Contents

Introduction

Prerequisites

Versões de hardware e software

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

comandos show

Informações Relacionadas

Introduction

Este documento descreve como configurar failover com EIGRP (Enhanced Interior Gateway Routing Protocol) usando VRF (Virtual Routing and Forwarding). O VRF é uma extensão do roteamento IP que fornece várias instâncias de roteamento. Os provedores de serviços de Internet (ISPs) aproveitam esse VRF para criar redes virtuais privadas (VPNs) separadas para os clientes, pois permite que várias instâncias da tabela de roteamento existam em um roteador.

Prerequisites

- Conhecimento básico do EIGRP

- Conhecimento básico de VRF

Versões de hardware e software

As configurações neste documento são baseadas no Cisco 3700 Series Router no Cisco IOS® Software Release 12.4 (15)T 13.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Neste exemplo, o roteador R1 é considerado um roteador PE. Os roteadores R2 e R3 são considerados roteadores CE. Os roteadores usam o EIGRP para se comunicar entre si. Se R2 perder conectividade com R1 (ou seja, em caso de failover), as rotas podem alcançar R1 através de R3. Os roteadores R2 e R3 têm uma conexão MPLS entre eles.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Roteador R1

- Roteador R2

- Roteador R3

Roteador R1

!

version 12.4

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.2 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip address 57.35.169.2 255.255.255.0

duplex auto

speed auto

!

router eigrp 220

network 2.2.2.2 0.0.0.0

network 57.35.169.2 0.0.0.0

network 192.168.1.0

no auto-summary

!--- Configured EIGRP and advertised the networks.

!

end

Roteador R2

!

version 12.4

!

hostname R2

!

ip cef

!

ip vrf A

!--- Configures VRF routing table!

rd 1.1.1.1:111

!---Configuring a route distinguisher RD creates routing and forwarding table for a VRF. The RD can be used in either of these formats: - 16-bit AS number: Your 32-bit number (for example, 1:100) - 32-bit IP address: Your 16-bit number (In our case, 1.1.1.1:111)

route-target export 1.1.1.1:111

route-target import 1.1.1.1:111

!--- Creates a list of import and/or export route target communities for the specified VRF.

!

ip vrf B

rd 2.2.2.2:222

import ipv4 unicast map vrfA-to-vrfB

!--- Associates the specified route map with the VRF.

route-target export 2.2.2.2:222

route-target import 2.2.2.2:222

!

mpls label protocol ldp

!

interface Loopback1

ip vrf forwarding B

!--- Associates a VRF instance with an interface.

ip address 172.16.2.1 255.255.255.255

!

interface FastEthernet0/0

ip vrf forwarding A

ip address 192.168.1.1 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip vrf forwarding A

ip address 10.0.0.1 255.255.255.0

duplex auto

speed auto

mpls ip

!

interface FastEthernet1/0

ip vrf forwarding B

ip address 203.197.194.1 255.255.255.0

duplex auto

speed auto

!

router eigrp 1

no auto-summary

!

address-family ipv4 vrf B

!--- Enter address family configuration mode for configuring EIGRP routing sessions.

network 172.16.2.0 0.0.0.255

network 203.197.194.0

no auto-summary

autonomous-system 330

!--- Defines the autonomous system number for this specific instance of EIGRP.

exit-address-family

!

address-family ipv4 vrf A

network 10.0.0.1 0.0.0.0

network 192.168.1.0

no auto-summary

autonomous-system 220

exit-address-family

!

access-list 99 permit 172.16.1.0 0.0.0.255

access-list 99 permit 192.168.1.0 0.0.0.255

access-list 101 permit udp host 192.168.1.1 eq bootps host 1.1.1.1 eq bootps

!--- Create access list in order to permit the host addresses.

!

route-map vrfA-to-vrfB permit 10

match ip address 99

!--- Created a route map and distributed the routes permitted by access list 99.

!

end

Roteador R3

!

version 12.4

!

hostname R3

!

ip cef

!

!

!

!

ip vrf A

rd 1.1.1.1:111

!

mpls label protocol ldp

!

interface Loopback1

ip address 1.1.1.1 255.255.255.255

!

interface FastEthernet0/0

ip vrf forwarding A

ip address 10.0.0.2 255.255.255.0

duplex auto

speed auto

mpls ip

!

interface FastEthernet0/1

ip vrf forwarding A

ip address 57.35.169.1 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet1/0

ip address 203.197.194.2 255.255.255.0

duplex auto

speed auto

!

router eigrp 330

network 1.1.1.1 0.0.0.0

network 10.0.0.2 0.0.0.0

network 57.35.169.1 0.0.0.0

network 203.197.194.0

no auto-summary

!

address-family ipv4 vrf A

network 10.0.0.2 0.0.0.0

network 57.35.169.1 0.0.0.0

no auto-summary

autonomous-system 220

exit-address-family

!

end

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

comandos show

Para verificar se o EIGRP está configurado corretamente, use o comando show ip route vrf.

show ip route vrf

No roteador R2
R2#show ip route vrf A

Routing Table: A

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

2.0.0.0/32 is subnetted, 1 subnets

D       2.2.2.2 [90/409600] via 192.168.1.2, 00:15:47, FastEthernet0/0

57.0.0.0/24 is subnetted, 1 subnets

D       57.35.169.0 [90/307200] via 192.168.1.2, 00:15:47, FastEthernet0/0

[90/307200] via 10.0.0.2, 00:15:47, FastEthernet0/1

10.0.0.0/24 is subnetted, 1 subnets

C       10.0.0.0 is directly connected, FastEthernet0/1

C    192.168.1.0/24 is directly connected, FastEthernet0/0

No roteador R3

R3#show ip route vrf A

Routing Table: A

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

2.0.0.0/32 is subnetted, 1 subnets

D       2.2.2.2 [90/409600] via 57.35.169.2, 00:16:59, FastEthernet0/1

57.0.0.0/24 is subnetted, 1 subnets

C       57.35.169.0 is directly connected, FastEthernet0/1

10.0.0.0/24 is subnetted, 1 subnets

C       10.0.0.0 is directly connected, FastEthernet0/0

D    192.168.1.0/24 [90/307200] via 57.35.169.2, 00:17:02, FastEthernet0/1

[90/307200] via 10.0.0.1, 00:17:02, FastEthernet0/0

!--- Displays the routing table associated with VRF instance A.

Se R2 perder a conectividade com R1, as rotas de R2 chegarão ao roteador R1 até R3.

Em caso de failover

Quando R2 perder a conectividade com R1, tente emitir shutdown na Fa0/0 de R2. No roteador R2
R2#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

R2(config)#int fa0/0

R2(config-if)#shut down

R2(config-if)#

*Mar  1 00:01:01.539: %TDP-5-INFO: VRF A: TDP ID removed

*Mar  1 00:01:01.675: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 57.35.169.1:0 (1) is

DOWN (LDP Router ID changed)

*Mar  1 00:01:01.679: %DUAL-5-NBRCHANGE: IP-EIGRP(1) 220: Neighbor 192.168.1.2

(FastEthernet0/0) is down: interface down

R2(config-if)#

*Mar  1 00:01:03.519: %LINK-5-CHANGED: Interface FastEthernet0/0, changed state

to administratively down

*Mar  1 00:01:04.519: %LINEPROTO-5-UPDOWN: Line protocol on Interface

FastEthernet0/0, changed state to down

Na mesma instância do roteador R3, o link de failover é ativado.
R3#

*Mar  1 00:00:52.527: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 192.168.1.1:0 (1) is

DOWN (TCP connection closed by peer)

R3#

*Mar  1 00:00:59.591: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 10.0.0.1:0 (1) is UP

Para verificar se o roteador R2 ainda pode acessar R1, emita o comando ping vrf para fazer ping no R1 a partir do roteador R2.

Ping

No roteador R2
R2#ping vrf A 192.168.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/51/96 ms

!--- R2 can still reach R1 through R3.

Informações Relacionadas

- Serviços compatíveis com VRF

- Página de suporte de EIGRP

- Suporte Técnico e Documentação - Cisco Systems