Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Diagrama de Rede

Conventions

Configurar a autenticação RADIUS através do procedimento do mecanismo de cache

Verificar

Troubleshoot

Comandos para Troubleshooting

Informações Relacionadas

Introduction

Este documento fornece instruções sobre como configurar a autenticação RADIUS através do Cache Engine para o Cisco Secure Access Control Server (ACS) para Microsoft Windows NT. Você deve estar executando o protocolo WCCP versão 2 (Web Cache Communication Protocol versão 2) para seguir corretamente este procedimento. Consulte Configuração do Protocolo de Comunicação de Cache Web Versão 2 em um Cisco Cache Engine e Router para obter mais informações sobre o WCCP versão 2.

Prerequisites

Requirements

Antes de tentar esta configuração, verifique se estes requisitos são atendidos:

- Familiaridade com o Cisco Secure ACS para Windows ou UNIX.

- Familiaridade com a configuração do WCCPv2 no roteador e no mecanismo de cache.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Cisco Cache Engine 505 em um ambiente de laboratório com configurações limpas

- Cisco 2600 Router

- Software Cisco Cache Engine versão 2.31

- Software Cisco IOS® versão 12.1(3)T 3

- Cisco Secure ACS para servidores Microsoft Windows NT/2000

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar a autenticação RADIUS através do procedimento do mecanismo de cache

Siga estes passos para configurar o Cache Engine para autenticação RADIUS:

1. Configure o Cache Engine como o NAS (Network Access Server, servidor de acesso à rede) no Cisco Secure ACS para Windows NT.

2. Configure as informações do usuário no Cisco Secure ACS para Windows NT.

3. Configure o Cache Engine para RADIUS e especifique o host e as informações-chave.

radius-server host 172.18.124.106

radius-server key cisco123

4. Configure o roteador para WCCP.

Suas linhas de comando para o Cache Engine devem ser semelhantes a esta:

cepro#configure terminal

!--- Enter configuration commands, one per line. !--- End with CNTL/Z.

cepro(config)#radius-server host 172.18.124.106

cepro(config)#radius-server key cisco123

cepro#

Esta é a configuração do Cache Engine/NAS no Cisco Secure ACS para Windows NT:

Esta é a página User Setup no Cisco Secure ACS para Windows NT:

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Comandos do Cache Engine:

- show version — Exibe a versão do software em execução no Cache Engine.

- show hardware — Exibe a versão do software e o tipo de hardware no Cache Engine.

- show running-config — Exibe a configuração atual em execução no Cache Engine.

- show stat http usage — Exibe as estatísticas de uso.

- show radius stat [all | primário | secondary ] — Exibe estatísticas de autenticação para os servidores RADIUS primário e secundário.

Este é um exemplo de saída do comando show version:

cepro#show version

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 33 seconds.

System booted from "flash"

Este é um exemplo de saída do comando show hardware:

cepro#show hardware

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 54 seconds.

System booted from "flash"

Cisco Cache Engine CE505 with CPU AMD-K6 (model 8) (rev. 12) AuthenticAMD

2 Ethernet/IEEE 802.3 interfaces

1 Console interface.

134213632 bytes of Physical Memory

131072 bytes of ROM memory.

8388608 bytes of flash memory.

List of disk drives:

/c0t0d0  (scsi bus 0, unit 0, lun 0)

Este é um exemplo de saída do comando show running-config:

cepro#show running-config

Building configuration...

Current configuration:

!

!

logging recycle 64000

logging trap information

!

user add admin uid 0  password 1 "eeSdy9dcy"  capability admin-access

!

!

!

hostname cepro

!

interface ethernet 0

ip address 10.27.2.2 255.255.255.0

ip broadcast-address 10.27.2.255

exit

!

!

interface ethernet 1

exit

!

ip default-gateway 10.27.2.1

ip name-server 161.44.11.21

ip name-server 161.44.11.206

ip domain-name cisco.com

ip route 0.0.0.0 0.0.0.0 10.27.2.1

cron file /local/etc/crontab

!

bypass timer 1

!--- Specify the router list for use with WCCPv2.

wccp router-list 1 10.27.2.1 172.18.124.211

!--- Instruct the router to run web cache service with WCCPv2.

wccp web-cache router-list-num 1

!--- WCCPv2 enabled.

wccp version 2

!

!--- RADIUS Server host and port is defined.

radius-server host 172.18.124.106 auth-port 1645

radius-server host 172.18.124.103 auth-port 1645

!--- RADIUS key defined.

radius-server key ****

authentication login local enable

authentication configuration local enable

transaction-logs enable

rule no-cache url-regex .*cgi-bin.*

rule no-cache url-regex .*aw-cgi.*

!

!

end

cepro#

Comandos do roteador:

- show running-config — Exibe a configuração atual em execução no roteador.

- show ip wccp — Exibe todos os serviços registrados.

- show ip wccp <service-id> detail — Exibe a distribuição de tempo do WCCP para cada cache no cluster. Por exemplo, show ip wccp web-cache detail.

Este é um exemplo de saída do comando show running-config:

33-ns-gateway#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 33-Ns-gateway

!

logging buffered 64000 debugging

enable secret 5 $1$IWJr$nI.NcIr/b9DN7jEQQC17R/

!

!

!

!

!

ip subnet-zero

!--- WCCP enabled.

ip wccp web-cache

ip cef

no ip domain-lookup

ip domain-name testdomain.com

ip name-server 161.44.11.21

ip name-server 161.44.11.206

!

!

!

!

interface Ethernet0/0

ip address 10.1.3.50 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/0

description interface to the CE .5

bandwidth 100

ip address 10.27.2.1 255.255.255.0

full-duplex

!

interface Ethernet1/1

description inter to DMZ

ip address 172.18.124.211 255.255.255.0

!--- Configure the interface to enable the router !--- to verify that the appropriate !--- packets are redirected to the cache engine.

ip wccp web-cache redirect out

no ip route-cache cef

no ip route-cache

no ip mroute-cache

!

interface Ethernet1/2

description Preconfigured for recreates 10.27.3.0/24 net

ip address 10.27.3.1 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/3

no ip address

shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.18.124.1

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password ww

login

!

end

33-Ns-gateway#

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Comandos para Troubleshooting

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Observação: antes de emitir comandos debug, consulte Informações importantes sobre comandos debug.

Comandos do Cache Engine:

- debug authentication all — Depura a autenticação.

- debug radius all —Exibe a depuração do módulo RADIUS da interface da Web.

- type var/log/translog/working.log —Verifica se os URLs estão armazenados em cache e se o usuário acessa as páginas. Qualquer outro tipo de mensagem deve ser encaminhado ao Suporte Técnico da Cisco para esclarecimento. O tipo mais comum de mensagens de erro neste registro é falha na autenticação devido a um utilizador desconhecido ou à chave incorreta do servidor.

Este é um exemplo de saída do comando debug radius all e do comando debug authentication all:

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-Port = 80

[82] NAS-Port = 80

[82] NAS-Port = 80

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

Comando do roteador:

- show ip wccp —Exibe estatísticas globais de WCCP.

Informações Relacionadas

- Melhorias de WCCP

- Protocolo de comunicação de cache de Web versão 2

- Suporte Técnico - Cisco Systems