Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Atualize o software NAM para a versão 3.x

Tarefa

Step-by-Step Instructions

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece um procedimento passo a passo sobre como atualizar o software Network Analysis Module (NAM) para a versão 3.x.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Familiaridade com o FTP

- Familiaridade com a administração do switch Catalyst na linha de comando

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- WS-X6380 (NAM original)

- Software NAM versão 3.0

- Dispositivos de hardware NAM-1 e NAM-2

- Catalyst 6505 que executa CatOS 7.3.1

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Atualize o software NAM para a versão 3.x

Tarefa

Esta seção apresenta as informações para atualizar o software NAM para a versão 3.x.

Step-by-Step Instructions

Conclua estes passos para atualizar seu software:

1. Faça o download do arquivo:

- NAM original—Consulte Download-NAM de Software para Cat 6500 (Prod. Código: WS-X6380-NAM) (somente clientes registrados) e obtenha o arquivo c6nam.3-1-1.bin.gz.

- NAM1/NAM2—Consulte Software Download-NAM para Cat 6500 (Prod. Código: WS-SVC-NAMx) (somente clientes registrados) e obter o arquivo c6svc-nam.3-1-1.bin.gz.

2. Coloque o arquivo no diretório raiz da conta no servidor FTP que você pretende usar.

Observação: esta ilustração usa WS-X6380-NAM, mas se aplica a WS-SVC-NAM-1 e WS-SVC-NAM-2.

Este exemplo usa estas informações:

- O servidor FTP é:

- Nome: rtp-sycamore.cisco.com

- Endereço: 172.18.123.68

- A ID da conta é cse.

- A senha da conta é csec.

- O diretório raiz do cse é : ~ rtp-sycamore cse %4> pwd /local/home/cse.

- O arquivo está listado ali, portanto: /local/home/cse/c6nam.3-1-1.bin.gz.

~ rtp-sycamore cse %4>ls -al c6nam.3-1-1.bin.gz -rw-r—r— 1 cse other 75671244 maio 28 11:17 c6nam.3-1-1.bin.gz

3. Para verificar se o servidor FTP funciona, teste para ver se este servidor FTP está acessível de OUTRA estação de trabalho:

Observação: o rtp-cse-205 é usado como exemplo aqui.

rtp-cse-205_oansari-> ftp rtp-sycamore

Connected to rtp-sycamore.cisco.com.

220 rtp-sycamore FTP server (SunOS 5.7) ready.

Name (rtp-sycamore:oansari): cse

331 Password required for cse.

Password: csecse

230 User cse logged in.

Remote system type is UNIX.

Using binary mode to transfer files.

4. Ao acessar o servidor FTP, verifique se o arquivo está disponível:

ftp> ls c6nam.3-1-1.bin.gz

227 Entering Passive Mode (172,18,123,68,222,205)

150 ASCII data connection for /bin/ls (64.102.51.64,35372) (0 bytes).

-rw-r--r-- 1 cse other 75671244 May 28 11:17 c6nam.3-1-1.bin.gz

226 ASCII Transfer complete.

Ao verificar se o arquivo está presente e disponível, você aumenta a confiança de que a transferência do arquivo para o NAM será bem-sucedida. Isso confirma que o serviço FTP é executado e que o arquivo necessário está disponível para download para um cliente FTP.

5. Inicie as etapas para atualizar o NAM. Este é um exemplo:

1. Verifique o módulo:

nms-6506a> (enable) sh mod

...

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes ok

15  1    1     Multilayer Switch Feature WS-F6K-MSFC         no  ok

2   2    0     FlexWAN Module            WS-X6182-2PA        no  power-down

4   4    2     Network Analysis Module   WS-X6380-NAM        no  ok

5   5    8     1000BaseX Ethernet        WS-X6408-GBIC       no  ok

6   6    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

A saída mostra que o NAM de interesse está localizado no slot 4 e o status está correto.

2. Verifique a versão do switch CatOS:

nms-6506a> (enable) sh ver

WS-C6506 Software, Version NmpSW: 7.3(1)

Nota: a versão deve ser 7.3(1) ou posterior. Se seu switch não estiver nessa versão, NÃO CONTINUE PARA ATUALIZAR O NAM. PRIMEIRO ATUALIZE O SOFTWARE DO SWITCH.

3. Se a versão indicada for 7.3(1) ou posterior, redefina o NAM:

nms-6506a> (enable) reset 4 hdd:2

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

nms-6506a> (enable)

Observação: para NAM1/NAM2, você deve usar estes comandos: reset <module> cf:1.

Você vê esta saída no terminal:

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:28:36 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

003 May 28 11:28:50 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:28:50 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483090709 ticks

2003 May 28 11:28:50 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:29:07 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483092362 ticks

2003 May 28 11:29:07 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:26 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 11:30:26 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 11:30:27 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:30:27 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483100353 ticks

2003 May 28 11:30:27 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:27 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

4. Verifique se o NAM reinicializa com êxito:

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

!--- Yes, it is up again.

5. Faça uma sessão no NAM e emita o comando upgrade:

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

Maintenance Partition

!--- Notice how this states Maint Partition now.

login: root

Password:

!--- Enter the password (the default password here is 'cisco').

Network Analysis Module (WS-X6380-NAM) Console, 1.2(1a)m

Copyright (c) 1999, 2000, 2001 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz

!--- Notice that the complete path was specified after the IP address, !--- the same path that was retrieved from the "pwd" command on the server. !--- For this reason, it is encouraged to use your UNIX server as your !--- FTP server. If necessary, get your sysadmin to enable FTP on it !--- temporarily to upgrade this NAM. !--- This step takes the longest time to upgrade.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz500 'SIZE c6nam.3-1-1.bin.gz':

command not understood.

ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

(unknown size) - [|] 41362K

!--- This goes on for a long time.

!--- You have to be patient through this. !--- Then, after a lot of time, (can run for hours):

75671250 bytes transferred in 3010.21 sec (24.55k/sec)

downloaded image version 3.1(1)

Upgrade file ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

is downloaded. Upgrading will wipe out the

contents of the application partition on the hard disk.

Do you want to proceed installing it [y|N]: y

Proceeding with installation. Please do not interrupt.

If installation is interrupted or fails, boot this

partition again and restart upgrade.

!--- After a few minutes, you should see this:

Upgrade complete. You can boot the new application partition.

root@nms-6506a-nam.123.cisco.com#

6. Volte e reinicie o switch:

root@nms-6506a-nam.123.cisco.com#exit

nms-6506a> (enable) reset 4

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

you might see these log messages as well:

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:47:45 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:22 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 12:50:22 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:50:22 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:50:22 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483579792 ticks

2003 May 28 12:50:22 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:23 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

7. Finalmente, faça login no NAM novamente:

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

!--- NOTE #1: The 3.1 application image upgrade requires a special !--- one-time extra reboot for optimal NAM 3.1 operation. !--- Reboot the NAM immediately after logging in. !--- NOTE #2: Although it is NOT recommended, if for some reason you either !--- want to downgrade the application image later on this NAM or reinstall !--- the maintenance image, it is necessary to first install the NAM !--- downgrade patch.

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

root@nms-6506a-nam.123.cisco.com# reboot

!--- Reboot the NAM one last time.

Reboot the NAM? (Y/N) [N]: y

6. Aguarde até que o NAM seja reinicializado

!--- Note: NAM 3.1 takes a little longer to reboot (7-10 minutes).

Look for these logs:

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:08 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "failed(7)"

2003 May 28 12:55:23 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:55:23 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483609821 ticks

2003 May 28 12:55:23 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:39 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483611474 ticks

2003 May 28 12:55:39 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

e finalmente:

2003 May 28 12:57:17 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "ok(2)"

2003 May 28 12:57:17 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:57:18 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:57:18 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483621409 ticks

2003 May 28 12:57:18 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:57:18 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 4

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- show mod

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

(i) login again to see the version:

nms-6506a> (enable)sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Guia do usuário do Cisco Network Analysis Module Traffic Analyzer, 3.6

- Suporte Técnico e Documentação - Cisco Systems