Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuratie

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Deze voorbeeldconfiguratie werkt voor een zeer klein kantoor dat rechtstreeks met internet verbonden is, met dien verstande dat Domain Name Service (DNS), Simple Mail Transfer Protocol (MTP) en Web Services worden geleverd door een extern systeem dat door de Internet Service Provider (ISP) wordt beheerd. Er zijn geen diensten op het binnennetwerk en slechts twee interfaces. Er is ook geen houtkap omdat er geen host beschikbaar is om houtdiensten aan te bieden.

Omdat deze configuratie alleen invoertoegangslijsten gebruikt, worden zowel anti-spoofing als traffic filtering met dezelfde toegangslijst uitgevoerd. Deze configuratie werkt alleen voor een twee-poorts router. Ethernet 0 is het "binnennetwerk". Seriële 0 is een Frame Relay-link naar de ISP.

Raadpleeg Twee-interface-router met NAT Cisco IOS-firewallconfiguratie om een twee-interface-router met NAT te configureren met behulp van een Cisco IOS®-firewall.

Raadpleeg Drie-interfacerouter zonder NAT Cisco IOS-firewallconfiguratie om een drie interfacerouter te configureren zonder NAT te gebruiken in Cisco IOS-firewall.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is van toepassing op deze software- en hardwareversies:

- Cisco IOS®-softwarerelease 12.2(15)T13, ondersteund door Cisco IOS-softwarerelease 11.3.T

- Cisco 2611 router

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

Opmerking: Gebruik het Opname Gereedschap (alleen geregistreerde klanten) om meer informatie te verkrijgen over de opdrachten die in deze sectie worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Configuratie

Dit document gebruikt deze configuratie:

2514 router

version 12.2

!

service password-encryption

no service udp-small-servers

no service tcp-small-servers

no cdp run

!

hostname cbac-cisco

!

no ip source-route

!

enable secret 5 $1$FrMn$wBu0Xgv/Igy5Y.DarCmrm/

!

username cisco privilege 15 password 7 0822455D0A16

no ip source-route

ip domain-name cisco.com

ip name-server 172.16.150.5

!

!--- Set up inspection list "myfw". !--- Inspect for the protocols that actually get used.

!

ip inspect name myfw cuseeme timeout 3600

ip inspect name myfw ftp timeout 3600

ip inspect name myfw http timeout 3600

ip inspect name myfw rcmd timeout 3600

ip inspect name myfw realaudio timeout 3600

ip inspect name myfw smtp timeout 3600

ip inspect name myfw tftp timeout 30

ip inspect name myfw udp timeout 15

ip inspect name myfw tcp timeout 3600

!

interface Ethernet0/0

description Cisco Ethernet RTP

ip address 10.20.20.20 255.255.255.0

no ip directed-broadcast

!

!--- Apply the access list in order to allow all legitimate traffic !--- from the inside network but prevent spoofing.

!

ip access-group 101 in

!

no ip proxy-arp

!

!--- Apply inspection list "myfw" to Ethernet 0 inbound. !--- When conversations are initiated from the internal network !--- to the outside, this inspection list causes temporary additions !--- to the traffic allowed in by serial interface 0 acl 111 when !--- traffic returns in response to the initiation.

!

ip inspect myfw in

no ip route-cache

!

no cdp enable

!

interface Serial0/0

description Cisco FR

ip address 172.16.150.1 255.255.255.0

encapsulation frame-relay IETF

no ip route-cache

no arp frame-relay

bandwidth 56

service-module 56 clock source line

service-module 56k network-type dds

frame-relay lmi-type ansi

!

!--- Access list 111 allows some ICMP traffic and administrative Telnet, !--- and does anti-spoofing. There is no inspection on Serial 0. !--- However, the inspection on the Ethernet interface adds temporary entries !--- to this list when hosts on the internal network make connections !--- out through the Frame Relay.

!

ip access-group 111 in

no ip directed-broadcast

no ip route-cache

bandwidth 56

no cdp enable

frame-relay interface-dlci 16

!

ip classless

ip route 0.0.0.0 0.0.0.0 Serial0

!

!--- Access list 20 is used to control which network management stations !--- can access through SNMP.

!

access-list 20 permit 172.16.150.8

!

!--- The access list allows all legitimate traffic from the inside network !--- but prevents spoofing.

!

access-list 101 permit tcp 172.16.150.0 0.0.0.255 any

access-list 101 permit udp 172.16.150.0 0.0.0.255 any

access-list 101 permit icmp 172.16.150.0 0.0.0.255 any

!--- This deny is the default.

access-list 101 deny ip any any

!

!--- Access list 111 controls what can come from the outside world !--- and it is anti-spoofing.

!

access-list 111 deny ip 127.0.0.0 0.255.255.255 any

access-list 111 deny ip 172.16.150.0 0.0.0.255 any

!

!--- Perform an ICMP stuff first. There is some danger in these lists. !--- They are control packets, and allowing *any* packet opens !--- you up to some possible attacks. For example, teardrop-style !--- fragmentation attacks can come through this list.

!

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 administratively-prohibited

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 echo

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 echo-reply

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 packet-too-big

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 time-exceeded

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 traceroute

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 unreachable

!

!--- Allow Telnet access from 10.11.11.0 corporate network administration people.

!

access-list 111 permit tcp 10.11.11.0 0.0.0.255 host 172.16.150.1 eq telnet

!

!--- This deny is the default.

!

access-list 111 deny ip any any

!

!--- Apply access list 20 for SNMP process.

!

snmp-server community secret RO 20

!

line con 0

exec-timeout 5 0

password 7 14191D1815023F2036

login local

line vty 0 4

exec-timeout 5 0

password 7 14191D1815023F2036

login local

length 35

end

Verifiëren

Er is momenteel geen verificatieprocedure beschikbaar voor deze configuratie.

Problemen oplossen

Deze sectie bevat informatie waarmee u problemen met de configuratie kunt oplossen.

Nadat u de IOS Firewall router vormt, als de verbindingen niet werken, zorg er dan voor dat u inspectie met de ip inspectie (naam gedefinieerd) in of uit opdracht op de interface hebt ingeschakeld. In deze configuratie wordt ip inspecteert myfw in toegepast voor de interface Ethernet0/0.

Raadpleeg voor deze opdrachten, samen met andere informatie over probleemoplossing, de verificatieproxy voor probleemoplossing.

Opmerking: Raadpleeg Belangrijke informatie over debug Commands voordat u debug-opdrachten afgeeft.

Gerelateerde informatie

- IOS-ondersteuningspagina

- Technische ondersteuning en documentatie – Cisco Systems