Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece uma configuração de exemplo para balanceamento de carga de VPN em um Content Switching Module (CSM). O balanceamento de carga da VPN é um mecanismo que distribui de forma inteligente as sessões de VPN ao longo de um conjunto de concentradores VPN ou dispositivos VPN head-end. O balanceamento de carga da VPN é implementado por estes motivos:

- superar as limitações de desempenho ou escalabilidade em dispositivos VPN; por exemplo, pacotes por segundo, conexões por segundo e throughput

- fornecer redundância (remover um único ponto de falha)

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Implemente a RI (Reverse Route Inject, injeção de rota inversa) nos dispositivos headend para propagar automaticamente as informações de roteamento dos spokes.

- Ative a VLAN 61 e 51 para compartilhar a mesma sub-rede.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Cisco Catalyst 6500 com CSM

- Cisco 2621 Router

- Cisco 7206

- Cisco 7206VXR

- Cisco 7204VXR

- Cisco 7140

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota: Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Configuração do CSM

- Configuração do roteador de ponto inicial - 7206VXR

- Configuração do roteador spoke - 7206

Configuração do CSM

Conclua estes passos:

1. Implemente o RRI nos dispositivos headend para propagar as informações de roteamento dos spokes automaticamente.

Observação: a VLAN 61 e a VLAN 51 compartilham a mesma sub-rede.

2. Defina o cliente VLAN e o servidor VLAN.

3. Defina a sonda usada para verificar a integridade dos servidores IPSec.

!--- The CSM is located in slot 4.

module ContentSwitchingModule 4

vlan 51 client

ip address 172.21.51.244 255.255.255.240

!

vlan 61 server

ip address 172.21.51.244 255.255.255.240

!

probe ICMP_PROBE icmp

interval 5

retries 2

!

4. Defina o serverfarm com os servidores IPSec reais.

5. Configure a limpeza de falha, para limpar as conexões que pertencem a servidores mortos.

6. Defina a política difícil.

!--- Serverfarm VPN_IOS and real server members.

serverfarm VPN_IOS

nat server

no nat client

!--- Set the behavior of connections when the real servers have failed.

failaction purge

real 172.21.51.242

inservice

real 172.21.51.247

inservice

probe ICMP_PROBE

!

!--- Ensure that connections from the same client match the same server !--- load balancing (SLB) policy. !--- Use the same real server on subsequent connections; issue the !--- sticky command.

sticky 5 netmask 255.255.255.255 timeout 60

!

policy VPNIOS

sticky-group 5

serverfarm VPN_IOS

!

7. Defina VServers, um por fluxo de tráfego.

!--- Virtual server VPN_IOS_ESP.

vserver VPN_IOS_ESP

!--- The virtual server IP address is specified.

virtual 172.21.51.253 50

!--- Persistence rebalance is used for HTTP 1.1, to rebalance the connection !--- to a new server using the load balancing policy.

persistent rebalance

!--- Associate the load balancing policy with the VPNIOS virtual server.

slb-policy VPNIOS

inservice

!

vserver VPN_IOS_IKE

virtual 172.21.51.253 udp 500

persistent rebalance

slb-policy VPNIOS

inservice

!

Configuração do roteador de ponto inicial - 7206VXR

crypto isakmp policy 10

authentication pre-share

crypto isakmp key cisco123 address 0.0.0.0

!

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto mib ipsec flowmib history tunnel size 200

crypto mib ipsec flowmib history failure size 200

!

crypto dynamic-map mydyn 10

set transform-set myset

reverse-route

!

crypto map mymap 10 ipsec-isakmp dynamic mydyn

!

interface FastEthernet0/0

ip address 172.21.51.247 255.255.255.240

crypto map mymap

!

interface FastEthernet2/0

ip address 10.1.1.6 255.255.255.0

router eigrp 1

redistribute static

network 10.0.0.0

no auto-summary

no eigrp log-neighbor-changes

!

ip default-gateway 172.21.51.241

ip classless

ip route 0.0.0.0 0.0.0.0 172.21.51.241

no ip http server

!

Configuração do roteador spoke - 7206

crypto isakmp policy 10

authentication pre-share

crypto isakmp key cisco123 address 172.21.51.253

!

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto mib ipsec flowmib history tunnel size 200

crypto mib ipsec flowmib history failure size 200

!

crypto map mymap 10 ipsec-isakmp

set peer 172.21.51.253

set transform-set myset

match address 101

!

interface Loopback0

ip address 10.3.3.3 255.255.255.0

!

interface Ethernet0/0

ip address 172.21.51.250 255.255.255.240

duplex auto

crypto map mymap

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.21.51.241

no ip http server

!

access-list 101 permit ip 10.3.3.0 0.0.0.255 10.1.1.0 0.0.0.255

!

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- Emita o comando show module csm all ou show module contentSwitchingModule all; ambos os comandos geram as mesmas informações.

O comando show module contentSwitchingModule all vservers mostra as informações do servidor virtual SLB.

Cat6506-1-Native# show module contentSwitchingModule all vservers

---------------------- CSM in slot 4 ----------------------

slb vserver      prot     virtual              vlan    state       conns

---------------------------------------------------------------------------

VPN_IOS_ESP      50     172.21.51.253/32:0      ALL   OPERATIONAL   2

VPN_IOS_IKE      UDP   172.21.51.253/32:500     ALL   OPERATIONAL   2

O comando show module contentSwitchingModule all conns mostra informações de conexão SLB.

Cat6506-1-Native# show module contentSwitchingModule all conns

---------------------- CSM in slot 4 ----------------------

prot vlan source                destination           state

----------------------------------------------------------------------

In  UDP  51   172.21.51.250:500     172.21.51.253:500     ESTAB

Out UDP  61   172.21.51.242:500     172.21.51.250:500     ESTAB

In  50   51   172.21.51.251         172.21.51.253         ESTAB

Out 50   61   172.21.51.247         172.21.51.251         ESTAB

In  50   51   172.21.51.250         172.21.51.253         ESTAB

Out 50   61   172.21.51.242         172.21.51.250         ESTAB

In  UDP  51   172.21.51.251:500     172.21.51.253:500     ESTAB

Out UDP  61   172.21.51.247:500     172.21.51.251:500     ESTAB

O comando show module contentSwitchingModule all sticky mostra o banco de dados SLB sticky.

Cat6506-1-Native# show module contentSwitchingModule all sticky

---------------------- CSM in slot 4 ----------------------

client IP:    172.21.51.250

real server:  172.21.51.242

connections:  0

group id:     5

timeout:      38

sticky type:  netmask 255.255.255.255

client IP:    172.21.51.251

real server:  172.21.51.247

connections:  0

group id:     5

timeout:      40

sticky type:  netmask 255.255.255.255

- Emita o comando show ip route no roteador.

2621VPN# show ip route

!--- Output suppressed.

10.0.0.0/24 is subnetted, 3 subnets

D EX    10.2.2.0 [170/30720] via 10.1.1.6, 00:13:57, FastEthernet0/0

D EX    10.3.3.0 [170/30720] via 10.1.1.5, 00:16:15, FastEthernet0/0

C       10.1.1.0 is directly connected, FastEthernet0/0

D*EX 0.0.0.0/0 [170/30720] via 10.1.1.5, 00:37:58, FastEthernet0/0

[170/30720] via 10.1.1.6, 00:37:58, FastEthernet0/0

2621VPN#

7206VXR# show ip route

!--- Output suppressed.

172.21.0.0/28 is subnetted, 1 subnets

C       172.21.51.240 is directly connected, FastEthernet0/0

10.0.0.0/24 is subnetted, 3 subnets

S       10.2.2.0 [1/0] via 0.0.0.0, FastEthernet0/0

D EX    10.3.3.0 [170/30720] via 10.1.1.5, 00:16:45, FastEthernet2/0

C       10.1.1.0 is directly connected, FastEthernet2/0

S*   0.0.0.0/0 [1/0] via 172.21.51.241

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Exemplo de configuração de balanceamento de carga de VPN no CSM no modo despachado

- Referência de comando do módulo de switching de conteúdo do switch Catalyst 6500 Series, 4.1(2)

- Suporte Técnico e Documentação - Cisco Systems