Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Conjunto de cabos EIA/TIA-449

Pinagens de cabos DTE EIA/TIA-449 (DB-60 a DB-37)

Pinagens de cabos EIA/TIA-449 DCE (DB-60 a DB-37)

Informações Relacionadas

Introduction

Este documento exibe o conjunto do cabo 5-em-1 EIA/TIA-449 e descreve suas conexões de pino do cabo.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Conjunto de cabos EIA/TIA-449

Pinagens de cabos DTE EIA/TIA-449 (DB-60 a DB-37)

60 Pino1

Sinal

Descrição

Direção

37 pinos

Sinal

J1-49 J1-48

MODE_1 GND

—

—

—

J1-51 J1-52

GND MODE_DCE

Grupo de curto

—

—

—

J1-46

Shield_GND

Único

—

J2-1

Shield GND

J1-11 J1-12

TxD/RxD+ TxD/RxD—

Par trançado nº 6

==> ==>

J2-4 J2-22

SD+ SD—

J1-24 J1-23

TxC/RxC+ TxC/RxC—

Par trançado nº 9

<== <==

J2-5 J2-23

ST+ ST—

J1-28 J1-27

RxD/TxD+ RxD/TxD—

Par trançado nº 11

<== <==

J2-6 J2-24

RD+ RD—

J1-9 J1-10

RTS/CTS+ RTS/CTS—

Par trançado nº 5

==> ==>

J2-7 J2-25

RS+ RS—

J-26 J1-25

RxC/TxCE+ RxC/TxCE—

Par trançado nº 10

<== <==

J2-8 J2-26

RT+ RT-

J1-1 J1-2

CTS/RTS+ CTS/RTS—

Par trançado nº 1

<== <==

J2-9 J2-27

CS+ CS—

J1-44 J1-45

Circuito LL/DCD_GND

Par trançado nº 12

==> —

J2-10 J2-37

LL CS

J1-3 J1-4

DSR/DTR+ DSR/DTR—

Par trançado nº 2

<== <==

J2-11 J2-29

DM+ DM—

J1-7 J1-8

DTR/DSR+ DTR/DSR—

Par trançado nº 4

==> ==>

J2-12 J2-30

TR+ TR—

J1-5 J1-6

DCD/DCD+ DCD/DCD—

Par trançado nº 3

<== <==

J2-13 J2-31

RR+ RR-

J1-13 J1-14

TxCE/TxC+ TxCE/TxC—

Par trançado nº 7

==> ==>

J2-17 J2-35

TT+ TT-

J1-15 J1-16

Circuito_GND Circuito_GND

Par trançado nº 9

—

J2-19 J2-20

SG RC

1 Qualquer pino não referenciado não está conectado.

Pinagens de cabos EIA/TIA-449 DCE (DB-60 a DB-37)

60 pinos 1

Sinal

Descrição

Direção

37 pinos

Sinal

J1-49 J1-48

MODE_1 GND

Grupo de curto

—

—

—

J1-46

Shield_GNC

Único

—

J2-1

Shield GND

J1-28 J1-27

RxD/TxD+ RxD/TxD—

Par trançado nº 11

<== <==

J2-4 J2-22

SD+ SD—

J1-13 J1-14

TxCE/TxC+ TxCE/TxC—

Par trançado nº 7

==> ==>

J2-5 J2-23

ST+ ST—

J1-11 J1-12

TxD/RxD+ TxD/RxD—

Par trançado nº 6

==> ==>

J2-6 J2-24

RD+ RD—

J1-1 J1-2

CTS/RTS+ CTS/RTS—

Par trançado nº 1

<== <==

J2-7 J2-25

RS+ RS—

J1-24 J1-23

TxC/RxC+ TxC/RxC—

Par trançado nº 9

==> ==>

J2-8 J2-26

RT+ RT—

J1-9 J1-10

RTS/CTS+ RTS/CTS—

Par trançado nº 5

==> ==>

J2-9 J2-27

CS+ CS—

J1-29 J1-30

NIL/LL Circuit_GND

Par trançado nº 12

==> —

J2-10 J2-37

LL SC

J1-3 J1-4

DTR/DSR+ DTR/DSR—

Par trançado nº 4

==> ==>

J2-11 J2-29

DM+ DM—

J1-3 J1-4

DSR/DTR+ DSR/DTR—

Par trançado nº 2

<== <==

J2-12 J2-30

TR+ TR—

J1-5 J1-6

DCD/DCD+ DCD/DCD—

Par trançado nº 3

==> ==>

J2-13 J2-31

RR+ RR—

J1-26 J1-25

RxC/TxCE+ RxC/TxCE—

Par trançado nº 10

<== <==

J2-17 J2-35

TT+ TT-

J1-15 J1-16

Circuito_GND Circuito_GND

Par trançado nº 8

—

J2-19 J2-20

SG RC

1 Qualquer pino não referenciado não está conectado.

Informações Relacionadas

- Suporte Técnico - Cisco Systems