Inhoud

Inleiding

Uitsluitingen van AMP voor Endpoints Linux Connectors in Sofobie 9.14.0 op CentOS 7.4.1708

Inleiding

Sommige antivirusproducten moeten zo worden geconfigureerd dat ze compatibel zijn met AMP voor Endpoints Linux-connector.

Uitsluitingen van AMP voor Endpoints Linux Connectors in Sofobie 9.14.0 op CentOS 7.4.1708

1. Configureer Sofobs om fanotify te gebruiken voor controle van het bestandssysteem (Sofoos KB118216).

2. Configuratie van Soos om/opt/cisco/amp en alle subdirectories van het scannen uit te sluiten.

3. Configureer AMP voor endpoints om de volgende directories en subdirectories uit te sluiten (zie Uitsluitingen maken en beheren):

- /opt/sophos-av

- Sofo's quarantaine