Contents

Introduction

Como posso usar o SNMP para recarregar um switch?

Informações Relacionadas

Introduction

Este documento fornece respostas para perguntas frequentes e orienta os usuários a encontrar recursos úteis sobre problemas de SNMP e SNMP relacionados aos equipamentos da Cisco.

P. Como posso usar o SNMP para recarregar um switch?

Siga este procedimento:A.

sysReset = .1.3.6.1.4.1.9.2.9.9 from the CISCO-STACK-MIB.my sysReset OBJECT-TYPE

-- FROM CISCO-STACK-MIB

SYNTAX Integer { other(1), reset(2), resetMinDown(3) }

MAX-ACCESS read-write

STATUS Current

DESCRIPTION "Writing reset(2) to this object resets the control logic of all modules in the system. Writing

resetMinDown(3) to this object resets the system with the minimal system down time. The resetMinDown(3) is

only supported in systems with redundant supervisors."

::= { iso(1) org(3) dod(6) internet(1) private(4) enterprises(1) cisco(9) workgroup(5) ciscoStackMIB(1) systemGrp(1) 9 }

No switch Cisco, você deve definir o comando set snmp community read-write private para suportar o comando reload.

Este exemplo recarrega o roteador com o endereço IP 10.16.99.55:

# ./snmpset 10.16.99.55 private .1.3.6.1.4.1.9.2.9.9.0 i 2

Esta é uma explicação das variáveis usadas anteriormente:

10.16.99.55 = ip address of your switch

private = R/W SNMP Community string of your switch .

1.3.6.1.4.1.9.2.9.9.0 = the instance of sysReset Object

i = Integer as defined SYNTAX in the MIB

2 = reload command as defined in the MIB

Informações Relacionadas

- Dicas técnicas dos serviços de aplicativos IP

- Suporte Técnico - Cisco Systems