Inhoud

Inleiding

Voordat u begint

Conventies

Voorwaarden

Gebruikte componenten

Configureren

Netwerkdiagram

Configuraties

RADIUS-profielen

Verifiëren

Problemen oplossen

Wat is de optie single-aanmelding SSD 2.5.1?

Wat moet ik weten voordat ik SSG en SSD configureren?

Wat doe ik nadat de PPPoA sessie gestart is maar voordat een SSD aanmelding ingesteld is?

Hoe test ik de SSD single-aanmelding optie?

Hoe voer ik de foutoplossing uit?

Monster debug-uitvoer

NRP1-uitgang

L2TP-toegangsConcentrator (LAC)-uitvoer

LNS-uitgang

Gerelateerde informatie

Inleiding

De voorbeeldconfiguratie die in dit document wordt beschreven, toont een externe client die toegang heeft tot een netwerk van Internet Service Provider (ISP) met behulp van Point-to-Point Protocol over Asynchronous Transfer Mode (PPPoA).

De externe client wil toegang krijgen tot een Layer 2 Tunneling Protocol (L2TP)-service met Layer 3 Service Selection Gateway/Service Selection Dashboard (SSG/SSD). De L2TP-service wordt weergegeven in de configuratie met een host-IP-adres van 15.15.15.5. Met Dynamic Host Configuration Protocol (DHCP) biedt Cisco 677 een IP-adres naar de PC vanaf een IP-adrespool van 10.0.2 tot 10.0.254, met een masker van 255.25.2 55.0. Ook Port Address Translation (PAT) is ingeschakeld op Cisco 677.

Er zijn drie testen voor deze voorbeeldconfiguratie:

- De SSG-gerelateerde debugs tijdens verschillende stappen van de serviceaanmelding door de externe client.

- De enkele aanmelding van SSD 2.5.1.

- Het debuggen van SSD inschakelen.

Voordat u begint

Conventies

Zie de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Voorwaarden

Er zijn geen specifieke voorwaarden van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de onderstaande software- en hardwareversies.

- Cisco C6400R-software (C6400R-G4P5-M), versie 12.1(5)DC1

- Cisco 7200-software (C7200-IS-M), versie 12.2(1)

De informatie in dit document is gebaseerd op apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als u in een levend netwerk werkt, zorg er dan voor dat u de potentiële impact van om het even welke opdracht begrijpt alvorens het te gebruiken.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten in dit document, gebruikt u het Opdrachtplanningprogramma (alleen geregistreerd klanten).

Netwerkdiagram

Dit document gebruikt de netwerkinstellingen die in het onderstaande schema zijn weergegeven.

Configuraties

Dit document maakt gebruik van de onderstaande configuraties.

- Cisco 6400 LAC (Wireless-N3)

- Cisco 7204 LNS (hostname)

- Cisco 677

Cisco 6400 LAC (Wireless-N3)

Building configuration...

Current configuration : 125008 bytes

!

! Last configuration change at 02:11:30 UTC Mon Jun 18 2001

! NVRAM config last updated at 00:43:51 UTC Mon Jun 18 2001

!

version 12.1

no service single-slot-reload-enable

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname arielle_nrp3

!

boot system tftp c6400r-g4p5-mz.121-5.DC1 172.17.247.195

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default none

aaa authentication login tty enable

aaa authentication ppp ayman group radius

aaa nas port extended

enable password ww

!

username ayman@cairo.com password 0 ayman

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

no ip finger

no ip domain-lookup

!

!

vpdn enable

no vpdn logging

vpdn search-order domain

!

!

ssg enable

ssg default-network 10.200.56.0 255.255.255.0

ssg service-password cisco

ssg radius-helper auth-port 1645 acct-port 1646

ssg radius-helper key cisco

ssg next-hop download nxthoptbl cisco

ssg bind direction downlink Virtual-Template66

ssg service-search-order remote local

!

!

interface Loopback3

ip address 200.200.200.1 255.255.255.252

!

!

interface ATM0/0/0.61 point-to-point

description LAC L2TP connection to Ior

ip address 14.14.14.6 255.255.255.252

pvc 61/61

broadcast

encapsulation aal5snap

!

!

!

interface ATM0/0/0.5555 multipoint

pvc 66/66

encapsulation aal5mux ppp Virtual-Template66

!

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 3.0.0.2 255.255.255.0

no ip mroute-cache

shutdown

tag-switching ip

!

interface FastEthernet0/0/0

ip address 10.200.56.6 255.255.255.0

no ip mroute-cache

half-duplex

!

!

interface Virtual-Template66

ip unnumbered Loopback3

peer default ip address pool ayman

ppp authentication pap ayman

!

!

router eigrp 5

network 14.14.14.4 0.0.0.3

no auto-summary

no eigrp log-neighbor-changes

!

ip local pool ayman 212.93.193.114 212.93.193.126

ip route 10.0.0.0 255.255.255.0 212.93.193.114

!

radius-server host 10.200.56.16 auth-port 1645 acct-port 1646

radius-server retransmit 3

radius-server attribute 25 nas-port format d

radius-server attribute nas-port format d

radius-server key cisco

!

!

line con 0

exec-timeout 0 0

login authentication tty

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

login authentication tty

!

end

Cisco 7204 LNS (hostname)

Building configuration...

Current configuration : 6769 bytes

!

version 12.2

no service single-slot-reload-enable

service timestamps debug datetime msec localtime show-timezone

service timestamps log datetime localtime show-timezone

no service password-encryption

!

hostname ior

!

boot system flash c7200-is-mz.122-1.bin

logging buffered 16384 debugging

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default none

aaa authentication login tty enable

aaa authentication ppp ayman local

aaa nas port extended

enable password 7 03134C

!

username ayman@cairo.com password 0 ayman

clock timezone GMT+1 1

clock summer-time PDT recurring

ip subnet-zero

no ip source-route

ip cef

!

!

no ip finger

ip tcp window-size 8192

ip ftp username tftp

ip ftp password 7 061118

ip host rund 172.17.247.195

ip host PAGENT-SECURITY-V3 57.63.30.76 95.26.0.0

!

!

!

!

!

vpdn enable

no vpdn logging

vpdn search-order domain

!

vpdn-group 1

accept-dialin

protocol l2tp

virtual-template 24

terminate-from hostname nap

local name cairo

l2tp tunnel password 7 052827261363

!

!

interface Loopback1

ip address 212.93.194.5 255.255.255.252

!

interface Loopback2

ip address 15.15.15.5 255.255.255.252

!

!

interface FastEthernet0/0

ip address 10.200.56.2 255.255.255.0

ip ospf network point-to-multipoint

no ip mroute-cache

load-interval 60

duplex half

no cdp enable

!

interface ATM2/0

no ip mroute-cache

atm pvc 1 0 5 qsaal

atm pvc 2 0 16 ilmi

no atm ilmi-keepalive

!

!

!

!

!

interface ATM2/0.61 point-to-point

description L2TP tunnel link

ip address 14.14.14.5 255.255.255.252

pvc 61/61

broadcast

encapsulation aal5snap

!

!

interface ATM2/0.5555 multipoint

pvc 55/55

encapsulation aal5mux ppp Virtual-Template24

!

!

!

interface Virtual-Template24

ip unnumbered Loopback1

peer default ip address pool SSG-L2TP

ppp authentication pap ayman

!

!

router eigrp 5

network 14.14.14.4 0.0.0.3

network 15.15.15.4 0.0.0.3

no auto-summary

no eigrp log-neighbor-changes

!

!

ip route 212.93.193.112 255.255.255.252 14.14.14.6

ip local pool SSG-L2TP 212.93.197.114 212.93.197.126

radius-server host 10.200.56.16 auth-port 1645 acct-port 1646

radius-server retransmit 3

radius-server attribute 25 nas-port format d

radius-server attribute nas-port format d

radius-server key cisco

radius-server vsa send accounting

radius-server vsa send authentication

!

!

!

!

line con 0

exec-timeout 0 0

password 7 010411

login authentication tty

transport input none

line aux 0

password 7 021113

line vty 0 4

exec-timeout 0 0

password 7 010411

login authentication tty

line vty 5 15

!

end

!

U moet de standaardconfiguratie van Cisco 677 herstellen voordat u de nieuwe configuratie uitvoert. Als u de standaardconfiguratie wilt herstellen, gebruikt u de ingestelde opdracht nvram wissen. bijvoorbeeld :

cbos#set nvram erase

Erasing running configuration.

You must use "write" for changes to be permanent.

cbos#write

NVRAM written.

cbos#reboot

Door de DHCP-serverfunctie in te schakelen op Cisco 677 (Cisco Broadband Operating System) (CBOS) wordt automatisch een pool met de naam "pool0" gemaakt en wordt een subtype 10.0.0 toegewezen met een masker van 255.255.0. Standaard wordt het IP-adres van de Cisco 677 Ethernet-interface het adres van 10.0.0 1, en het 'pool0' kan dan IP-adressen tussen 10.0.0.2 en 10.0.0.254 leasen voor de lokale LAN-clients/PC.

Cisco 677

!--- This configuration must be done !--- after NVRAM has been erased.

set ppp wanipcp 0.0.0.0

set ppp wan0-0 login hisham

set ppp wan0-0 passward hisham

set dhcp server enabled

set nat enabled

set int wan0-0 close

set int wan0-0 vpi 1

set int wan0-0 vci 60

set int wan0-0 open

write

reboot

RADIUS-profielen

De volgende RADIUS-profielen (Remote Dial-In User Service) zijn bestemd voor de externe gebruiker en voor de services.

- Profiel van de afstandsbediening met hisham

- Profiel van servicegroep reizen

- Profiel van servicegroep-steden

- Profiel van de service van cairo.com

- Profiel van volgende Help-tabel

Profiel van de afstandsbediening met hisham

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u hisham

User Profile Information

user = hisham{

profile_id = 119

profile_cycle = 11

member = ayman

radius=SSG-6400 {

check_items= {

2=hisham

}

reply_attributes= {

6=2

7=1

9,250="GTravelling"

}

}

}

Profiel van servicegroep reizen

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u Travelling

User Profile Information

user = Travelling{

profile_id = 165

profile_cycle = 3

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,250="IMiddle East"

9,250="GCities"

}

}

}

Profiel van servicegroep-steden

User Profile Information

user = Cities{

profile_id = 167

profile_cycle = 3

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,250="ICairo"

9,250="Ncairo.com"

}

}

}

Profiel van de service van cairo.com

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u cairo.com

User Profile Information

user = cairo.com{

profile_id = 144

profile_cycle = 17

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,1="vpdn:tunnel-id=nap"

9,1="vpdn:l2tp-tunnel-password=CAIRO"

9,1="vpdn:tunnel-type=l2tp"

9,1="vpdn:ip-addresses=15.15.15.5"

9,251="Ocairo.com"

9,251="R15.15.15.4;255.255.255.252"

9,251="TT"

9,251="IEgyptian Capital"

9,251="Gcairo.com_key"

}

}

}

Profiel van volgende Help-tabel

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u nxthoptbl

User Profile Information

user = nxthoptbl{

profile_id = 168

profile_cycle = 2

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,253="Gcairo.com_key;14.14.14.5"

}

}

}

Verifiëren

Er is momenteel geen verificatieprocedure beschikbaar voor deze configuratie.

Problemen oplossen

Wat is de optie single-aanmelding SSD 2.5.1?

Deze optie is van toepassing op een SSD-server. Wanneer de SSD-server geen host-object kan vinden in zijn cache-database voor een externe client die HTTP-verkeer verzenden, stuurt de server een toegangsaanvraag naar de SSG. Als de SSG een host-object heeft, stuurt deze een toegangsacceptabel bericht naar de SSD. De gebruiker kan dan toegang tot de diensten verlenen.

Als er geen host-object op de SSD of SSG is, moet de gebruiker de SSD-verificatie echt maken volgens de normale SSD-aanmeldingsprocedures.

Wat moet ik weten voordat ik SSG en SSD configureren?

Voordat u SSD of SSG configureren dient u het volgende te controleren:

- SSD, SSG en Verificatie, autorisatie en accounting (AAA) worden allemaal uitgevoerd en alle netwerkentiteiten kunnen elkaar ping.

- De externe gebruiker kan elke host in het standaardnetwerk pingelen (SSG, SSD, AAA) voordat hij zich bij de SSD-server aanmeldt.

- De Network Access Provider (NAP), in dit geval Cisco 6400 NRP1, kan het servicetekennetwerk typen.

- De externe client kan het netwerk van de externe servicetoewijzing niet typen.

Wat doe ik nadat de PPPoA sessie gestart is maar voordat een SSD aanmelding ingesteld is?

Nadat alle SSG-opdrachten zijn geconfigureerd, moet u controleren of de volgende hoptabel voor de services van de gebruiker is gedownload. Geef de show bindopdracht af.

arielle_nrp3# show ssg binding

cairo.com_key        -> 14.14.14.5 (NHT)

arielle_nrp3# show ssg next-hop

Next hop table loaded from profile nxthoptbl:

cairo.com_key        -> 14.14.14.5

End of next hop table.

Controleer of al uw richtingsbindingen actief zijn op de SSG.

arielle_nrp3# show ssg direction

Virtual-Template66: Downlink

!--- You can verify this by enabling debug ssg ctrl-events after the !--- remote user tries to initiate its PPPoA session to access the NRP.

Jun 18 02:13:12.791: SSG-CTL-EVN: Handling PPP logon for user hisham.

Jun 18 02:13:12.791: SSG-CTL-EVN: Locate/create SSG sub-block from/for Virtual-Access3.

Jun 18 02:13:12.791: SSG-CTL-EVN: Checking for old HostObject in the sub-block.

Jun 18 02:13:12.791: SSG-CTL-EVN:  SSG: pppterm: NO extra data for PPP logon

Jun 18 02:13:12.791: SSG-CTL-EVN: Authenticating user hisham for PPP logon.

Jun 18 02:13:12.799: SSG-CTL-EVN: Creating HostObject for the PPP user hisham.

Jun 18 02:13:12.799: SSG-CTL-EVN: Set Host Mac Address .

Jun 18 02:13:12.799: SSG-CTL-EVN: ** attr->type = 6

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 1

Jun 18 02:13:12.799: SSG-CTL-EVN: ** attr->type = 7

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 2

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 3

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 4

Jun 18 02:13:12.799: SSG-CTL-EVN: PPP logon for user hisham is accepted.

The link is Virtual-Access3

Jun 18 02:13:12.799: SSG-CTL-EVN: Bind the HostObject to Virtual-Access3.

!--- Downlink binding success.

Jun 18 02:13:12.867: SSG-CTL-EVN: IPCP is up. Locate SSG sub-block from Virtual-Access3.

Jun 18 02:13:12.871: SSG-CTL-EVN: Locate HostObject from the sub-block.

Jun 18 02:13:12.871: SSG-CTL-EVN: Set Host IP 212.93.193.114.

!--- Host object is created.

Jun 18 02:13:12.879: SSG-CTL-EVN: Host Mac Address lookup failed

Jun 18 02:13:12.879: SSG-CTL-EVN: Activate the HostObject.

Link=Virtual-Access3

!--- Host object is active.

Jun 18 02:13:12.879: SSG-CTL-EVN: ##### ssg_l2tp_ip_up:

03:49:01: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Wanneer een client een HTTP-sessie naar de SSD-server initieert, ziet de gebruiker de startpagina van de SSD-server.

Opmerking: Vergeet niet de SSD-serverhandeling te starten door de UNIX shell opdracht root@crazyball[/export/home/ssd251/ssd]startSSD.sh uit te geven.

Hoe test ik de SSD single-aanmelding optie?

1. Configureer de parameter (REAUTHENTICATE=off) in het dashboard.conf-bestand. De standaardwaarde is REAUTHENTICATE=on.

2. Log in op een webpagina op de SSD. Wanneer u bijvoorbeeld inlogt op de startpagina van de service van cairo.com, sluit u uw browser en opent u deze vervolgens opnieuw met http://10.200.56.40:8080.

Het host-object op de SSD zit nog in het cache, dus u moet opnieuw kunnen inloggen op de SSD-servicepagina waarop u eerder bent aangemeld. Het standaardgedrag moet opnieuw worden geauthentiseerd op de SSD; U moet dus naar de startpagina van de SSD-aanmelding.

Hoe voer ik de foutoplossing uit?

1. Typ https://10.200.56.40:8443/log in de adresbalk van de browser.

2. Klik op Instellen optie. Alle graden die u hebt geselecteerd, worden uitgevoerd en de uitvoer wordt in een logbestand ingelogd. De bestandsnaam voor het logbestand is yy_mm_dd.request.log.

3. Navigeer naar de directory op de SSD-server waar de logbestanden zich bevinden.

4. Open het bestand/export/home/ssd251/ssd/logs op basis van een UNIX-editor.vi yy_mm_dd.request.log om de debug-uitvoer te bekijken.

Monster debug-uitvoer

NRP1-uitgang

arielle_nrp3# show debugging

SSG:

SSG data path packets debugging is on

SSG control path events debugging is on

SSG control path packets debugging is on

SSG packets debugging is on

Radius protocol debugging is on

Just before the SSD logon, the output of these debugs are :

Jun 18 23:30:08.414:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:09.530:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:11.142:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:11.494:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:12.482:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:13.310:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:14.462:

Jun 18 23:39:39.610: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.638:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.638:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.642: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.642:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.646: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.674:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.678:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.678: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.682:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.686:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.686: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.698: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.742: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 00:39:17.477: RADIUS: Initial Transmit  id 18 10.200.56.16:1645,

Access-Request, len 58

Jun 19 00:39:17.477:         Attribute 4 6 D45DC301

Jun 19 00:39:17.477:         Attribute 61 6 00000000

Jun 19 00:39:17.477:         Attribute 1 8 68697368

Jun 19 00:39:17.477:         Attribute 2 18 31B0CDC2

Jun 19 00:39:17.481: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 00:39:17.481: RADIUS: Received from id 18 10.200.56.16:1645,

Access-Accept, len 70

Jun 19 00:39:17.481:         Attribute 6 6 00000002

Jun 19 00:39:17.481:         Attribute 7 6 00000001

Jun 19 00:39:17.481:         Attribute 26 20 00000009FA0E4754

Jun 19 00:39:17.481:         Attribute 26 18 00000009FA0C4742

Jun 19 00:39:17.481: RADIUS: saved authorization data for user 61E73934 at

61E72A58

Jun 19 00:39:17.481: SSG-CTL-EVN: Creating HostObject for host

212.93.193.114.

Jun 19 00:39:17.489: SSG-CTL-EVN: Set Host Mac Address .

Jun 19 00:39:17.489: SSG-CTL-EVN: ** attr->type = 6

Jun 19 00:39:17.489: SSG-CTL-EVN: ATTR_LOOP = 1

Jun 19 00:39:17.489: SSG-CTL-EVN: ** attr->type = 7

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 2

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 3

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 4

Jun 19 00:39:17.493: SSG-CTL-EVN: Account logon is accepted

(212.93.193.114,hisham).

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 01:54:33.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: NONE

!--- No Services are active yet.

AutoService: NONE

Subscribed Services:

The following output also results from the debug commands that are turned on before the SSD logon.

Jun 19 02:06:39.529:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:40.789:

SSG-DATA:CEF-MulticastDest=1(AT0/0/0.61:14.14.14.5->224.0.0.10)

Jun 19 02:06:41.581:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:42.509:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:43.313:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:06:43.313: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:06:43.349:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:06:43.353:

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

!--- Message server IP & port adddress, and TCP port used. !--- This is configured in the dashboard.conf file.

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 01:54:33.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: NONE

AutoService: NONE

Subscribed Services:

arielle_nrp3#

De gebruiker is op dit moment niet aangemeld bij een service. De klant ziet eerst het Midden-Oosten, Caïro en daarna het Egyptische Kapitaal in de dienstenlijst op de SSD-website. Nadat de client op Egyptisch kapitaal heeft geklikt, verschijnen de velden gebruikersnaam en wachtwoord op de pagina. Er is nog geen actieve service aan de klant gekoppeld. De gebruikersnaam en het wachtwoord die de client biedt om toegang tot de service van cairo.com te verkrijgen moeten overeenkomen met die welke zijn geconfigureerd door de LNS (L2TP Network Server). In deze installatie authenticeert LNS de gebruikers lokaal. De gebruikersnaam is ayman@cairo.com en het wachtwoord is ayman.

L2TP-toegangsConcentrator (LAC)-uitvoer

arielle_nrp3# show debugging

SSG:

SSG data path packets debugging is on

SSG control path events debugging is on

SSG control path packets debugging is on

SSG packets debugging is on

VPN:

L2X protocol events debugging is on

L2X data packets debugging is on

L2X control packets debugging is on

L2TP data sequencing debugging is on

Radius protocol debugging is on

Jun 19 02:34:48.121:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:34:48.157:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:34:49.681:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.685: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.717:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.725:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.725: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.777: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.777: SSG-CTL-PAK: Received Packet:

sIP=10.200.56.40 sPort=37638 dIP=10.200.56.6 dPort=1645

Jun 19 02:34:49.777:    header: code=1, id=19, len=102,

auth=3F53BB3F2939DAA1E5D9435792491CD3

Jun 19 02:34:49.777:    attr: type=1, len=17, val=ayman@cairo.com

Jun 19 02:34:49.777:    attr: type=2, len=18, val=(89)(C4)/}(BB)(8F)

Jun 19 02:34:49.777:    attr: type=6, len=6, val=(00)(00)(00)(02)

Jun 19 02:34:49.777:    attr: type=26, len=23,

Jun 19 02:34:49.777: SSG-CTL-EVN: Downloading service profile for service

cairo.com.

Jun 19 02:34:49.777: RADIUS: ustruct sharecount=1

Jun 19 02:34:49.777: RADIUS: Initial Transmit  id 73 10.200.56.16:1645,

Access-Request, len 67

Jun 19 02:34:49.777:         Attribute 4 6 D45DC301

Jun 19 02:34:49.777:         Attribute 61 6 00000000

Jun 19 02:34:49.777:         Attribute 1 11 63616972

Jun 19 02:34:49.777:         Attribute 2 18 51CF64B7

Jun 19 02:34:49.777:         Attribute 6 6 00000005

Jun 19 02:34:49.785: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.785: RADIUS: Received from id 73 10.200.56.16:1645,

Access-Accept, len 275

Jun 19 02:34:49.785:         Attribute 6 6 00000005

Jun 19 02:34:49.785:         Attribute 26 27 0000000901157670

Jun 19 02:34:49.785:         Attribute 26 40 0000000901227670

Jun 19 02:34:49.785:         Attribute 26 30 0000000901187670

Jun 19 02:34:49.785:         Attribute 26 37 00000009011F7670

Jun 19 02:34:49.789: SSG-CTL-EVN: ##### ssg_l2tp_disc_cause: termCause=1026

Jun 19 02:34:49.789: SSG-CTL-EVN: ssg_l2tp_disc_routine:

Jun 19 02:34:49.801: SSG-CTL-EVN: Checking service mode.

Jun 19 02:34:49.801: SSG-CTL-EVN: ServiceLogon: Enqueue request of service

cairo.com

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 02:34:49.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: cairo.com

!--- A service is active.

AutoService: NONE

Subscribed Services:

arielle_nrp3# show ssg service cairo.com

------------------------ ServiceInfo Content -----------------------

Uplink IDB:

Name: cairo.com

Type: TUNNEL

Mode: CONCURRENT

Service Session Timeout: 0 seconds

Service Idle Timeout: 0 seconds

Authentication Type: CHAP

Next Hop Gateway Key: cairo.com_key

DNS Server(s):

TunnelId: nap

TunnelPassword: CAIRO

HomeGateway Addresses: 15.15.15.5

Included Network Segments:

15.15.15.4/255.255.255.252

Excluded Network Segments:

ConnectionCount 1

Full User Name not used

Domain List: cairo.com;

Active Connections:

1   : RealIP=212.93.197.114, Subscriber=212.93.193.114

------------------------ End of ServiceInfo Content ----------------

In de bovenstaande output is RealIP het IP-adres dat door het servicenetwerk aan gebruikersham wordt gegeven. Het veld Subscriber toont aan dat de hisham van de IP-adresgebruiker is gegeven door het SSG NRP-toegangsnetwerk.

arielle_nrp3# show ssg connection 212.93.193.114 cairo.com

------------------------ ConnectionObject Content -----------------------

User Name: ayman@cairo.com Owner

Host: 212.93.193.114 Associated Service: cairo.com Connection State: 0 (UP) Connection

Started since: 02:34:51.000 UTC Tue Jun 19 2001 User last activity at: 02:34:51.000

UTC Tue Jun 19 2001 Connection Real IP: 212.93.197.114 L2TP VIDB: Virtual-Access4

L2TP Session Key: 0 Connection Traffic Statistics: Input Bytes = 0 (HI = 0), Input

packets = 0 Output Bytes = 0 (HI = 0), Output packets = 0

LNS-uitgang

ior# show debugging VPN

L2X protocol events debugging is on

L2X data packets debugging is on

L2X control packets debugging is on

L2TP data sequencing debugging is on

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 0, len 8, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Parse SCCRQ

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 2, len 8, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Protocol Ver 256

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 3, len 10, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Framing Cap 0x0

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 4, len 10, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Bearer Cap 0x0

*Jun 18 19:27:09.855 PDT: L2X: Parse  AVP 6, len 8, flag 0x0

*Jun 18 19:27:09.855 PDT: L2X: I SCCRQ, flg TLS, ver 2, len 128, tnl 0, cl 0, ns 0, nr 0

C8 02 00 80 00 00 00 00 00 00 00 00 80 08 00 00

00 00 00 01 80 08 00 00 00 02 01 00 80 0A 00 00

00 03 00 00 00 00 80 0A 00 00 00 04 00 00 00 ...

*Jun 18 19:27:09.855 PDT: L2TP: I SCCRQ from nap tnl 13552

*Jun 18 19:27:09.855 PDT: Tnl 4818 L2TP: Got a challenge in SCCRQ, nap

*Jun 18 19:27:09.855 PDT: Tnl 4818 L2TP: New tunnel created for remote nap,

Gerelateerde informatie

- Cisco DSL-technologieondersteuning

- Technische ondersteuning en documentatie – Cisco Systems