Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Achtergrondinformatie

Configureren

Netwerkdiagram

Configuraties

Verifiëren

HP-UX host-opdrachten

MDS/IPS-8 opdrachten

Problemen oplossen

Fabric Manager- en apparaatbeheer

Inleiding

Cisco iSCSI-stuurprogramma’s, die op de server aanwezig zijn, zijn een belangrijk onderdeel van een iSCSI-oplossing. Deze iSCSI-stuurprogramma’s onderscheppen SCSI-interface (Small Computer System Interface), kapselen deze in IP-pakketten in en sturen deze opnieuw naar Cisco SN 5420, Cisco SN 5428, Cisco SN 5428-2 of Cisco MDS/IPS-8.This document biedt voorbeeldconfiguraties voor de HP-UX iSCSI-host naar SN 5428.

Voorwaarden

Vereisten

Zorg er voordat u deze configuratie probeert voor dat u aan deze vereisten voldoet:

- Installeer het iSCSI-stuurprogramma dat compatibel is met uw HP-UX versie. De meest recente versie van het stuurprogramma is te vinden op de downloadpagina van Cisco iSCSI driver (alleen geregistreerde klanten) op Cisco.com. Het bestand README.txt is in het zip-bestand (tar) van het stuurprogramma opgenomen. LEZEN bevat informatie over de licentieovereenkomst, de installatie- en configuratie-instructies van de bestuurder, en een technisch overzicht van de bestuurdersarchitectuur.

- De systeemvereisten en de patchvereisten worden beschreven in het gedeelte Systeemvereisten van het Cisco iSCSI-stuurprogramma voor HP-UX release Notes.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- HP-UX 9000/800 A500 server met twee processors.

N.B.: In dit laboratorium is er geen afzonderlijke Ethernet-adapter voor iSCSI en is de adapter in gebruik 100 Mb. In een realistische omgeving hebt u een afzonderlijke Gigabit Ethernet (GE) adapter(s) als uw iSCSI-initiator(en).

[/]#/opt/ignite/bin/print_manifest[...]

System Hardware

Model:              9000/800/A500-5X

Main Memory:        1024 MB

Processors:         2

OS mode:            64 bit

LAN hardware ID:    0x00306E1B6F51

Software ID:        586760518

Keyboard Language:  Not_Applicable

Storage devices                  HW Path      Interface

SEAGATE ST318404LC 17366 Mb      0/0/1/1.15.0 SCSI C896 Ultra Wide Single-Ended

SEAGATE ST318203LC 17366 Mb      0/0/2/1.15.0 SCSI C875 Ultra Wide Single-Ended

I/O Interfaces

Class          H/W Path       Driver         Description

lan            0/0/0/0        btlan3         HP PCI 10/100Base-TX Core

ext_bus        0/0/1/0        c720           SCSI C896 Ultra Wide LVD

ext_bus        0/0/1/1        c720           SCSI C896 Ultra Wide Single-Ended

ext_bus        0/0/2/0        c720           SCSI C875 Fast Wide Single-Ended

ext_bus        0/0/2/1        c720           SCSI C875 Ultra Wide Single-Ended

tty            0/0/4/0        asio0          PCI Serial (103c1048)

tty            0/0/5/0        asio0          PCI Serial (103c1048)

fc             0/2/0/0        td             HP Tachyon XL2 Fibre Channel Mass Storage Adapter

Installed Software

Your system was installed with HP-UX version B.11.00.

Your system has the following software products installed and

configured on the system disk drive(s).

Product          Revision          Description

A6795A           B.11.00.10        PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE           B.11.00           Patch Bundle

HPUXEng64RT      B.11.00.01        English HP-UX 64-bit Runtime Environment

HWE1100          B.11.00.0203.5    Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag       B.11.00.20.09     HPUX 11.0 Support Tools Bundle, Mar 2002

UXCoreMedia      B.11.00.02        HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic     B.11.00.02        HP-UX Unlimited-User License

XSWGR1100        B.11.00.47.08     General Release Patches, November 1999 (ACE)

[...]

- Cisco iSCSI driver 3.3.3 voor HP-UX is gebruikt. Aanbevolen wordt om ook (ten minste) het laatste stabiele Protocol voor adresresolutie (ARPA) te installeren Cumulatieve Patch van HP. Toen dit document geschreven werd, was dit PHNE_28538. Dit stopcontact heeft verschillende afhankelijkheden, zodat u ze zo en wanneer nodig moet installeren.Ga voor meer installatie-informatie naar de officiële HP Support Site (alleen geregistreerde klanten) .

[/]# swlist

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

#

# Bundle(s):

#

A6795A                        B.11.00.10     PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE                        B.11.00        Patch Bundle

HPUXEng64RT                   B.11.00.01     English HP-UX 64-bit Runtime Environment

HWE1100                       B.11.00.0203.5 Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag                    B.11.00.20.09  HPUX 11.0 Support Tools Bundle, Mar 2002

QPK1100                       B.11.00.56.5   Quality Pack for HP-UX 11.00, March 2002

UXCoreMedia                   B.11.00.02     HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic                  B.11.00.02     HP-UX Unlimited-User License

XSWGR1100                     B.11.00.47.08  General Release Patches, November 1999 (ACE)

#

# Product(s) not contained in a Bundle:

#

ISCSI                         3.3.3          ISCSI software

bison                         1.875          bison

flex                          2.5.4a         flex

gcc                           3.2.3          gcc

gettext                       0.11.5         gettext

less                          376            less

libiconv                      1.9            libiconv

make                          3.80           make

ncurses                       5.2            ncurses

termcap                       1.3.1          termcap

zsh                           4.0.7          zsh

[/]# swlist BUNDLE

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

# BUNDLE                B.11.00        Patch Bundle

BUNDLE.PHCO_23651     1.0            fsck_vxfs(1M) cumulative patch

BUNDLE.PHKL_28496     1.0            SCSI IO Subsystem Cumulative Patch

BUNDLE.PHKL_27980     1.0            VxFS 3.1 cumulative patch: CR_EIEM

BUNDLE.PHKL_22840     1.0            IDS/9000; syscalls related to file/socket

BUNDLE.PHCO_28505     1.0            user/group(add/mod/del)(1M) cumulative patch

BUNDLE.PHKL_28150     1.0            LVM Cumulative Patch w/Performance Upgrades

BUNDLE.PHNE_28538     1.0            cumulative ARPA Transport patch

BUNDLE.PHNE_28143     1.0            LAN product cumulative patch

BUNDLE.PHNE_27902     1.0            Cumulative STREAMS Patch

BUNDLE.PHKL_29434     1.0            POSIX AIO;getdirentries;MVFS;rcp;mmap/IDS;

BUNDLE.PHKL_28766     1.0            Probe,IDDS,PM,VM,PA-8700,AIO,T600,FS,PDC,CLK

BUNDLE.PHKL_28004     1.0            Fibre Channel Mass Storage Driver Patch

BUNDLE.PHKL_27729     1.0            ioscan -u incorrect display (kernel patch).

BUNDLE.PHKL_24187     1.0            ioscan performance gain for SCSI Subsystem

BUNDLE.PHKL_24165     1.0            Kernel Patch For "ioscan -k" Performance

BUNDLE.PHKL_23409     1.0            NFS, Large Data Space, kernel memory leak

BUNDLE.PHKL_20016     1.0            2nd CPU not recognized in G70/H70/I70

BUNDLE.PHKL_18543     1.0            PM/VM/UFS/async/scsi/io/DMAPI/JFS/perf patch

BUNDLE.PHCO_27818     1.0            ioscan(1M) cumulative patch

BUNDLE.PHCO_27375     1.0            cumulative SAM/ObAM patch

- Cisco MDS 9216 met softwareversie 1.2(1a).

vatican# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Module               DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:57:5e:c0 to 20:10:00:0c:30:57:5e:c0

2    1.2(1a)      0.2     20:41:00:0c:30:57:5e:c0 to 20:48:00:0c:30:57:5e:c0

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-00 to 00-0b-be-f8-7f-04  JAB070804Q3

2    00-05-30-00-a8-56 to 00-05-30-00-a8-62  JAB070205AM

* this terminal session

vatican# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 963108 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

vatican uptime is 1 days 6 hours 17 minute(s) 25 second(s)

Last reset at 955065 usecs after Wed Sep 10 08:13:50 2003

Reason: Reset Requested by CLI command reload

System version: 1.1(2)

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

De Cisco MDS 9000 die in dit document wordt gebruikt, verwijst naar een product van Fibre Channel (FC)-switch in de MDS 9000-reeks (MDS 9506, MDS 9509, MDS 9216). Het snijpad van Cisco Inbraakpreventiesysteem (IPS) verwijst naar IP-opslagservicesmodule. Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Achtergrondinformatie

De module Cisco Inbraakpreventiesysteem (IPS) biedt IP-hosts toegang tot Fibre Channel (FC) opslagapparaten. De IPS-module is DS-X9308-SMIP. Dit biedt transparante SCSI-routing. IP-hosts die gebruik maken van iSCSI-protocol kan op transparante wijze toegang krijgen tot iSCSI-doelstellingen op het FC-netwerk De IP-host stuurt SCSI-opdrachten die zijn ingekapseld in iSCSI Protocol Data Units (PDU’s) naar een MDS 9000 IPS-poort via een TCP/IP-verbinding. Op de IPS-module wordt connectiviteit geboden in de vorm van GE-interfaces die correct zijn geconfigureerd. Met de IPS-module kunt u virtuele iSCSI-doelstellingen maken en deze in kaart brengen naar fysieke FC-doelen die in de FC SAN's beschikbaar zijn. Het presenteert de FC doelstellingen aan IP gastheren alsof de fysieke doelstellingen aan het IP netwerk verbonden waren.

Bij elke iSCSI-host die toegang tot opslag via de IPS-module vereist, moet een compatibel iSCSI-stuurprogramma worden geïnstalleerd. Dankzij het iSCSI-protocol kan het iSCSI-stuurprogramma een iSCSI-host verzenden via een IP-netwerk. Vanuit het perspectief van een host-besturingssysteem lijkt het iSCSI-stuurprogramma een SCSI-transportstuurprogramma te zijn, vergelijkbaar met een FC-stuurprogramma voor een perifeer kanaal in de host. Vanuit het perspectief van het opslagapparaat, verschijnt elke IP-host als een FC-host. Routing SCSI van de IP-host naar het FC-opslagapparaat bestaat uit deze hoofdacties:

- iSCSI-verzoeken en -reacties via een IP-netwerk tussen hosts en de IPS-module transporteren

- Routing SCSI-verzoeken en reacties tussen hosts op een IP-netwerk en het FC-opslagapparaat (converteren van iSCSI naar FCP en FCP naar iSCSI). Deze routing wordt uitgevoerd door de IPS-module.

- FCP-verzoeken of -reacties verzenden tussen de IPS-module en FC-opslagapparaten

De IPS-module importeert geen FC-doelstellingen standaard voor iSCSI. Ofwel dynamische of statische mapping moet worden geconfigureerd voordat de IPS-module FC-doelstellingen beschikbaar maakt voor iSCSI-initiators. Wanneer beide zijn ingesteld, hebben de in kaart gebrachte FC-doelen een geconfigureerde naam. Dit document geeft een voorbeeld van statische mapping. Bij dynamische plattegronden wordt elke keer dat de iSCSI-host zich verbindt met de IPS-module een nieuwe FC N-poort gecreëerd en kunnen de WWN's en WWN's die voor deze N-poort zijn toegewezen, verschillen. Gebruik de statische kaartmethode als u dezelfde WWNs en WWNs voor de iSCSI-host moet verkrijgen telkens wanneer deze met de IPS-module wordt verbonden. Statische mapping kan worden gebruikt op de IPS-module voor toegang tot intelligente FC-opslagarrays met LUN-mapping (toegangscontrole en logische eenheden) en maskerende configuraties op basis van de WWN's of nWWN's van de initiator.

U kunt de toegang tot elk statistisch in kaart gebracht iSCSI-doel controleren door een specifieke lijst te maken van IPS-poorten waarop het doel wordt geadverteerd en door een lijst te maken met iSCSI-initiatorknoopnamen die toegang tot dit doel hebben. Op FC zoning-gebaseerde toegangscontrole en op iSCSI gebaseerde toegangscontrole zijn de twee mechanismen waardoor toegangscontrole voor iSCSI kan worden geboden. Beide methoden kunnen gelijktijdig worden gebruikt. In deze configuratie is de standaardindeling voor specifieke VSAN's toegestaan. IPS-modules gebruiken zowel op iSCSI-knooppunt gebaseerde als op FC-indeling gebaseerde toegangscontrolelijsten om toegangscontrole tijdens de creatie van iSCSI-sessies af te dwingen.

- iSCSI-detectie: Wanneer een iSCSI-host een iSCSI-ontdekkingssessie en vragen voor alle iSCSI-doelstellingen creëert, retourneert de IPS-module alleen de lijst met iSCSI-doelen die deze iSCSI-host mag benaderen op basis van het toegangscontrolebeleid.

- iSCSI-sessies: Wanneer een IP-host een iSCSI-sessie initieert, verifieert de IPS-module of het gespecificeerde iSCSI-doel (in het sessielinlogverzoek) een statisch in kaart gebracht doel is, en indien dit waar is, verifieert zij of de iSCSI-knoopnaam van de IP-host het doel mag bereiken. Als de IP-host geen toegang heeft, wordt de inlognaam ervan afgewezen.

De IPS module maakt dan een FC virtuele N poort (de N poort kan al bestaan) voor deze IP host en doet een FC name server query voor de FCID van het FC target-WWN dat door de IP-host wordt benaderd. Het gebruikt de pWWN van de IP-host virtuele N-poort als de zoekopdracht van de nameserver. Zodoende doet de naamserver een zone-handhavingsvraag voor de pWWN en reageert de query. Als de FCID door de naamserver wordt teruggegeven, wordt de iSCSI-sessie geaccepteerd. Anders wordt de inlogaanvraag afgewezen.

Configureren

In dit gedeelte krijgt u de informatie om de MDS 9216 en Cisco iSCSI-stuurprogramma voor Linux te configureren.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten die in dit document worden gebruikt, gebruikt u de Cisco MDS 9000-reeks en de Cisco MDS 9000 Series softwareconfiguratiegids.

Netwerkdiagram

Dit document gebruikt de netwerkinstellingen die in dit diagram worden weergegeven:

Configuraties

Dit document gebruikt de configuraties die hier worden weergegeven:

- April (HP 9000/800 A500 HP-UX 11.00)

- Vaticaan (MDS 9216)

April (HP 9000/800 A500 HP-UX 11.00)

On the HP-UX host only the file /etc/iscsi.conf has to be modified:

[/]# cat /etc/iscsi.conf

# iSCSI configuration file - see iscsi.conf(4)

# DiscoveryAddress Settings

# -------------------------

# Add "DiscoveryAddress=xxx" entries for each iSCSI router instance.

# The driver attempts to discover iSCSI targets at that address

# and make as many targets as possible available for use.

# 'xxx' can be an IP address or a hostname.  A TCP port number can be

# specified by appending a colon and the port number to the address.

# All entries have to start in column one and must not contain any

# whitespace.

#

# Example:

#

# DiscoveryAddress=scsirouter1

DiscoveryAddress=10.48.69.242

!--- Configure the IP address of the GE interface that acceps iSCSI request from your host.

# The DiscoveryAddress Settings can take following entry.

#

# 1) Authentication Settings

# 2) ConnectionTimeout Settings

!--- Other required driver parameters could be changed in the iscsi.conf file.

......

[/]# cat /etc/iscsi.bindings

# iSCSI bindings, file format version 1.0.

# NOTE: this file is automatically maintained by the iSCSI daemon.

# You do not need to edit this file under most circumstances.

# If iSCSI targets in this file have been permanently deleted, you

# may wish to delete the bindings for the deleted targets.

#

# Format:

# bus   target  iSCSI

# id    id      TargetName

#

[...]

0       10      seagate

0       11      spa-vt

!--- The iSCSI driver discovery daemon process looks up each discovered !--- target in the /etc/iscsi.bindings file. If an entry exists in the file for the target, !--- the corresponding SCSI target ID is assigned to the target. If no entry !--- exists for the target, the smallest available SCSI target ID is assigned !--- and an entry is written to the /etc/iscsi.bindings file for this target.

!--- Note that the /etc/iscsi.bindings file permanently contains entries !--- for all iSCSI targets ever logged into from this host. If a target is !--- no longer available to a host, you can manually edit the file and remove !--- entries so that the obsolete target no longer consumes a SCSI target ID. !--- If you know the iSCSI target name of a target in advance, and you want !--- it to be assigned a particular SCSI target ID, you can add an entry !--- manually. You must stop the iSCSI driver before editing the !--- /etc/iscsi.bindings file. The maximum number of targets is 14.

!--- Enter [/]#/sbin/init.d/iscsi start to manually start the iSCSI driver.

!--- Enter [/]#/sbin/init.d/iscsi stop to manually stop the iSCSI driver.

Vaticaan (Cisco MDS 9216)

!--- If you are starting from the factory default configuration, you !--- need to setup the IP address and mask of the management interface. !--- This would normally be done during the initial setup

.

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!--- In this configuration example, all the iSCSI targets are in a single vsan

.

vsan database

vsan 1016

vsan 1016 interface fc1/3

vsan 1016 interface fc1/7

!--- These are the boot variables.

boot system bootflash:/s111a

boot kickstart bootflash:/k111a

# Simple IP configuration

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

!--- Declare that the iSCSI initiator with the IP address of the host.

# It belongs to the vsan of our choice

iscsi authentication none

iscsi initiator ip-address 10.48.69.238

vsan 1016

!--- Define the first virtual target, it is a JBOD. Identify the target !--- by its pWWN, advertise it on a GE interface, and allow access to the initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:20:37:67:f7:a2

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- The second target is a Clariion disk array. Since the maximum LUN number that you !--- can have under HP-UX without additional software is 7, define a mapping from FC LUN numbers !--- to the iSCSI LUN numbers you are going to present to the host.

iscsi virtual-target name spa-vt

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0020 iscsi-lun 0003

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0021 iscsi-lun 0004

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- Permit access to the targets on the FC level. Create a simple zone configuration to do this. !--- Alternatively, you could have simply set the default zoning policy in vsan 1016 to permit.

zone name jbod vsan 1016

member pwwn 21:00:00:20:37:67:f7:a2

member symbolic-nodename 10.48.69.238

zone name spa vsan 1016

member pwwn 50:06:01:60:88:02:a8:2b

member symbolic-nodename 10.48.69.238

zoneset name iscsidoc vsan 1016

member jbod

member spa

zoneset  activate name iscsidoc vsan 1016

!--- Set the IP address and mask of the GE interface and enable it.

interface GigabitEthernet2/1

ip address 10.48.69.242 255.255.255.192

iscsi authentication none

no shutdown

# Lastly we bring up the iSCSI interface up

interface iscsi2/1

no shutdown

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie correct werkt en probleemoplossing voor het geval u problemen opmerkt.

Bepaalde show opdrachten worden ondersteund door de Opdrachtplanningtool (alleen geregistreerde klanten), waarmee u een analyse van show-opdrachtoutput kunt bekijken.

HP-UX host-opdrachten

- netstat-n of lsof-lof verifieert de TCP verbindingen.

- iscsi-ls-toont de apparaten die momenteel beschikbaar zijn.

- dmesg verzamelt diagnostische berichten.

MDS/IPS-8 opdrachten

- toon zone—geeft zone informatie weer.

- Flogi database weergeven—geeft informatie over FLOGI server weer.

- FCns database-displays Naam Server informatie voor een specifiek VSAN

- vsan lidmaatschap tonen—geeft interfaceinformatie voor verschillende VSAN's weer.

- TiSCSI-geeft verschillende iSCSI-informatie weer.

- toon IPS - toont verschillende informatie over IP diensten.

- SCSI-target-tonen SCSI-apparaten voor specifieke VSAN's (voor het in kaart brengen van FC-LUN's aan iSCSI-LUN's).

- toon interface-toont informatie over verschillende interfaces.

- Toon ip route-toont IP routeinformatie.

Problemen oplossen

Deze sectie bevat informatie waarmee u problemen met de configuratie kunt oplossen.

Hier vindt u informatie over probleemoplossing die relevant is voor deze configuratie:

- Informatie van Ape (HP 9000/800 A500 HP-UX 11.00)

- Informatie over Vaticaan (MDS 9216)

- Fabric Manager- en apparaatbeheer

April (HP 9000/800 A500 HP-UX 11.00)

# /sbin/init.d/iscsi stop

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsi_[tr]x_threads to terminate .....

[/]# /sbin/init.d/iscsi start

Number of indices in scsi_isc table used by System: 5

Index used by iSCSI controller: 255

Number of free indices: 251

[/]# netstat -n | grep '10.48.69.242'

tcp        0      0  10.48.69.238.49501     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49500     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49499     10.48.69.242.3260       ESTABLISHED

!--- If you have lsof, you can also try the following:

[/]# lsof -i @10.48.69.242

COMMAND  PID USER   FD   TYPE     DEVICE SIZE/OFF NODE NAME

iscsid  2836 root    1u  inet 0x41aa9268   0t1300  TCP ape.cisco.com:49499->10.48.69.242:3260 (ESTABLISHED)

!--- Note that ioscan does not report iSCSI devices. To see the list

!--- of available iSCSI devices from the host, issue the iscsi-ls command.

[/]# iscsi-ls -l

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     0        = DISK  c255t10d0  'SEAGATE  ST318203FC      0004'

BLOCKS : 35566479  BLOCKSIZE : 512 CAPACITY : 17366.00MB

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     4        = DISK  c255t11d4  'DGC      RAID 1          0632'

BLOCKS : 6291419  BLOCKSIZE : 512 CAPACITY : 3071.00MB

LUN     3        = DISK  c255t11d3  'DGC      RAID 1          0632'

BLOCKS : 10485607  BLOCKSIZE : 512 CAPACITY : 5119.00MB

!--- To see detailed statistics for currently established iSCSI sessions, use this:

[/]# iscsi-ls -c

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

!--- Here are some of the entries you can expect to find in the syslog:

[/]# dmesg

[...]

iSCSI: session 0x4179b000 target 11 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: session 0x41a64800 target 10 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: Direct Access Device found at lun 3 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: Direct Access Device found at lun 0 on target 10

Vendor Id  : SEAGATE

Product Id : ST318203FC                 Product Rev: 0004

iSCSI: Direct Access Device found at lun 4 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2,

senselen 18, sense key 06, ASC/ASCQ 29/00, task (0x40718b00) to (host 255 target 11 lun 3),

TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x3

iSCSI: iscsi_recv_cmd: task (0x40718b00) itt 9 to (host 255 target 11 lun 3), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2, senselen 18,

sense key 06, ASC/ASCQ 29/00, task (0x40718c00) to (host 255 target 11 lun 4), TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x4

iSCSI: iscsi_recv_cmd: task (0x40718c00) itt 11 to (host 255 target 11 lun 4), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

Informatie over Vaticaan (MDS 9216)

vatican# show zone status vsan 1016

VSAN: 1016 default-zone: deny distribute: active only Interop: Off

Full Zoning Database :

Zonesets:1  Zones:3 Aliases: 0

Active Zoning Database :

Name: iscsidoc  Zonesets:1  Zones:3

Status: Activation completed at Wed Sep 17 13:03:56 2003

vatican# show zone active vsan 1016

zone name jbod vsan 1016

* fcid 0x7902e8 [pwwn 21:00:00:20:37:67:f7:a2]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spa vsan 1016

* fcid 0x790104 [pwwn 50:06:01:60:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spb vsan 1016

* fcid 0x790105 [pwwn 50:06:01:68:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

vatican# show flogi database vsan 1016

---------------------------------------------------------------------------

INTERFACE  VSAN    FCID            PORT NAME               NODE NAME

---------------------------------------------------------------------------

fc1/3      1016  0x7902e8  21:00:00:20:37:67:f7:a2  20:00:00:20:37:67:f7:a2

fc1/7      1016  0x790104  50:06:01:60:88:02:a8:2b  50:06:01:60:11:02:a8:2b

fc1/11     1016  0x790105  50:06:01:68:88:02:a8:2b  50:06:01:60:11:02:a8:2b

iscsi2/1   1016  0x790100  20:03:00:0c:30:57:5e:c2  20:02:00:0c:30:57:5e:c2

Total number of flogi = 4.

vatican# show fcns database vsan 1016

VSAN 1016:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x790100    N     20:03:00:0c:30:57:5e:c2 (Cisco)         scsi-fcp:init isc..w

0x790104    N     50:06:01:60:88:02:a8:2b (Clariion)      scsi-fcp:target

0x790105    N     50:06:01:68:88:02:a8:2b (Clariion)      scsi-fcp:target

0x7902e8    NL    21:00:00:20:37:67:f7:a2 (Seagate)       scsi-fcp:target

Total number of entries = 4

--- FCID 0X790100 is the virtual N port(HBA) for the iSCSI host.

vatican# show fcns database detail vsan 1016

------------------------

VSAN:1016  FCID:0x790100

------------------------

port-wwn (vendor)     :20:03:00:0c:30:57:5e:c2 (Cisco)

node-wwn              :20:02:00:0c:30:57:5e:c2

class                 :2,3

node-ip-addr          :10.48.69.238

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

symbolic-port-name    :

symbolic-node-name    :10.48.69.238

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:41:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790104

------------------------

port-wwn (vendor)     :50:06:01:60:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:07:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790105

------------------------

port-wwn (vendor)     :50:06:01:68:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:0b:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x7902e8

------------------------

port-wwn (vendor)     :21:00:00:20:37:67:f7:a2 (Seagate)

node-wwn              :20:00:00:20:37:67:f7:a2

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :NL

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:03:00:0c:30:57:5e:c0

hard-addr             :0x000000

Total number of entries = 4

vatican# show iscsi initiator

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag: 0x80

VSAN ID 1016, FCID 0x790100

vatican# show iscsi initiator configured

iSCSI Node name is 10.48.69.238

Member of vsans: 1016

vatican# show iscsi initiator detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

vatican# show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:20:37:67:f7:a2

=== The "*" means you have both discovery and target session. If there

is no "*" in front of the pWWN, it means you only have discovery session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0000, FC LUN: 0000

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

target: spa-vt

* Port WWN 50:06:01:60:88:02:a8:2b

Secondary PWWN 50:06:01:68:88:02:a8:2b

Configured node

No. of LU mapping: 2

iSCSI LUN: 0003, FC LUN: 0020

iSCSI LUN: 0004, FC LUN: 0021

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

vatican# show iscsi stats iscsi 2/1

iscsi2/1

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

50932 packets input, 60370640 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes, 2476 fragments

output 115926 packets, 112863536 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show ips arp interface gigabitethernet 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet    10.48.69.200        0     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.201        5     0202.3d30.45c9  ARPA  GigabitEthernet2/1

Internet    10.48.69.206        5     0202.3d30.45ce  ARPA  GigabitEthernet2/1

Internet    10.48.69.209        3     0202.3d30.45d1  ARPA  GigabitEthernet2/1

Internet    10.48.69.226        2     0060.08f6.bc1a  ARPA  GigabitEthernet2/1

Internet    10.48.69.229        4     0800.209e.edab  ARPA  GigabitEthernet2/1

Internet    10.48.69.231        1     0002.b3c1.7dab  ARPA  GigabitEthernet2/1

Internet    10.48.69.233        0     0010.4200.7d5b  ARPA  GigabitEthernet2/1

Internet    10.48.69.238        0     0030.6e1b.6f51  ARPA  GigabitEthernet2/1

Internet    10.48.69.239       10     0030.6e1c.a00b  ARPA  GigabitEthernet2/1

Internet    10.48.69.241        0     000b.cdaf.b4c3  ARPA  GigabitEthernet2/1

Internet    10.48.69.248        4     0202.3d30.45f8  ARPA  GigabitEthernet2/1

Internet    10.48.69.252        1     0202.3d30.45fc  ARPA  GigabitEthernet2/1

Internet      10.10.2.28        7     0202.3d0a.021c  ARPA  GigabitEthernet2/1

vatican# show ips stats tcp interface gigabitethernet 2/1 detail

TCP Statistics for port GigabitEthernet2/1

TCP send stats

261205 segments, 117757220 bytes

140632 data, 51907 ack only packets

2655 control (SYN/FIN/RST), 0 probes, 2639 window updates

63382 segments retransmitted, 90885612 bytes

63382 retransmitted while on ethernet send queue, 1 packets split

13327 delayed acks sent

TCP receive stats

249073 segments, 72669 data packets in sequence, 61525764 bytes in sequence

2335 predicted ack, 68605 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

4396 duplicate bytes, 205 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 2625 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

80504 acks, 117762158 ack bytes, 0 ack toomuch, 96274 duplicate acks

0 ack packets left of snd_una, 7 non-4 byte aligned packets

54199 window updates, 0 window probe

6343 pcb hash miss, 709 no port, 6 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 2718 accepts, 2718 established

2716 closed, 15 drops, 0 conn drops

3 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

37062 segments timed, 41787 rtt updated

817 retransmit timeout, 1 persist timeout

22654 keepalive timeout, 22643 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

2720 entries, 2718 connections completed, 0 entries timed out

0 dropped due to overflow, 2 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 2 duplicate SYN, 183 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local  Address        Remote Address        State      Send-Q   Recv-Q

10.48.69.242:3260     10.48.69.238:49499    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49500    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49501    ESTABLISH  0        0

0.0.0.0:3260          0.0.0.0:0             LISTEN     0        0

vatican# discover scsi-target local

discovery started

vatican# show scsi-target devices vsan 1016

--------------------------------------------------------------------------------

VSAN    FCID        PWWN                      VENDOR    MODEL             REV

--------------------------------------------------------------------------------

1016    0x790104    50:06:01:60:88:02:a8:2b   DGC       RAID 0            0632

1016    0x7902e8    21:00:00:20:37:67:f7:a2   SEAGATE   ST318203FC        0004

vatican# show scsi-target lun vsan 1016

- RAID from DGC (Rev 0632)

FCID is 0x790104 in VSAN 1016, PWWN is 50:06:01:60:88:02:a8:2b

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

da:05:b6:a9:b6:9d:7b:00

C:1 A:0 T:0 00:00:00:00

0x1    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

6a:66:0d:74:cb:33:88:6c

C:1 A:0 T:0 00:01:00:00

0x2    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ec:81:5b:a2:c4:43:0d:8a

C:1 A:0 T:0 00:02:00:00

0x3    2147      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

e0:47:b3:be:3b:00:e0:d5

C:1 A:0 T:0 00:03:00:00

0x4    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

00:51:5b:7f:3d:9a:7b:ce

C:1 A:0 T:0 00:04:00:00

0x5    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ab:b1:ae:80:59:c0:fc:f0

C:1 A:0 T:0 00:05:00:00

0x6    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ad:91:58:af:d2:fd:c7:47

C:1 A:0 T:0 00:06:00:00

0x7    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

b1:ef:e7:6c:44:5c:16:97

C:1 A:0 T:0 00:07:00:00

0x8    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

84:4f:09:60:30:1e:fc:50

C:1 A:0 T:0 00:08:00:00

0x9    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

aa:6d:e2:0e:ce:7a:cc:21

C:1 A:0 T:0 00:09:00:00

0xa    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

5b:66:67:89:6c:f2:d1:56

C:1 A:0 T:0 00:0a:00:00

0xb    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a9:32:bd:04:4a:bb:3d:9b

C:1 A:0 T:0 00:0b:00:00

0xc    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

cd:d9:96:f7:57:3f:07:0c

C:1 A:0 T:0 00:0c:00:00

0xd    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

0c:e5:ba:39:68:ca:d6:f0

C:1 A:0 T:0 00:0d:00:00

0xe    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

60:6e:ee:76:98:fc:ab:97

C:1 A:0 T:0 00:0e:00:00

0xf    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

8b:58:80:7b:12:fb:6b:12

C:1 A:0 T:0 00:0f:00:00

0x10   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a1:2f:6d:b0:c3:d6:c2:46

C:1 A:0 T:0 00:10:00:00

0x11   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

2c:48:c4:74:25:4b:26:dd

C:1 A:0 T:0 00:11:00:00

0x20   5369      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ba:18:6a:40:22:40:94:75

C:1 A:0 T:0 00:20:00:00

0x21   3221      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

74:d2:42:9e:31:8d:ff:86

C:1 A:0 T:0 00:21:00:00

- ST318203FC from SEAGATE (Rev 0004)

FCID is 0x7902e8 in VSAN 1016, PWWN is 21:00:00:20:37:67:f7:a2

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    18210     Online  LRE8091500007039 C:1 A:0 T:3 20:00:00:20:37:67:f7:a2

vatican# show interface iscsi 2/1

iscsi2/1 is up

Hardware is GigabitEthernet

Port WWN is 20:41:00:0c:30:57:5e:c0

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 0, Number of TCP connection: 0

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

Maximum allowed bandwidth is 500000 kbps

Minimum available bandwidth is 500000 kbps

Estimated round trip time is 10000 usec

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 50920 packets, 60370032 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes fragments 2476

Output 115914 packets, 112862928 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show interface gigabitethernet 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 10.48.69.242/26

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

iSCSI authentication: NONE

5 minutes input rate 440 bits/sec, 55 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

850346 packets input, 127958119 bytes

6488 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

289960 packets output, 201600774 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

vatican# show ip route

Codes: C - connected, S - static

Default gateway is 10.48.69.129

C 10.48.69.192/26 is directly connected, gigabitethernet2-1

C 10.48.69.128/26 is directly connected, mgmt0

Fabric Manager- en apparaatbeheer

Deze sectie verschaft schermopnamen van MDS Fabric Manager 1.2(1a) en Apparaatbeheer 1.2(1a).

Topologische diagram van Fabric Manager

Apparaatbeheer

Selecteer FC- > LUN's in Apparaatbeheer om de WWN's, LUN-id's en de capaciteit van uw LUN's weer te geven.

Selecteer IP > -iSCSI in apparaatbeheer om de iSCSI-sessies weer te geven.