Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

O objetivo deste original é configurar uma Interface de taxa básica (BRI, Basic Rate Interface) ISDN para discar e transportar tráfego para um local remoto em caso de uma falha lógica do circuito do Frame Relay.

O Protocolo de Roteamento IGRP Melhorado (Enhanced IGRP) não está em execução nas BRIs. Em vez disso, o exemplo neste documento usará rotas estáticas flutuantes para redirecionar o tráfego pela BRI apenas se as rotas normais aprendidas por meio do Protocolo de Roteamento IGRP Melhorado (Enhanced IGRP) pelo circuito Frame Relay forem perdidas.

Em todos os roteadores, assegure-se de que ip classless esteja habilitado.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Essas configurações são trechos das configurações completas.

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Figura 1 – Diagrama da Rede

Configurações

Este documento utiliza as seguintes configurações:

- Roteador de Camada de Distribuição nº 1

- Roteador da camada de distribuição #2

- Roteador da camada de acesso

- Roteador de estação remota

O roteador C194u é um dos dois roteadores de camada de distribuição. Neste exemplo, o roteador C194u tem a BRI no local remoto. O outro roteador de camada de distribuição, C194n, tem a interface serial anexa no lado remoto.

Roteador de Camada de Distribuição nº 1

hostname c194u

!

!--- Create a username for the router at the remote site.

username c194s password 7 XXXXXXXX

!

ip subnet-zero

isdn switch-type basic-dms100

!

interface Loopback0

ip address 192.168.11.141 255.255.255.252

!

interface Ethernet0

ip address 163.241.222.93 255.255.255.0

media-type 10BaseT

!

interface BRI0

description to Remote Site c194s, (this end 08358662 08358664)

ip address 192.168.11.138 255.255.255.252

no ip mroute-cache

encapsulation ppp

no ip route-cache

isdn spid1 0835866201

isdn spid2 0835866401

dialer idle-timeout 600

dialer wait-for-carrier-time 10

dialer map ip 192.168.11.137 name c194s broadcast 8358661

dialer map ip 192.168.11.137 name c194s broadcast 8358663

dialer hold-queue 5

dialer load-threshold 128  outbound

dialer-group 1

no fair-queue

ppp authentication chap

ppp multilink

!

router eigrp 65535

!--- We redistribute the static routes listed below, so if the Frame Relay !--- network fails, the other routers in this autonomous system (AS) will !--- begin to see the remote networks advertised from this router. !--- Normally these routes are learned through EIGRP across the Frame Relay link. !--- Make the BRI interfaces passive. An alternative is to use a dialer-list !--- to identify EIGRP packets as "uninteresting" packets.

redistribute static

passive-interface BRI0

network 192.168.11.0

network 163.241.0.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!--- Both distribution layer routers have a default route to their Null !--- interfaces so that they advertise the 0/0 network to all other routers !--- in the AS.

ip route 0.0.0.0 0.0.0.0 Null0

!--- There must be a static route for each network behind the C194s !--- router at the remote site. Use the IP address of the BRI interface !--- of router C194s, and ensure that the administrative distance is 240. !--- Note: Summarize these routes if your addressing scheme lends itself !--- to summarization. If the Frame Relay network fails, this will force !--- packets destined to the remote site out the BRI interface, and will cause !--- it to dial and restore connectivity.

ip route 192.168.11.0 255.255.255.224 192.168.11.137 240

ip route 192.168.11.32 255.255.255.224 192.168.11.137 240

ip route 192.168.11.64 255.255.255.224 192.168.11.137 240

ip route 192.168.11.132 255.255.255.252 192.168.11.137 240

!

access-list 100 deny   icmp any any

access-list 100 permit ip any any

dialer-list 1 protocol ip list 100

!

end

Aqui está uma saída de comando show dialer para o roteador C194u:

Roteador de Camada de Distribuição nº 1

c194u#show dialer

BRI0 - dialer type = ISDN

Dial String      Successes   Failures    Last called   Last status

8358663                  4       1311    01:32:08           failed

8358661               1874       1315    00:02:07       successful

0 incoming call(s) have been screened.

BRI0:1 - dialer type = ISDN

Idle timer (600 secs), Fast idle timer (20 secs)

Wait for carrier (5 secs), Re-enable (15 secs)

Dialer state is physical layer up

Dial reason: ip (s=192.168.11.138, d=192.168.11.137)

O roteador seguinte, C194n, é o segundo roteador da camada de distribuição. Nesta ilustração, ele é o roteador de link do frame. Ele não tem nenhuma configuração especial. Ele tem apenas a rota padrão redistribuída no Protocolo de Roteamento IGRP Melhorado (Enhanced IGRP).

Roteador da camada de distribuição #2

hostname c194n

!

!

interface Ethernet0

ip address 163.241.222.98 255.255.255.0

!

interface Serial1

no ip address

bandwidth 1544

no ip mroute-cache

encapsulation frame-relay

no fair-queue

!

interface Serial1.301 point-to-point

ip address 192.168.11.130 255.255.255.252

bandwidth 32

frame-relay interface-dlci 301

!

router eigrp 65535

redistribute static

network 192.168.11.0

network 163.241.0.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

ip route 0.0.0.0 0.0.0.0 Null0

!

O próximo roteador, C194s, é o roteador do site remoto, o roteador da camada de acesso. Ele conecta a rede remota ao backbone por meio do roteador da camada de distribuição.

Roteador da camada de acesso

!

hostname c194s

!

!--- Create a username for the distribution layer router.

username c194u password 7 XXXXXXXXX

!

isdn switch-type basic-dms100

!

interface Loopback0

ip address 192.168.11.133 255.255.255.252

!

interface Ethernet0

ip address 192.168.11.2 255.255.255.224

!

interface Serial0

no ip address

bandwidth 64

encapsulation frame-relay

!

interface Serial0.300 point-to-point

ip address 192.168.11.129 255.255.255.252

bandwidth 32

frame-relay interface-dlci 300

!

interface BRI0

description to Hub Site c194u, (this end 08358661 08358663)

ip address 192.168.11.137 255.255.255.252

no ip mroute-cache

encapsulation ppp

no ip route-cache

isdn spid1 0835866101

isdn spid2 0835866301

dialer idle-timeout 600

dialer wait-for-carrier-time 10

dialer map ip 192.168.11.138 name c194u broadcast 8358662

dialer map ip 192.168.11.138 name c194u broadcast 8358664

dialer hold-queue 5

dialer load-threshold 128

dialer-group 1

no fair-queue

ppp multilink

ppp authentication chap

!

router eigrp 65535

!--- Redistribute the static route, so any routers which you could have attached !--- to the Ethernet network 192.168.11.0/27 will see this router as their way !--- out to the remainder of the network. However, do not allow this default !--- route back into your distribution layer routers. Use a distribute list !--- to block the advertisement.

redistribute static

passive-interface BRI0

network 192.168.11.0

default-metric 64 200 255 1 1500

distribute-list 2 out Serial0.300

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!--- Use the IP address of the BRI interface of the distribution layer router to !--- Add a default route. When the frame network goes down, this will !--- push your traffic out the BRI interface, and cause it to dial and !--- restore connectivity.

ip route 0.0.0.0 0.0.0.0 192.168.11.138 240

!

access-list 1 permit any

!

access-list 2 deny   0.0.0.0

access-list 2 permit any

!

dialer-list 1 protocol ip list 1

!

end

!

O roteador seguinte representa a rede de local remoto. Nada de especial precisa ser feito aqui. Basta informar, no IGP Dynamic Routing Protocol, EIGRP, o roteador de camada de acesso.

Roteador de estação remota

hostname c194ec

!

!

interface Loopback0

ip address 192.168.11.65 255.255.255.224

!

interface Ethernet0

ip address 192.168.11.1 255.255.255.224

!

interface Ethernet1

ip address 192.168.11.33 255.255.255.224

!

!

router eigrp 65535

network 192.168.11.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!

end

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Com a rede Frame Relay desativada, tente um traceroute a partir da rede no local remoto. Com base no diagrama de rede (consulte a figura 1), o endereço IP de destino é a interface de loopback do roteador de local de hub.

c194ec#trace

Target IP address: 192.168.11.141

Source address: 192.168.11.65

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2  *  *  *

3  *  *

192.168.11.138 24 msec

Observe como ele exigiu diversos pacotes para ativar a interface BRI. Emita o comando traceroute novamente, antes da BRI ficar inativa e os pacotes serem perdidos:

c194ec#traceroute 192.168.11.141

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2 192.168.11.138 20 msec *  20 msec

Reative o switch de frame. Com a rede Frame Relay agora operacional, você não usa ISDN:

c194ec#traceroute 192.168.11.141

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2 192.168.11.130 36 msec 36 msec 32 msec

3 163.241.222.93 36 msec *  32 msec

As tabelas de roteamento da rede Frame Relay operacional são mostradas abaixo. Observe como as rotas individuais são aprendidas com o Protocolo de Roteamento IGRP Melhorado (Enhanced IGRP) para redes no local de hub. Também há uma rota padrão aprendida com o Protocolo de Roteamento IGRP Melhorado (Enhanced IGRP).

c194ec#show ip route

Gateway of last resort is 192.168.11.2 to network 0.0.0.0

163.241.0.0 255.255.255.0 is subnetted, 1 subnets

D       163.241.222.0 [90/2221056] via 192.168.11.2, 00:02:09, Ethernet0

192.168.11.0 is variably subnetted, 7 subnets, 2 masks

C       192.168.11.64 255.255.255.224 is directly connected, Loopback0

C       192.168.11.32 255.255.255.224 is directly connected, Ethernet1

C       192.168.11.0 255.255.255.224 is directly connected, Ethernet0

D       192.168.11.128 255.255.255.252

[90/2195456] via 192.168.11.2, 00:02:13, Ethernet0

D       192.168.11.132 255.255.255.252

[90/409600] via 192.168.11.2, 01:23:14, Ethernet0

D       192.168.11.136 255.255.255.252

[90/40537600] via 192.168.11.2, 01:23:14, Ethernet0

D       192.168.11.140 255.255.255.252

[90/2349056] via 192.168.11.2, 00:02:10, Ethernet0

D*EX 0.0.0.0 0.0.0.0 [170/40614400] via 192.168.11.2, 00:02:10, Ethernet

As tabelas de roteamento para quando a rede Frame Relay estiver desativada são mostradas abaixo. Ainda há uma rota padrão, mas algumas rotas de redes individuais novamente no local de hub são perdidas. Mas como ip classless está habilitado e você tem uma rota padrão, ainda assim você chegará a qualquer lugar na rede.

c194ec#show ip route

Gateway of last resort is 192.168.11.2 to network 0.0.0.0

192.168.11.0 is variably subnetted, 5 subnets, 2 masks

C       192.168.11.64 255.255.255.224 is directly connected, Loopback0

C       192.168.11.32 255.255.255.224 is directly connected, Ethernet1

C       192.168.11.0 255.255.255.224 is directly connected, Ethernet0

D       192.168.11.132 255.255.255.252

[90/409600] via 192.168.11.2, 01:25:27, Ethernet0

D       192.168.11.136 255.255.255.252

[90/40537600] via 192.168.11.2, 01:25:27, Ethernet0

D*EX 0.0.0.0 0.0.0.0 [170/40076800] via 192.168.11.2, 00:00:15, Ethernet

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte Técnico - Cisco Systems