Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

A função de interfuncionamento de rede Frame Relay para ATM permite que o tráfego Frame Relay seja transportado através de uma rede ATM. Com base no acordo de implementação do Frame Relay Forum (FRF.5) , ele permite que duas estações finais do Frame Relay se comuniquem entre si através de uma rede ATM.

Este documento apresenta uma configuração de amostra de conexão entre redes Frame Relay e ATM usando FRF.5 no LightStream 1010. Essa configuração funciona também no Catalyst 8510 MSR ou no 8540 MSR.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações contidas neste documento são baseadas no software Cisco IOS® versão 12.0(3c)W5(9).

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Os parâmetros de modulagem de tráfico dinâmico de Frame Relay utilizados neste exemplo de configuração são:

- Taxa de informações comprometidas (CIR) = 64 kbps

- Intermitência comprometida (Bc) = 8000

- Intermitência excedente (Be) = 8000

Configurações

Este documento utiliza as seguintes configurações:

- Roteador 1

- Switch de ATM 1

- Switch de ATM 2

- Roteador 2

Observação: as configurações a seguir contêm apenas informações relevantes.

Roteador 1

controller E1 5/0

channel-group 1 timeslots 1-15

!

interface Serial5/0:1

ip address 13.13.13.2 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay

no fair-queue

frame-relay traffic-shaping

frame-relay class test-iwf

frame-relay map ip 13.13.13.1 124

!

map-class frame-relay test-iwf

no frame-relay adaptive-shaping

frame-relay cir 64000

frame-relay bc 8000

frame-relay be 8000

Switch de ATM 1

!

controller E1 4/0/0

clock source free-running

channel-group 1 timeslots 1-15

!

interface Serial4/0/0:1

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

no arp frame-relay

frame-relay intf-type dce

frame-relay pvc 124 rx-cttr 124 tx-cttr 124 network interface ATM0/1/1 0 124

Switch de ATM 2

frame-relay connection-traffic-table-row index 124 64000 8000 128000 8000 abr 124

!

controller E1 4/1/0

channel-group 1  timeslots 1-15

!

interface Serial4/1/0:1

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

no arp frame-relay

frame-relay intf-type dce

frame-relay pvc 124 rx-cttr 124 tx-cttr 124 network interface ATM0/1/1 0 124

Roteador 2

controller E1 4/0

channel-group 1 timeslots 1-15

!

interface Serial4/0:1

ip address 13.13.13.1 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay IETF

ip mroute-cache

frame-relay traffic-shaping

frame-relay class test-iwf

frame-relay map ip 13.13.13.2 124

!

map-class frame-relay test-iwf

frame-relay cir 64000

frame-relay bc 8000

frame-relay be 8000

no frame-relay adaptive-shaping

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show frame connection-traffic-table-row

- show atm connection-traffic-table

- show atm vc interface atm 0/1/1

- show frame-relay interface resource serial 4/0/0:1 all-information

O resultado abaixo mostrado corresponde à emissão desses comandos nos dispositivos exibidos no diagrama de rede. Esta saída mostra que a rede está operando adequadamente.

Observação: o termo ATM-PX/Y/Z significa pseudo interface.

ATMswitch1# show frame-relay connection-traffic-table-row

Row           cir       bc      be      pir      fr-atm Service-category      ATM Row

124          64000     8000    8000    128000               abr                124

ATMswitch1# show atm connection-traffic-table

Row      Service-category    pcr        scr/mcr       mbs        cdvt

124          abr             173          90                     none

ATMswitch1# show atm vc interface atm 0/1/1

Interface         VPI  VCI   Type   X-Interface      X-VPI X-VCI Encap  Status

ATM0/1/1          0    5     PVC    ATM2/0/0          0    48    QSAAL  UP

ATM0/1/1          0    16    PVC    ATM2/0/0          0    40    ILMI   UP

ATM0/1/1          0    18    PVC    ATM2/0/0          0    74    PNNI   UP

ATM0/1/1          0    34    PVC    ATM2/0/0          0    73    NCDP   UP

ATM0/1/1          0    124   PVC    ATM-P4/0/0        1    156          UP

ATMswitch1# show frame-relay interface resource serial 4/0/0:1 all-information

Encapsulation: FRAME-RELAY

Resource Management configuration:

Input queues (PAM to switch fabric):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Output queues (PAM to line):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Overflow servicing for VBR: enabled

Overbooking: disabled

Resource Management state:

Available bit rates (in bps):

896000 vbr-nrt RX, 896000 vbr-nrt TX

896000 abr RX, 896000 abr TX

896000 ubr RX, 896000 ubr TX

Allocated bit rates (in bps):

0 vbr-nrt RX, 0 vbr-nrt TX

64000 abr RX, 64000 abr TX

0 ubr RX, 0 ubr TX

Actual allocated bit rates (in bps):

0 vbr-nrt RX, 0 vbr-nrt TX

64000 abr RX, 64000 abr TX

0 ubr RX, 0 ubr TX

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Frame Relay Forum (FRF.5)

- Suporte à tecnologia de interfuncionamento ATM para Frame Relay

- Suporte à tecnologia ATM

- Suporte Técnico e Documentação - Cisco Systems