Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Diagrama de topologia

Configurar

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Nesta configuração, dois recursos X.25 diferentes (usamos o dspu-host para simular os dispositivos finais nesta configuração). Para obter mais informações sobre a unidade física downstream (DSPU), consulte estes documentos:

- Configurando o suporte de DSPU e de ponto de serviço SNA

- Perguntas frequentes sobre unidade física downstream

Esses dois dispositivos finais se comunicam com adaptadores diferentes no local do mainframe por X.25. Os recursos X.25 remotos foram configurados para endereços de destino diferentes (em comprimentos diferentes e endereços diferentes). Qualquer chamada recebida cujo endereço de destino X.121 corresponda ao "subendereço qllc dlsw" do roteador é enviada para Data Link Switching Plus (DLSw+) (com ID.STN IND). Quando o DLSw+ recebe uma consulta "Can You Reach" sobre um endereço MAC virtual no pool, o código QLLC (Qualified Logical Link Control) tenta configurar um VC (Virtual Circuit, circuito virtual) para o endereço X.121 que mapeia para o endereço MAC virtual especificado. Se uma chamada recebida for recebida, o QLLC enviará um ID.STN.IND com um endereço MAC virtual do pool para DLSw+.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nas versões de software e hardware:

- O Software Cisco IOS® versão 12.2(6a) foi usado em Pathos (Cisco 2612)

- O Cisco IOS Software Release 12.0(20) foi usado no Namur & Goode (Cisco 2500, Cisco 4000)

- O Cisco IOS Software Release 12.1(7) foi usado no Nesle (Cisco 4500)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Diagrama de topologia

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Configurações

Os endereços MAC do mainframe são os seguintes:

- 4000.7507.0000

- 4000.7507.ffff

Este documento utiliza as configurações mostradas aqui:

- Cisco 7507 (Meatfeast)

- Cisco 2612 (Pathos)

- Cisco 4500 (Nesle)

- Cisco 2500 (Namur)

- Cisco 4000 (Goode)

Cisco 7507 (Meatfeast)

source-bridge ring-group 100

dlsw local-peer peer-id 10.48.64.75 promiscuous

!

interface Channel4/2

ip address 10.48.64.225 255.255.255.240

no keepalive

lan TokenRing 0

source-bridge 88 1 100

adapter 0 4000.7507.0000

adapter 1 4000.7507.ffff

Cisco 2612 (Pathos)

!

source-bridge ring-group 200

dlsw local-peer peer-id 10.48.64.40

dlsw remote-peer 0 tcp 10.48.64.75

!

interface Ethernet0/0

ip address 10.48.64.40 255.255.255.0

half-duplex

!

interface Serial0/0

no ip address

!

interface TokenRing0/0

no ip address

ring-speed 16

!

interface Serial0/1

no ip address

encapsulation x25

x25 alias .*

!--- It is used against the destination !--- address of a received call.

x25 htc 10

x25 win 7

x25 wout 7

qllc accept-all-calls

qllc dlsw subaddress 123456789012345 vmacaddr 4000.3333.0000 2 partner 4000.7507.0000

qllc dlsw subaddress 2224 vmacaddr 4000.2222.0000 2 partner 4000.7507.ffff

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

Cisco 4500 (Nesle)

!

x25 routing

!

!

!

interface Ethernet0

ip address 10.48.64.34 255.255.255.0

media-type 10BaseT

!

interface Ethernet1

no ip address

shutdown

media-type 10BaseT

!

interface Ethernet2

no ip address

media-type 10BaseT

!

interface Serial0

no ip address

encapsulation x25 dce

clockrate 250000

!

interface Serial1

no ip address

!

interface Serial2

no ip address

encapsulation x25 dce

no ip mroute-cache

clockrate 250000

!

interface Serial3

no ip address

encapsulation x25 dce

clockrate 250000

!

interface TokenRing0

no ip address

ring-speed 16

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

x25 route input-interface Serial2 interface Serial0

x25 route input-interface Serial3 interface Serial0

x25 route 555 interface Serial2

x25 route 666 interface Serial3

!

line con 0

exec-timeout 0 0

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password 7 071836

login

!

ntp clock-period 17179258

ntp server 10.48.64.100

end

Cisco 2500 (Namur)

hostname namur

!

logging buffered 150000 debugging

enable password 7 120E12

!

dspu host OZDEN xid-snd 00000000 x25 2224 qllc 12 interface Serial1

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 555

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 12

dspu start OZDEN

!

interface TokenRing0

no ip address

no ip directed-broadcast

shutdown

!

Cisco 4000 (Goode)

dspu host GOODE xid-snd 11132323 x25 123456789012345 qllc 20 interface Serial1

!

interface Ethernet0

ip address 10.48.64.17 255.255.255.0

no ip directed-broadcast

media-type 10BaseT

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 666

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 20

dspu start GOODE

!

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está ativa.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show llc2 —Exibe as conexões LLC2 ativas no roteador.

- show version — Exibe informações sobre a versão do software.

- show dlsw peer — Exibe informações de conexão de peer dlsw.

- show dlsw circuit detail — Exibe os detalhes do circuito DLSW.

- show qllc serial 0/1 —Exibe informações sobre o QLLC serial 0/1.

- show x25 interface serial 0/1 —Exibe o status da linha e do protocolo na interface serial 0/1 do X.25.

- show x25 route — Exibe a tabela de roteamento X.25.

- show x25 interface serial 0 — Exibe o status da linha e do protocolo na interface serial X.25 0.

- show dspu — Exibe o status do recurso DSPU.

- show x25 interface serial 1 —Exibe o status da linha e do protocolo na interface serial X.25 1.

Meatfeast

#show llc2

....

Channel4/2 DTE: 4000.7507.ffff 4000.2222.0000 04 04 state NORMAL

V(S)=1, V??)=1, Last N??)=1, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5430/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Channel4/2 DTE: 4000.7507.0000 4000.3333.0000 04 04 state NORMAL

V(S)=6, V??)=6, Last N??)=6, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5630/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Pathos

pathos#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.2(6a), RELEASE SOFTWARE (fc1)

Copyright ??) 1986-2001 by cisco Systems, Inc.

Compiled Sat 01-Dec-01 22:30 by pwade

Image text-base: 0x80008088, data-base: 0x810616B4

pathos#show dlsw peer

Peers:                state     pkts_rx   pkts_tx  type  drops ckts TCP   uptime

TCP 10.48.64.75     CONNECT        118        91  conf      0    2   0 00:32:12

Total number of connected peers: 1

Total number of connections:     1

pathos#show dlsw circuit detail

Index           local addr(lsap)    remote addr(dsap)  state          uptime

234881048       4000.2222.0000(04)  4000.7507.ffff(04) CONNECTED      00:29:50

PCEP: 81C25730   UCEP: 81D88528

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:19; Rx CW:20, Granted:39; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             429/453        Info-frames:           1/1

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

1426063385      4000.3333.0000(04)  4000.7507.0000(04) CONNECTED      00:29:49

PCEP: 81D081B4   UCEP: 81D108B0

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:34; Rx CW:20, Granted:34; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             554/513        Info-frames:           6/6

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

Total number of circuits connected: 2

pathos#show qllc serial 0/1

Interface Serial0/1

vc 2 66620

Circuit State P4/D1, Logical Link State QLOpened 4000.3333.0000(04)->4000.7507.0000(04)

0 packets held

vc 1 55512

Circuit State P4/D1, Logical Link State QLOpened 4000.2222.0000(04)->4000.7507.ffff(04)

0 packets held

pathos#

pathos#show x25 interface  serial 0/1

SVC 1,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 55512 <-->

qllc 4000.2222.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 66620 <-->

qllc 4000.3333.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

pathos#

Nesle

nesle#show x25 route

#  Match                         Substitute          Route to

1  input-int Serial2                                 Serial0

2  input-int Serial3                                 Serial0

3  dest 555                                          Serial2

4  dest 666                                          Serial3

nesle#show x25 interface serial 0

SVC 1,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 55512 <--> 2224 from Serial2 SVC 10

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 66620 <--> 123456789012345 from Serial3 SVC 1024

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 2

SVC 10,  State: D1,  Interface: Serial2

Started 00:32:51, last input 00:32:50, output 00:32:50

Connects 55512 <--> 2224 to Serial0 SVC 1

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 3

SVC 1024,  State: D1,  Interface: Serial3

Started 00:32:53, last input 00:32:52, output 00:32:52

Connects 66620 <--> 123456789012345 to Serial0 SVC 2

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

Namur

namur#show dspu

dspu host OZDEN Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 8 FRAMES SENT 8

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 0

namur#show x25 interface serial 1

SVC 10,  State: D1,  Interface: Serial1

Started 00:34:55, last input 00:34:54, output 00:34:54

Connects 2224 <-->

qllc

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

namur#

Goode

goode#show dspu

dspu host GOODE Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 18 FRAMES SENT 18

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 5

goode#show x25 interface serial 1

SVC 1024,  State: D1,  Interface: Serial1

Started 00:41:25, last input 00:41:25, output 00:41:25

Connects 123456789012345 <-->

qllc

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

goode#

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Página de suporte da tecnologia DLSw+ (Data-Link Switching Plus)

- Suporte à tecnologia IBM

- Suporte Técnico e Documentação - Cisco Systems