Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Roteador 1

Switch de ATM

Troubleshoot

Informações Relacionadas

Introduction

O FR (Frame Relay ) para a função de entrelaçamento de serviço ATM permite a comunicação entre um usuário final FR e um usuário final ATM. Baseia-se no acordo de implementação Frame Relay Forum (FRF.8) , que especifica que uma estação final FR pode comunicar com uma estação terminal ATM, desde que haja um roteador executando as especificações fornecidas em FRF.8 no software entre as duas estações finais.

Este documento apresenta um exemplo de configuração de entrelaçamento de serviço FR para ATM usando FRF.8 (modo tradução) no LightStream 1010. Essa configuração funciona também no Catalyst 8510 MSR ou no 8540 MSR.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas no Cisco IOS® versão 12.0(3c)W5(9).

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Os parâmetros de modelagem de tráfego FR usados nesse exemplo de configuração do Roteador 1 são:

- Taxa de informações comprometidas (CIR) = 64 kbps

- Intermitência comprometida (Bc) = 8000

- Intermitência excedente (Be) = 8000

Observação: para obter uma explicação detalhada sobre como solucionar problemas de conexões de modelagem de tráfego do Frame Relay, consulte Comandos show para modelagem de tráfego do Frame Relay.

Configurações

Este documento utiliza as seguintes configurações:

- Roteador 1

- Switch de ATM

- Roteador 2

Observação: essas configurações contêm informações relevantes somente para o entrelaçamento de serviço do Frame Relay com ATM.

Roteador 1

controller E1 5/0

channel-group 30 timeslots 1-31

!

interface Serial5/0:30

ip address 12.12.12.2 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay IETF

!--- The FR encapsulation used is IETF. It should match the switch.

no fair-queue

frame-relay traffic-shaping

!--- Enabling FR traffic shaping on this interface.

frame-relay class test-iwf

frame-relay map ip 12.12.12.1 123 broadcast

!

map-class frame-relay test-iwf

no frame-relay adaptive-shaping

!--- Traffic shaping parameters configured.

frame-relay cir 64000

frame-relay bc 8000

frame-relay be 8000

Switch de ATM

frame-relay connection-traffic-table-row index 123 64000

8000 128000 8000 vbr-nrt 123

!

controller E1 4/0/0

clock source free-running

channel-group 30  timeslots 1-31

!

interface Serial4/0/0:30

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

!--- The FR encapsulation used is IETF.

no arp frame-relay

frame-relay intf-type dce

!--- Interface type is dce, because it is providing clocking.

frame-relay pvc 123 rx-cttr 123 tx-cttr 123 service translation

interface  ATM0/0/0 0 123

!--- This command makes the translation from !--- Frame Relay to ATM PVC 123.

Roteador 2

interface ATM2/0.123 point-to-point

ip address 12.12.12.1 255.255.255.0

no ip directed-broadcast

pvc 0/123

!--- Configured ATM PVC 0/123 with traffic shaping and !--- oam-pvc management enabled.

vbr-nrt 163 81 49

broadcast

oam-pvc manage

encapsulation aal5snap

Os parâmetros de modelagem de tráfego no Roteador 2 podem ser obtidos da tabela de tráfego de conexão do Frame Relay no Switch ATM (consulte a seção).

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show frame-relay lmi

- show frame-relay map

- show frame-relay pvc

- show atm vc interface atm 0/0/0

- show frame-relay connection-traffic-table-row

- show atm connection-traffic-table

- show frame-relay interface resource serial 4/0/0:30 all-information

A saída mostrada abaixo é um resultado da inserção dos comandos acima nos dispositivos mostrados no diagrama de rede. Esta saída mostra que a rede está operando adequadamente.

Roteador 1

Observação: ao conectar um roteador Cisco a uma conexão de terceiros, é preferível usar a Interface de Gerenciamento Local (LMI - Local Management Interface) da IETF (Internet Engineering Task Force). Notice that the LMI is Cisco and the Frame Relay is DTE as it is receiving clocking from the Switch.

Router1# show frame-relay lmi

LMI Statistics for interface Serial5/0:30 (Frame Relay DTE) LMI TYPE = CISCO

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 1222             Num Status msgs Rcvd 1222

Num Update Status Rcvd 0              Num Status Timeouts 2

Para verificar se dlci está ativado e mapeado para o endereço IP correspondente, use o comando show frame-relay map.

Router1# show frame-relay map

Serial5/0:30 (up): ip 12.12.12.1 dlci 123(0x7B,0x1CB0), static,

broadcast,

IETF, status defined, active

Para verificar o status do pvc do Frame Relay, use o comando show frame-relay pvc. Na saída abaixo, podemos ver que ele está ativo.

Router1# show frame-relay pvc

PVC Statistics for interface Serial5/0:30 (Frame Relay DTE)

Active     Inactive      Deleted       Static

Local          1            0            0            0

Switched       0            0            0            0

Unused         0            0            0            0

DLCI = 123, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = Serial5/0:30

input pkts 786           output pkts 549          in bytes 742312

out bytes 684503         dropped pkts 6           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 1          out bcast bytes 608

pvc create time 03:25:16, last time pvc status changed 03:09:30

Switch de ATM

Observação: o termo ATM-PX/Y/Z se refere à pseudo interface.

ATMswitch# show atm vc interface atm 0/0/0

Interface         VPI  VCI   Type   X-Interface      X-VPI X-VCI Encap  Status

ATM0/0/0          0    5     PVC    ATM2/0/0          0    43    QSAAL  UP

ATM0/0/0          0    16    PVC    ATM2/0/0          0    35    ILMI   UP

ATM0/0/0          0    101   PVC    ATM0/1/0          0    101          UP

ATM0/0/0          0    102   PVC    ATM0/1/0          0    102          UP

ATM0/0/0          0    123   PVC    ATM-P4/0/0        30   155          UP

Para exibir as conexões Frame Relay com ATM no switch, use o comando show frame-relay connection-traffic-table-row, como mostrado abaixo:

ATMswitch# show frame-relay connection-traffic-table-row

Row            cir      bc     be      pir      fr-atm Service-category    ATM Row

100           64000   32768   32768   64000            vbr-nrt              100

123           64000   8000    8000    128000           vbr-nrt              123

ATMswitch# show atm connection-traffic-table

Row      Service-category    pcr        scr/mcr       mbs         cdvt

1            ubr          7113539        none                     none

2            cbr              424                                 none

3            vbr-rt           424         424          50         none

4            vbr-nrt          424         424          50         none

5            abr              424           0                     none

6            ubr              424        none                     none

10           cbr            50000                                 none

11           cbr             1000                                 none

12           cbr            11700                                 none

100          vbr-nrt           81          81-0        50         none

123          vbr-nrt          163          81-0        49         none

<-- (*)

2147483645*  ubr                0        none                     none

2147483646*  ubr                1        none                     none

2147483647*  ubr          7113539        none                     none

(*) Ao criar a linha da tabela de tráfego de conexão de frame-relay, você associa um índice de linha de tabela ATM ao local em que os parâmetros de modelagem de tráfego ATM são automaticamente calculados com a especificação da Interface entre portadoras de banda larga (B-ICI), V2.0 (Ver fórmulas).

ATMswitch# show frame-relay interface resource serial 4/0/0:30 all-information

Encapsulation: FRAME-RELAY

Resource Management configuration:

Input queues (PAM to switch fabric):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Output queues (PAM to line):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Overflow servicing for VBR: enabled

Available bit rates (in bps):

1920000 vbr-nrt RX, 1920000 vbr-nrt TX

1920000 abr RX,     1920000 abr TX

1920000 ubr RX,     1920000 ubr TX

Overbooking: disabled

Resource Management state:  Allocated bit rates (in bps):

64000 vbr-nrt RX, 64000 vbr-nrt TX

0 abr RX,     0 abr TX

0 ubr RX,     0 ubr TX

Actual allocated bit rates (in bps):

64000 vbr-nrt RX, 64000 vbr-nrt TX

0 abr RX,     0 abr TX

0 ubr RX,     0 ubr TX

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte à tecnologia de interfuncionamento ATM para Frame Relay

- Suporte à tecnologia ATM