Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento descreve como configurar um HSRP (Hot Standby Router Protocol) para o grupo IPv6 (HSRPv2) para rastrear um objeto e alterar a prioridade do HSRP com base no estado do objeto.

Cada objeto rastreado tem um número exclusivo especificado na CLI (Command-Line Interface, interface de linha de comando) de rastreamento. O HSRPv2 usa esse número para rastrear um objeto específico. O processo de rastreamento pesquisa periodicamente o objeto rastreado em busca de alterações de valor e envia quaisquer alterações (como valores para cima ou para baixo) ao HSRPv2, imediatamente ou após um atraso especificado. Este documento usa o comando track interface para configurar uma interface a ser rastreada.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Conhecimento da configuração do HSRP; consulte Configuração do HSRP para obter mais informações.

- Conhecimento básico da implementação do endereçamento IPv6 e da conectividade básica; consulte Implementação de Endereçamento IPv6 e Conectividade Básica para obter mais informações.

- Conhecimento básico do rastreamento aprimorado de objetos

- HSRPv2 deve ser ativado em uma interface antes que o HSRP IPv6 possa ser configurado.

- O roteamento unicast IPv6 deve ser ativado no dispositivo para que o HSRP IPv6 seja configurado.

Componentes Utilizados

As configurações neste documento são baseadas no roteador da série Cisco7200 que executa o Cisco IOS® Software Release 15.0(1).

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter informações sobre convenções de documentos.

Configurar

Os roteadores R2 e R3 estão conectados a R1 por meio de uma interface serial. As interfaces Fast Ethernet de R2 e R3 são configuradas com HSRP IPv6 de forma que R2 atue como o roteador ativo e R3 atue como o roteador em standby. No roteador R2, o processo de rastreamento é configurado para rastrear o estado do protocolo de linha da interface da interface serial 1/0: Caso a interface serial S1/0 de R2 fique inativa, o roteador R3 altera seu estado de Standby para Ativo.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Configuração do roteador R1

- Configuração do roteador R2

- Configuração do roteador R3

Configuração do roteador R1

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::1/64

serial restart-delay 0

!

!

interface Serial1/1

no ip address

ipv6 address 2011:11:11:11::1/64

serial restart-delay 0

!

end

Configuração do roteador R2

!

version 15.0

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

track 1 interface Serial1/0 line-protocol

!--- Tracking process 1 is configured in the router !--- to track state of the interface line protocol !--- of serial interface 1/0

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::2/64

serial restart-delay 0

!

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::10/64

standby version 2

standby 10 ipv6 autoconfig

!--- Assigns a standby group and standby IP address.

standby 10 preempt delay minimum 45

!--- The preempt command allows the router to become the !--- active router when it has the priority higher than all the other !--- HSRP-configured routers. Without this command, even if a router has higher !--- priority value, it will not become an active router. !--- The delay minimum value causes the local router to postpone !--- taking over the active role for a minimum of 45 seconds.

standby 10 track 1 decrement 10

!--- Configures HSRP to track an object and change the Hot Standby !--- priority on the basis of the state of the object.

!--- In this example,the HSRP tracks the interface s1/0 mentioned !--- in the track process 1.

!--- Decrement value specified the amount by which the Hot Standby !--- priority for the router is decremented (or incremented) when the tracked object !--- goes down (or comes back up). The range is from 1 to 255. The default is 10.

!

end

Configuração do roteador R3

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Serial1/0

no ip address

ipv6 address 2011:11:11:11::2/64

serial restart-delay 0

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::11/64

standby version 2

standby 10 ipv6 autoconfig

standby 10 priority 95

standby 10 preempt delay minimum 45

!

end

Verificar

Use o comando show standby nos roteadores R2 e R3 para verificar a configuração.

Roteador R2

R2#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:26:03

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 1.872 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C802:AFF:FE10:38, priority 95 (expires in 8.048 sec)

Priority 100 (default 100)

Track object 1 state Up decrement 10

Group name is "hsrp-Fa2/0-10" (default)

Roteador R3

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Standby

4 state changes, last state change 00:26:25

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.176 secs

Preemption enabled, delay min 45 secs

Active router is FE80::C801:14FF:FEF4:38, priority 100 (expires in 9.888 sec)

MAC address is ca01.14f4.0038

Standby router is local

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Para exibir informações de rastreamento, use o comando show track no roteador R2.

Roteador R2

R2#show track 1

Track 1

Interface Serial1/0 line-protocol

Line protocol is Up

3 changes, last change 00:28:39

Tracked by:

HSRP FastEthernet2/0 10

!--- Displays the information about the objects that !--- are tracked by tracking process 1.

R2#show track int brief

Track   Object                           Parameter        Value Last Change

1       interface   Serial1/0            line-protocol    Up    00:31:19

!--- Displays the information about the tracked interface.

Caso o roteador ativo (R2 neste exemplo) seja desativado, o roteador em standby altera seu estado imediatamente para Ativo como mostrado nesta tabela:

Quando o roteador ativo (R2) fica inativo...

Roteador R2
R2(config)#interface s1/0

R2(config-if)#shut

R2(config-if)#

*May 21 20:56:54.223: %TRACKING-5-STATE: 1 interface Se1/0 line-protocol Up->Down

R2(config-if)#

*May 21 20:56:56.203: %LINK-5-CHANGED: Interface Serial1/0, changed state to administratively down

*May 21 20:56:57.203: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0, changed state to down

R2(config-if)#

*May 21 20:57:43.087: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Active -> Speak

R2(config-if)#

*May 21 20:57:54.479: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Speak -> Standby

!--- When the interface goes down, the active router changes !--- its state to Standby.

Roteador R3

R3#

*May 21 20:56:53.419: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Standby-> Active

!--- The standby router is now the active router.

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:02:32

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.080 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C801:14FF:FEF4:38, priority 90 (expires in 9.664 sec)

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte tecnológico IPv6

- Configurando protocolos de redundância de primeiro salto em IPv6

- Hot Standby Router Protocol (HSRP): Perguntas mais freqüentes

- RFC 2281 - Cisco Hot Standby Router Protocol (HSRP)

- Suporte Técnico e Documentação - Cisco Systems