Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Cenário 1 - Vazamento de rota VRF entre BGP e IGP ( EIGRP )

Diagrama de Rede

Configurar

Verificar

Cenário 2 - Vazamento de VRF entre VRF A e VRF B

Diagrama de Rede

Configurar

Verificar

Cenário 3 - Vazamento de VRF entre OSPF ( VRF ) e EIGRP ( Global ) com BGP ( Opcional )

Diagrama de Rede

Configurar

Verificar

Outros recursos

Introduction

Este documento descreve e fornece exemplos de configurações para métodos comuns de vazamento de rota de Virtual Routing and Forwarding (VRF).

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Protocolo de gateway de borda (BGP)

- Redistribuição do Routing Protocol

- VRF

- Software Cisco IOS® XE

Para obter mais informações sobre esses tópicos, consulte:

Redistribuir protocolos de roteamento

Exemplo de Configuração de Redistribuição Mútua entre EIGRP e BGP

Entender a redistribuição de rotas OSPF no BGP

Componentes Utilizados

As informações neste documento são baseadas nos roteadores com Cisco IOS® XE versões 16.12.X e 17.X

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

O VRF permite que um roteador mantenha tabelas de roteamento separadas para diferentes redes virtuais. Quando as exceções são necessárias, o vazamento de rota VRF permite que algum tráfego seja roteado entre os VRFs sem o uso de rotas estáticas.

Cenário 1 - Vazamento de rota VRF entre BGP e IGP ( EIGRP )

O Cenário 1 fornece um exemplo de vazamento de rota VRF entre BGP e EIGRP. Esse método pode ser usado para outros IGPs.

Diagrama de Rede

O Diagrama de Rede, como visto na Imagem 1, mostra a topologia da camada 3 onde o vazamento de rota é necessário.

Imagem 1. Topologia de vazamento de rota para o cenário 1

O roteador "LEAK" tem uma vizinhança BGP para um vizinho no VRF A e um vizinho EIGRP no VRF global.  O dispositivo 192.168.11.11 precisa ser capaz de se conectar ao dispositivo 172.16.10.10 através da rede.

O VAZAMENTO do roteador não pode rotear entre os dois, pois as rotas estão em VRFs diferentes.  Essas tabelas de roteamento mostram as rotas atuais por VRF e indicam quais rotas precisam vazar entre o VRF global e o VRF A.

Tabelas de roteamento LEAK:

Tabela de Roteamento EIGRP ( Roteamento Global )

LEAK#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, GigabitEthernet2

L 192.168.1.1/32 is directly connected, GigabitEthernet2

192.168.11.0/32 is subnetted, 1 subnets

D 192.168.11.11 [90/130816] via 192.168.1.2, 02:30:29, GigabitEthernet2 >> Route to be exchange to the VRF A routing table.

Tabela de roteamento VRF A

LEAK#show ip route vrf A

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, GigabitEthernet1

L 10.0.0.1/32 is directly connected, GigabitEthernet1

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.2, 01:47:58 >> Route to be exchange to the global routing table.

Configurar

Execute os procedimentos para criar o vazamento entre as duas tabelas de roteamento:

Step 1.

Create route-maps to filter the routes to be injected in both routing tables.

LEAK(config)#Route-map VRF_TO_EIGRP

LEAK(config-route-map)#match ip address prefix-list VRF_TO_EIGRP

LEAK(config-route-map)#exit

!

Prefix-list created to match the host that is attached to the previous route-map configured.

!

ip prefix-list VRF_TO_EIGRP permit 172.16.10.10/32

or

LEAK(config)#Route-map VRF_TO_EIGRP

LEAK(config-route-map)# match ip address 10

LEAK(config-route-map)#exit

!

ACL created to match the host that is attached to the previous route-map.

!

LEAK#show ip access-lists 10

10 permit 172.16.10.10

LEAK(config)#Route-map EIGRP_TO_VRF

LEAK(config-route-map)#match ip address prefix-list EIGRP_TO_VRF

LEAK(config-route-map)#exit

LEAK(config)#

!

Prefix-list created to match the host that is attached to the previous route-map configured.

!

ip  prefix-list EIGRP_TO_VRF  permit 192.168.11.11/32

or

LEAK(config)#Route-map EIGRP_TO_VRF

LEAK(config-route-map)#match ip address 20

LEAK(config-route-map)#exit

LEAK(config)#

!

ACL created to match the host that is attached to the previous route-map.

!

LEAK#show ip access-list 20

10 permit 192.168.11.11

Step 2.

Define the import/export maps and add the route-map names.

LEAK(config)#vrf definition A

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#import ipv4 unicast map EIGRP_TO_VRF >> Import the global routing table routes at the VRF routing table.

LEAK(config-vrf-af)#export ipv4 unicast map VRF_TO_EIGRP >> Export the VRF routes to the Global Routing Table.

LEAK(config-vrf-af)#end

Step 3.

Proceed with the dual redistribution.

Redistribute EIGRP

LEAK(config)#router bgp 1

LEAK(config-router)#redistribute eigrp 1

LEAK(config-router)#end

Redistribution BGP

LEAK(config)#router eigrp 1

LEAK(config-router)#redistribute bgp 1 metric 100 1 255 1 1500

LEAK(config-router)#end

Verificar

Routing table from VRF A

LEAK#show ip route vrf A

Routing Table: A

< Snip for resume >

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, GigabitEthernet1

L 10.0.0.1/32 is directly connected, GigabitEthernet1

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.2, 00:58:53

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

B 192.168.1.0/24 is directly connected, 00:01:00, GigabitEthernet2

L 192.168.1.1/32 is directly connected, GigabitEthernet2

192.168.11.0/32 is subnetted, 1 subnets

B 192.168.11.11 [20/130816] via 192.168.1.2, 00:01:00, GigabitEthernet2 >> Route from global routing table at VRF A routing table.

Global Routing Table (EIGRP)

LEAK#show ip route

< snip for resume >

Gateway of last resort is not set

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.2 (A), 00:04:47  >> Route from VRF A at global routing table.

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, GigabitEthernet2

L 192.168.1.1/32 is directly connected, GigabitEthernet2

192.168.11.0/32 is subnetted, 1 subnets

D 192.168.11.11 [90/130816] via 192.168.1.2, 01:03:35, GigabitEthernet2

LEAK#

Cenário 2 - Vazamento de VRF entre VRF A e VRF B

O cenário 2 descreve o vazamento entre dois VRFs diferentes.

Diagrama de Rede

Este documento usa esta configuração de rede:

Imagem 2. Topologia de vazamento de rota para o cenário 2

O roteador "LEAK" tem uma vizinhança BGP para um vizinho no VRF A e um vizinho OSPF no VRF B. O dispositivo 192.168.11.11 precisa se conectar ao dispositivo 172.16.10.10 através da rede.

O VAZAMENTO do roteador não pode rotear entre os dois, pois as rotas estão em VRFs diferentes. Essas tabelas de roteamento mostram as rotas atuais por VRF e indicam quais rotas precisam vazar entre o VRF A e o VRF B.

Tabela de roteamento LEAK:

Tabela de roteamento VRF A

LEAK#show ip route vrf A

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, Ethernet0/0

L 10.0.0.2/32 is directly connected, Ethernet0/0

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.1, 00:03:08 >> Route to be exchange to routing table VRF B.

Tabela de roteamento VRF B

LEAK#show ip route vrf B

Routing Table: B

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, Ethernet0/1

L 192.168.1.2/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

O 192.168.11.11 [110/11] via 192.168.1.1, 00:58:45, Ethernet0/1 >> Route to be exchange to routing table VRF A.

Configurar

Siga estes procedimentos para criar o vazamento entre as duas tabelas de roteamento:

Step 1.

Create route-maps to filter the routes to be injected in both routing tables.

LEAK(config)#Route-map VRFA_TO_VRFB

LEAK(config-route-map)#match ip address prefix-list VRFA_TO_VRFB

LEAK(config-route-map)#exit

!

Prefix-list created to match the host and IP segment that is attached to the previous route-map configured.

!

ip prefix-list VRFA_TO_VRFB permit 172.16.10.10/32

ip prefix-list VRFA_TO_VRFB permit 10.0.0.0/30

or

LEAK(config)#Route-map VRFA_TO_VRFB

LEAK(config-route-map)#match ip address 10

LEAK(config-route-map)#exit

!

ACL created to match the host and IP segment that is attached to the previous route-map.

!

LEAK#show ip access-lists 10

10 permit 172.16.10.10

20 permit 10.0.0.0

LEAK(config)#Route-map VRFB_TO_VRFA

LEAK(config-route-map)#match ip address prefix-list VRFB_TO_VRFA

LEAK(config-route-map)#exit

!

Prefix-list created to match the host and IP segment that is attached to the previous route-map configured.

!

ip prefix-list VRFB_TO_VRFA permit 192.168.11.11/32

ip prefix-list VRFB_TO_VRFA permit 192.168.1.0/24

or

LEAK(config)#Route-map VRFB_TO_VRFA

LEAK(config-route-map)#match ip address 20

LEAK(config-route-map)#exit

!

ACL created to match the host and IP segment that is attached to the previous route-map configured.

!

LEAK#show ip access-lists 20

10 permit 192.168.11.11

20 permit 192.168.1.0

Step 2.

At the VRFs configure the import/export map, use the route-map names to leak the routes.

LEAK(config)#vrf definition A

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#export map VRFA_TO_VRFB

LEAK(config-vrf-af)#import map VRFB_TO_VRFA

LEAK(config)#vrf definition B

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#export map VRFB_TO_VRFA

LEAK(config-vrf-af)#import map VRFA_TO_VRFB

Step 3.

Add the route-target to import and export the route distinguiser from both VRFs.

! --- Current configuration for VRF A

vrf definition A

rd 1:2

!

address-family ipv4

route-target export 1:2

route-target import 1:1

exit-address-family

! --- Current configuration from VRF B

vrf definition B

rd 2:2

!

address-family ipv4

exit-address-family

! --- Import the routes from VRF  B into VRF A

LEAK(config)#vrf definition A

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#route-target import 2:2

! --- Import routes from VRF A to VRF B and export routes from VRF B

LEAK(config-vrf-af)#vrf definition B

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#route-target import 1:2

LEAK(config-vrf-af)#route-target export 2:2

Verificar

Check the Routing Tables

VRF A Routing Table

LEAK#show ip route vrf A

Routing Table: A

< Snip for resume >

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, Ethernet0/0

L 10.0.0.2/32 is directly connected, Ethernet0/0

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.1, 00:07:20

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

B 192.168.1.0/24 is directly connected, 00:00:10, Ethernet0/1

L 192.168.1.2/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

B 192.168.11.11 [20/11] via 192.168.1.1 (B), 00:00:10, Ethernet0/1 >> Route from VRF B routing table at VRF A.

VRF B Routing Table

LEAK#show ip route vrf B

Routing Table: B

< Snip for resume >

10.0.0.0/30 is subnetted, 1 subnets

B 10.0.0.0 [200/0] via 10.0.0.1 (A), 00:00:15

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [200/0] via 10.0.0.1 (A), 00:00:15 >> Route from VRF A routing table at VRF B.

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, Ethernet0/1

L 192.168.1.2/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

O 192.168.11.11 [110/11] via 192.168.1.1, 01:05:12, Ethernet0/1

Cenário 3 - Vazamento de VRF entre OSPF ( VRF ) e EIGRP ( Global ) com BGP ( Opcional )

O cenário 3 descreve o vazamento de rota entre dois IGPs (VRF B e VRF global).

Diagrama de Rede

Este documento usa esta configuração de rede:

Imagem 3. Topologia de vazamento de rota para o cenário 3

O roteador "LEAK" tem uma vizinhança OSPF para um vizinho no VRF B e um vizinho EIGRP no VRF global. O dispositivo 172.16.10.10 precisa poder se conectar ao dispositivo 192.168.11.11 através da rede.

O VAZAMENTO do roteador não consegue conectar esses dois hosts. Essas tabelas de roteamento mostram as rotas atuais por VRF e indicam quais rotas precisam vazar entre o VRF B e o VRF Global.

Observação: esta configuração é apresentada como um exemplo para executar um vazamento quando um dos IGPs está em um VRF, O uso de redistribuição entre VRF e global

O VRF não é permitido nos dispositivos.

Tabela de roteamento LEAK:

Tabela de Roteamento EIGRP ( EIGRP )

LEAK#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, Ethernet0/1

L 192.168.1.1/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

D 192.168.11.11 [90/1024640] via 192.168.1.2, 01:08:38, Ethernet0/1 >> Route to be exchange from global routing table at VRF B routing table.

Tabela de roteamento VRF B ( OSPF )

LEAK#show ip route vrf B

Routing Table: B

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, Ethernet0/0

L 10.0.0.2/32 is directly connected, Ethernet0/0

172.16.0.0/32 is subnetted, 1 subnets

O 172.16.10.10 [110/11] via 10.0.0.1, 01:43:45, Ethernet0/0 >> Route to be exchange from routing table VRF B at global routing table.

Configurar

Siga estes procedimentos para criar o vazamento entre as duas tabelas de roteamento:

Step 1.

Create route-maps for import and export to be injected in both routing tables.

LEAK(config)#Route-map OSPF_TO_EIGRP

LEAK(config-route-map)#match ip address prefix-list OSPF_TO_EIGRP

LEAK(config-route-map)#exit

!

Prefix-list created to match the host that is attached to the previous route-map configured.

!

ip prefix-list OSPF_TO_EIGRP permit 172.16.10.10/32

ip prefix-list OSPF_TO_EIGRP permit 10.0.0.0/30

or

LEAK(config)#Route-map OSPF_TO_EIGRP

LEAK(config-route-map)#match ip address 10

LEAK(config-route-map)#exit

!

ACL created to match the host that is attached to the previous route-map.

!

LEAK#show ip access-lists 10

10 permit 172.16.10.10

20 permit 10.0.0.0

LEAK(config)#Route-map EIGRP_TO_OSPF

LEAK(config-route-map)#match ip address prefix-list EIGRP_TO_OSPF

LEAK(config-route-map)#exit

!

Prefix-list created to match the host that is attached to the previous route-map configured.

!

ip prefix-list EIGRP_TO_OSPF permit 192.168.11.11/32

ip prefix-list EIGRP_TO_OSPF permit 192.168.1.0/24

or

LEAK(config)#Route-map EIGRP_TO_OSPF

LEAK(config-route-map)#match ip address 20

LEAK(config-route-map)#exit

!

ACL created to match the host that is attached to the previous route-map.

!

LEAK#show ip access-lists 20

10 permit 192.168.11.11

20 permit 192.168.1.0/24

Step 2.

Add the import/export maps in order to match the route-map names.

Current configuration

!

vrf definition B

rd 1:2

!

address-family ipv4

exit-address-family

!

!

LEAK(config-vrf)#vrf definition B

LEAK(config-vrf)#address-family ipv4

LEAK(config-vrf-af)#import ipv4 unicast map EIGRP_TO_OSPF

LEAK(config-vrf-af)#export ipv4 unicast map OSPF_TO_EIGRP

Step 3.

To perform the leak is necessary to create a BGP process, in order to redistribute

the IGPs protocols.

router bgp 1

bgp log-neighbor-changes

!

address-family ipv4 vrf B >> Include the address-family to inject VRF B routing table (OSPF)

!

exit-address-family

Observação: certifique-se de que o VRF tenha um diferenciador de rota configurado para evitar o erro:

"%vrf B does not have "rd" configured, please configure "rd" before configuring import route-map"

Step 4.

Create a Dual Redistribution.

IGPs redistribution.

LEAK(config-router)#router bgp 1

LEAK(config-router)#redistribute eigrp 1

!

LEAK(config-router)#address-family ipv4 vrf B

LEAK(config-router-af)#redistribute ospf 1 match internal external 1 external 2

LEAK(config-router-af)#end

BGP Redistribution

LEAK(config)#router ospf 1 vrf B

LEAK(config-router)#redistribute bgp 1

!

LEAK(config-router)#router eigrp TAC

LEAK(config-router)#

LEAK(config-router)# address-family ipv4 unicast autonomous-system 1

LEAK(config-router-af)#

LEAK(config-router-af)# topology base

LEAK(config-router-af-topology)#redistribute bgp 1 metric 100 1 255 1 1500

Verificar

Verifique as tabelas de roteamento

Tabela de roteamento global

LEAK#show ip route

< Snip for resume >

172.16.0.0/32 is subnetted, 1 subnets

B 172.16.10.10 [20/11] via 10.0.0.1, 00:14:48, Ethernet0/0 >> Route from VRF B routing table at global routing table ( EIGRP ).

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.1.0/24 is directly connected, Ethernet0/1

L 192.168.1.1/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

D 192.168.11.11 [90/1024640] via 192.168.1.2, 02:16:51, Ethernet0/1

Tabela de roteamento VRF B

LEAK#show ip route vrf B

Routing Table: B

< Snip for resume >

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C 10.0.0.0/30 is directly connected, Ethernet0/0

L 10.0.0.2/32 is directly connected, Ethernet0/0

172.16.0.0/32 is subnetted, 1 subnets

O 172.16.10.10 [110/11] via 10.0.0.1, 00:34:25, Ethernet0/0

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

B 192.168.1.0/24 is directly connected, 00:08:51, Ethernet0/1

L 192.168.1.1/32 is directly connected, Ethernet0/1

192.168.11.0/32 is subnetted, 1 subnets

B 192.168.11.11 [20/1024640] via 192.168.1.2, 00:08:51, Ethernet0/1 >> Route from global routing table ( EIGRP ) at VRF B routing table.

Outros recursos