Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Verwante producten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Uitvoer voorbeeld

Problemen oplossen

Bronnen voor probleemoplossing

Opdrachten voor troubleshooting

Voorbeeld van output van foutopsporing

Gerelateerde informatie

Inleiding

Multilink PPP (MLP) balanst over dialerinterfaces, zoals ISDN, synchrone en asynchrone interfaces. MLP versplintert pakketten en stuurt de fragmenten via parallelle circuits. Op deze manier verbetert MLP de doorvoersnelheid en vermindert het de latentie tussen systemen. MLP biedt een methode om datagrammen te splitsen, te recombineren en te sequensen over meerdere logische gegevenslinks. MLP staat pakketten toe om te fragmenteren, en de fragmenten om tegelijkertijd over meerdere point-to-point links naar hetzelfde externe adres te worden verzonden.

Dit document illustreert een multilink-verbinding tussen seriële interfaces via de configuratie van de virtuele sjabloon.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco IOS® softwarerelease 11.2 of hoger.

- Twee Cisco 2503 routers, die twee WAN-seriële interfaces elk hebben. Op deze routers wordt Cisco IOS-softwarerelease 12.2(7b) uitgevoerd.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Verwante producten

Deze configuratie kan ook worden gebruikt met deze hardware- en softwareversies.

- Om het even welke twee routers die twee WAN seriële interfaces hebben. U kunt WIC-1T, WIC-2T en vaste WAN-seriële interfaces gebruiken.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Gebruik het Opdrachtupgereedschap (alleen geregistreerde klanten) om meer informatie te vinden over de opdrachten die in dit document worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Routers Montecito en Goleta worden aangesloten terug-aan-terug door interfaces Seriële0 en Seriële1. Deze configuratie gebruikt een Virtual-sjabloon op elke kant, Multilink Point-to-Point Protocol (PPP), en bruggen en routes IP en IPX tussen de routers.

Configuraties

Dit document gebruikt deze configuraties:

- Montecito

- Goleta

Montecito

Montecito#write terminal

Building configuration...

Current configuration : 945 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Montecito

!

boot system flash c2500-d-l.122-7b.bin

no logging buffered

!

ip subnet-zero

no ip domain-lookup

!

!

multilink virtual-template 1

!--- Applies the virtual interface template to the multilink bundle. !--- All multilink calls have virtual-access interfaces cloned !--- from virtual-template 1.

!

ipx routing 0000.0c31.aac2

!

interface Loopback0

ip address 10.1.1.1 255.0.0.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!

!--- Virtual-template is a logical interface that creates virtual access !--- interfaces dynamically, and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

ppp multilink

!--- Enables Multilink PPP on the interface.

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

no ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

login

!

end

Goleta

Goleta#write terminal

Building configuration...

Current configuration : 960 bytes

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Goleta

!

!

ip subnet-zero

no ip domain-lookup

!

!

!--- Applies the virtual interface template to the multilink bundle. !--- Skip this step for ISDN or dialer interfaces.

multilink virtual-template 1

ipx routing 0000.0c47.4e9a

!

!

!

interface Loopback0

ip address 192.168.10.2 255.255.255.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!--- Virtual-template is a logical interface that Creates virtual access !--- interfaces dynamically and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

!

!--- Enables Multilink PPP on the interface.

ppp multilink

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

!

end

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt.

Het Uitvoer Tolk (uitsluitend geregistreerde klanten) (OIT) ondersteunt bepaalde show opdrachten. Gebruik de OIT om een analyse van tonen opdrachtoutput te bekijken.

- toon PPP multilink—geeft informatie weer over multilink bundels die actief zijn. Gebruik deze opdracht om de multilink-verbinding te controleren.

- De status van de interface virtuele toegang weergeven, verkeersgegevens en configuratieinformatie over een specifieke virtuele toegangsinterface.

- serie van de tonen interface - stelt u in staat om problemen met de seriële interface op te lossen

Uitvoer voorbeeld

Geef opdrachten op Montecito nadat de verbinding is gemaakt

Montecito#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (10.1.1.1)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:00, output never, output hang never

Last clearing of "show interface" counters 00:02:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

22 packets input, 743 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

8 packets output, 124 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Montecito#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:06, output hang never

Last clearing of "show interface" counters 02:04:30

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107170 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1483 packets output, 24622 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:04:32

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107161 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1482 packets output, 24646 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show ppp multilink

Virtual-Access1, bundle name is Goleta

Bundle up for 00:01:39

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x3D received sequence, 0xB sent sequence

Member links: 2 (max not set, min not set)

Serial1, since 00:01:40, last rcvd seq 00003C

Serial0, since 00:01:39, last rcvd seq 00003B

Montecito#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

Montecito#

Geef opdrachten op Goleta nadat de verbinding is gemaakt

Goleta#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (192.168.10.2)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:10, output never, output hang never

Last clearing of "show interface" counters 00:02:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

4 packets input, 52 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

28 packets output, 892 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Goleta#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:28, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2364 packets input, 41972 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4465 packets output, 134689 bytes, 0 underruns

0 output errors, 0 collisions, 148 interface resets

0 output buffer failures, 0 output buffers swapped out

294 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:38, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2366 packets input, 42030 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4472 packets output, 134930 bytes, 0 underruns

0 output errors, 0 collisions, 147 interface resets

0 output buffer failures, 0 output buffers swapped out

289 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#sh ppp multilink

Virtual-Access1, bundle name is Montecito

Bundle up for 00:01:35

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0xB received sequence, 0x3B sent sequence

Member links: 2 (max not set, min not set)

Serial0, since 00:01:36, last rcvd seq 00000A

Serial1, since 00:01:35, last rcvd seq 000009

Goleta#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

Problemen oplossen

Gebruik dit gedeelte om de configuratie van het probleem op te lossen.

Bronnen voor probleemoplossing

Gebruik deze bronnen voor probleemoplossing zoals vereist:

- Probleemoplossing voor seriële lijnproblemen

- HDLC Terug-naar-Back verbindingen

- Handelsposten voor probleemoplossing

Opdrachten voor troubleshooting

Het Uitvoer Tolk (uitsluitend geregistreerde klanten) (OIT) ondersteunt bepaalde show opdrachten. Gebruik de OIT om een analyse van tonen opdrachtoutput te bekijken.

Opmerking: Raadpleeg Belangrijke informatie over debug Commands voordat u debug-opdrachten gebruikt.

- debug PPP onderhandeling-wijst erop of een client PPP onderhandeling passeert. Controleer ook op adresonderhandeling.

- debug van PPP-authenticatie geeft aan of een client authenticatie passeert. Gebruik deze opdracht als u Cisco IOS-softwarerelease 11.2 of hoger gebruikt.

- debug ppketting-wijst erop of een client authenticatie passeert. Gebruik deze opdracht als u een Cisco IOS-softwarerelease eerder dan release 11.2 gebruikt.

- debug van PPP: toont protocol fouten en foutstatistieken die bij de verbindingsonderhandeling en -handeling in PPP zijn gekoppeld.

- debug Vsjabloon: hiermee kunt u zien welke configuraties met virtuele sjablonen worden gebruikt.

- debug vprofile-stelt u in staat te zien welke configuratieopties zijn toegepast op de virtuele toegang interface.

Voorbeeld van output van foutopsporing

Hier zijn een paar debug uitgangen voor succesvolle oproepen. Let op de gedeelte in vet lettertype. Vergelijk de output die u hier behaalt met het resultaat dat hier wordt getoond:

PPP-debugs op Montecito

Montecito#debug ppp negotiation

PPP protocol negotiation debugging is on

Montecito#

00:07:30: %LINK-3-UPDOWN: Interface Serial1, changed state to up

00:07:30: Se1 PPP: Treating connection as a dedicated line

00:07:30: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 2 load]

00:07:30: Se1 LCP: O CONFREQ [Closed] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: O CONFACK [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: State is Open

00:07:30: Se1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

00:07:31: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

00:07:31: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

00:07:31: %LINK-3-UPDOWN: Interface Serial0, changed state to up

00:07:31: Se0 PPP: Treating connection as a dedicated line

00:07:31: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

00:07:31: Se0 LCP: O CONFREQ [Closed] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

00:07:31: Vi1 PPP: Treating connection as a dedicated line

00:07:31: Vi1 LCP: O CONFREQ [Closed] id 1 len 26

00:07:31: Vi1 LCP:    MagicNumber 0x6063D8F9 (0x05066063D8F9)

00:07:31: Vi1 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Vi1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Vi1 PPP: Phase is UP [0 sess, 0 load]

00:07:31: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

00:07:31: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 MLP: Added first link Se1 to bundle Goleta

00:07:31: Se0 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se0 LCP: O CONFACK [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se1 BNCP: MLP bundle interface is built, process packets now

00:07:31: Se1 BNCP: Redirect packet to Vi1

00:07:31: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

00:07:31: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

00:07:31: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

00:07:31: Se0 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Se0 LCP: State is Open

00:07:31: Se0 PPP: Phase is VIRTUALIZED [0 sess, 2 load]

00:07:31: Vi1 MLP: Added link Se0 to bundle Goleta

00:07:31: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

00:07:31: Vi1 BNCP: State is Open

00:07:31: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPCP: State is Open

00:07:31: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 IPXCP: State is Open

00:07:31: Vi1 IPCP: Install route to 192.168.10.2

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Montecito#

Montecito#ping  192.168.10.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/9/12 ms

Montecito#ping ipx

Target IPX address: BEEF.0000.0c47.4e9a

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c47.4e9a,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Montecito#

PPP-debugs op Goleta

Goleta#debug ppp negotiation

PPP protocol negotiation debugging is on

Goleta#

01:00:26: Se0 PPP: Treating connection as a dedicated line

01:00:26: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:26: Se0 LCP: O CONFREQ [Closed] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: O CONFACK [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: State is Open

01:00:26: Se0 PPP: Phase is VIRTUALIZED [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

01:00:27: %LINK-3-UPDOWN: Interface Serial1, changed state to up

01:00:27: Se1 PPP: Treating connection as a dedicated line

01:00:27: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:27: Se1 LCP: O CONFREQ [Closed] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:00:27: Vi1 PPP: Treating connection as a dedicated line

01:00:27: Vi1 LCP: O CONFREQ [Closed] id 1 len 23

01:00:27: Vi1 LCP: MagicNumber 0x60944F10 (0x050660944F10)

01:00:27: Vi1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Vi1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:00:27: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

01:00:27: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 MLP: Added first link Se0 to bundle Montecito

01:00:27: Se1 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se1 LCP: O CONFACK [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se0 BNCP: MLP bundle interface is built, process packets now

01:00:27: Se0 BNCP: Redirect packet to Vi1

01:00:27: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

01:00:27: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

01:00:27: Se0 IPCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPCP: Redirect packet to Vi1

01:00:27: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Se0 IPXCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPXCP: Redirect packet to Vi1

01:00:27: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

01:00:27: Se1 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Se1 LCP: State is Open

01:00:27: Se1 PPP: Phase is VIRTUALIZED [0 sess, 4 load]

01:00:27: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

01:00:27: Vi1 BNCP: State is Open

01:00:27: Vi1 MLP: Added link Se1 to bundle Montecito

01:00:27: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPCP: State is Open

01:00:27: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 IPXCP: State is Open

01:00:27: Vi1 IPCP: Install route to 10.1.1.1

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

Goleta#

Goleta#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Goleta#ping ipx

Target IPX address: BEEF.0000.0c31.aac2

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c31.aac2,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Gerelateerde informatie

- Ondersteuning voor toegangstechnologie

- Technische ondersteuning en documentatie – Cisco Systems