inicialização, o IOSd recebe acesso a uma quantidade fixa de memória física no RP, geralmente 50% ou 1 GB em sistemas de 2 GB e 2 GB em sistemas de 4 GB. A operação dupla do IOS com chassi de 2/4 RU com 4 GB de memória principal para redundância de software consome 1 GB cada.

Para exibir informações sobre o tamanho da memória, software, hardware e versão da interface da Web, use o comando show version.

Router#show version

Cisco IOS Software, IOS-XE Software (PPC_LINUX_IOSD-ADVIPSERVICESK9-M),

Version 12.2(33)XNB, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Fri 05-Sep-08 08:56 by mcpre

Cisco IOS-XE software, Copyright (c) 1986-2008 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

ASR1006b uptime is 6 days, 21 hours, 49 minutes

Uptime for this control processor is 6 days, 21 hours, 51 minutes

System returned to ROM by reload at 15:35:57 JST Thu Feb 5 2009

System restarted at 15:40:15 JST Thu Feb 5 2009

System image file is "bootflash:packages.conf"

Last reload reason: Reload command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco ASR1006 (RP1) processor with 1779130K/6147K bytes of memory.

!--- total memory allocated to IOSd.

16 Gigabit Ethernet interfaces

21 Gigabit Ethernet interfaces

2 Ten Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

4194304K bytes of physical memory.

!--- IOS-XE total memory size.

955063K bytes of eUSB flash at bootflash:.

39004543K bytes of SATA hard disk at harddisk:.

Configuration register is 0x2102

Verificar uso de memória

Verificar o uso da memória no IOSd

O comando show processes exibe informações sobre os processos ativos. Emita show processes memory para mostrar a quantidade de memória usada no IOSd.

Router#show processes memory

Processor Pool Total: 1821391588 Used:  218319000 Free: 1603072588

lsmpi_io Pool Total:    6295088 Used:    6294116 Free:        972

PID TTY  Allocated      Freed    Holding    Getbufs    Retbufs Process

0   0  174405308    8586260  134742552        811     137870 *Init*

0   0      65688     393404        152          0          0 *Sched*

0   0   21603272   48285960     274932          3          1 *Dead*

0   0          0          0     406304          0          0 *MallocLite*

1   0     431576          0     448716          0          0 Chunk Manager

2   0        236        236      11140          0          0 Load Meter

3   0    2785880    2782996      32092          0          0 Exec

4   0          0          0      17140          0          0 Retransmission o

5   0      34360          0      17140          0          0 IPC ISSU Dispatc

6   0       3336        236      20240          0          0 Check heaps

7   0      32780      32780      17140         45          0 Pool Manager

8   0        236        236      17140          0          0 Timers

9   0  206550924  206496084      71980    9326586    9326586 ARP Input

10   0      24356      24356      17140        111        111 ARP Background

11   0        236        236      17140          0          0 ATM Idle Timer

12   0          0          0      17140          0          0 ATM ASYNC PROC

13   0          0          0      17140          0          0 AAA_SERVER_DEADT

14   0          0          0      29140          0          0 Policy Manager

15   0      59092        692      74972        172        172 Entity MIB API

Verificar o uso da memória no IOS XE

Para ver o uso atual da memória do sistema no Cisco IOS XE, use o comando show platform software status control-processor brief.

Router#show platform software status control-processor brief

Load Average

Slot  Status  1-Min  5-Min 15-Min

RP0 Healthy   0.20   0.23   0.19

RP1 Healthy   0.19   0.19   0.12

ESP0 Healthy   0.65   0.54   0.47

SIP1 Healthy   0.17   0.07   0.01

SIP2 Healthy   0.02   0.06   0.01

Memory (kB)

Slot  Status    Total     Used (Pct)     Free (Pct) Committed (Pct)

RP0 Healthy  3919872  2710788 (65%)  1209084 (29%)   2327484 (56%)

RP1 Healthy  3919872  2377136 (57%)  1542736 (37%)   2320964 (56%)

ESP0 Healthy  2030444  1112344 (53%)   918100 (43%)   3409068 (162%)

SIP1 Healthy   484452   293408 (55%)   191044 (36%)    244180 (46%)

SIP2 Healthy   484452   293408 (55%)   191044 (36%)    244020 (46%)

CPU Utilization

Slot  CPU   User System   Nice   Idle    IRQ   SIRQ Iowait

RP0    0  10.91   1.88   0.00  86.67   0.38   0.13   0.00

RP1    0   8.06   1.22   0.00  90.11   0.00   0.03   0.55

ESP0    0   5.78   3.61   0.00  90.51   0.02   0.05   0.00

SIP1    0   4.32   0.45   0.00  95.20   0.00   0.01   0.00

SIP2    0   3.95   0.44   0.00  95.57   0.00   0.01   0.00

Para exibir o uso de memória para cada processo executado no Cisco IOS XE, use o processo do software da plataforma de monitor {fp|rp} {ative|standby}. Depois que a tela for exibida, você poderá digitar "shift + M" para classificar os processos exibidos com o uso de memória.

RES indica a memória física não trocada que um processo usa e SHR indica a quantidade de memória compartilhada usada por um processo. RES + SHR é a quantidade total de um processo, e %MEM indica o compartilhamento atualmente usado de memória física disponível para os processos.

Router#monitor platform software process rp active

top - 05:18:46 up 14 days, 17:33,  0 users,  load average: 0.00, 0.01, 0.00

Tasks: 119 total,   1 running, 118 sleeping,   0 stopped,   0 zombie

Cpu(s):  0.4% us,  0.4% sy,  0.0% ni, 99.1% id,  0.0% wa,  0.0% hi,  0.0% si

Mem:   3714760k total,  1454344k used,  2260416k free,    97952k buffers

Swap:        0k total,        0k used,        0k free,   875376k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

17385 root      20   0 1874m 338m  75m S  0.2  9.3  65:59.18 ppc_linux_iosd-

18098 root      20   0 71880  59m 6324 S  0.2  1.6  10:48.84 smand

16521 root      20   0 87868  51m  47m S  0.0  1.4   0:02.80 fman_rp

16903 root      20   0 27788  16m  14m S  0.0  0.5  15:41.61 imand

15957 root      20   0 24776 9696 6880 S  0.2  0.3  12:49.67 cmand

17697 root      20   0 19504 6160 4544 S  0.0  0.2   0:00.95 psd

16316 root      20   0 18232 5972 3736 S  0.0  0.2  12:43.32 emd

16732 root      20   0 16184 5556 3900 S  0.4  0.1  21:22.61 hman

17237 root      20   0 15892 5456 3088 S  0.0  0.1   0:00.99 plogd

15166 root      20   0  4056 2396 1248 S  0.0  0.1   0:00.72 pvp.sh

16937 root       9 -11  3992 2308 1232 S  0.0  0.1   0:00.13 pman.sh

15559 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

17978 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

Caso esta mensagem seja exibida quando você emitir o comando monitor platform software process no console, você precisará definir um tipo de terminal com o comando terminal terminal-type para se adequar a um, como VT100.

Router#monitor  platform software process rp active

Terminal type 'network' unsupported for command

Change the terminal type with the 'terminal terminal-type' command.

Router#terminal terminal-type VT100

Verifique o uso da memória no QFP

Para exibir informações sobre o uso de memória do QFP, use o comando show platform hardware qfp ative infrastructure exmem statistics. O Exmem contém memória IRAM, DRAM, SRAM e BQS relacionada.

Router#show platform hardware qfp active infrastructure exmem statistics

QFP exmem statistics

Type: Name: IRAM, CPP: 0

Total: 134217728

InUse: 5372928

Free: 127926272

Free protected: 918528

Free unprotected: 0

Lowest free water mark: 128844800

Largest free block: 99505152

Type: Name: DRAM, CPP: 0

Total: 402653184

InUse: 124705792

Free: 275775488

Free protected: 1041408

Free unprotected: 1130496

Lowest free water mark: 275587072

Largest free block: 273415168

Para exibir o uso de memória de cada usuário, adicione opções de usuário, como mostrado.

Router#show platform hardware qfp active infrastructure exmem statistics user

Type: Name: IRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

1            115200       115712       CPP_FIA

Type: Name: DRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

4            1248         4096         P/I

22           11567884     11585536     SBC

9            270600       276480       CEF

1            1138256      1138688      QM RM

3            528          3072         CFM

4            262144       262144       Qm 16

34           8405116      8436736      ING_EGR_UIDB

1            655360       655360       ING EGR INPUT CHUNK_Config_0

Para exibir o uso de TCAM do QFP, use o comando show platform hardware qfp ative tcam resource-manager usage.

Router#show platform hardware qfp active tcam resource-manager usage

QFP TCAM Usage Information

80 Bit Region Information

--------------------------

Name                                : Leaf Region #0

Number of cells per entry           : 1

Current 80 bit entries used         : 0

Current used cell entries           : 0

Current free cell entries           : 0

:

:

Total TCAM Cell Usage Information

----------------------------------

Name                                : TCAM #0 on CPP #0

Total number of regions             : 3

Total tcam used cell entries        : 0

Total tcam free cell entries        : 131072

Threshold status                    : below critical limit

Informações Relacionadas

- Solucione problemas de travamentos dos roteadores de serviços de agregação Cisco ASR 1000 Series

- Página de suporte dos roteadores de serviços de agregação Cisco ASR 1000 Series

- Suporte Técnico e Documentação - Cisco Systems