Inhoud

Inleiding

Voordat u begint

Conventies

Voorwaarden

Gebruikte componenten

Achtergrondinformatie

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Uitvoer van voorbeeldopdracht

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document biedt voorbeeldconfiguraties voor 802.1Q (dot1q) trunking tussen een Catalyst 5500 en 5000 switch, beide die Catalyst OS (CatOS) in werking stellen. Alle Catalyst 4000, 5000 of 6000 familieleden die CatOS uitvoeren, kunnen in dit scenario worden gebruikt om dezelfde resultaten te behalen.

Trunks dragen het verkeer van meerdere VLAN's over één enkele verbinding, en staan u toe om VLAN's over een volledig netwerk uit te breiden. Twee manieren waarop Ethernet trunking kan worden geïmplementeerd zijn:

- InterSwitch Link (ISL)-protocol - ISL is een Cisco-eigen trunking-insluiting. Raadpleeg voor meer informatie over ISL het InterSwitch Link Frame Format.

- 802.1Q (IEEE-standaard) - 802.1Q is een trunking-insluiting die industriestandaard is. Voor meer informatie over 802.1Q, raadpleeg trunking tussen Catalyst 4000, 5000 en 6000 familieSwitches die 802.1Q insluiting gebruiken.

Voordat u begint

Conventies

Zie de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Voorwaarden

Dit document toont de configuratiebestanden uit de CatOS-switches en de uitvoer uit de corresponderende voorbeeldopdrachten. Voor meer informatie over het configureren van een 802.1Q romp tussen de Catalyst switches, raadpleeg het volgende document:

- Trunking tussen Catalyst 4000, 5000 en 6000 Series Switches met gebruik van 802.1Q insluiting

Gebruikte componenten

Om de voorbeelden in dit document te maken, werden de volgende switches gebruikt in een laboratoriumomgeving met geklaarde configuraties:

- Catalyst 5500 switch met Catalyst OS 6.4(2) software

- Catalyst 6500 switch met Catalyst OS 6.4(2) software

De configuraties op alle apparaten werden gewist met de duidelijke configuratie alle opdracht om er zeker van te zijn dat ze een standaardconfiguratie hadden.

De informatie in dit document is gebaseerd op apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als u in een levend netwerk werkt, zorg er dan voor dat u de potentiële impact van om het even welke opdracht begrijpt alvorens het te gebruiken.

Achtergrondinformatie

Let op het volgende:

- De Catalyst 4000 Series switches (inclusief Catalyst 2948G en Catalyst 2980G) ondersteunen alleen 802.1Q trunking, niet ISL-trunking. Raadpleeg voor meer informatie de systeemvereisten voor het uitvoeren van trunking.

- Alle Ethernet-poorten op Catalyst 6000/6500 ondersteunen 802.1Q en ISL-insluiting, met uitzondering van de 10 Gigabit Ethernet-switchmodule, die ISL niet ondersteunt.

- Afhankelijk van de module, ondersteunen Catalyst 5000 boomstampoorten alleen ISL-insluiting, of zowel ISL als 802.1Q. De beste manier om dit te verifiëren is de tonen opdracht van havenmogelijkheden uit te geven. De afvoercapaciteit wordt expliciet vermeld. Bijvoorbeeld:

cat5509> show port capabilities 2/1

Model                    WS-X5550

Port                     2/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

!-- This particular port supports both 802.1Q and ISL.

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  no

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on,desired),send-(off,on,desired)

Security                 no

Dot1x                    yes

Membership               static

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              no

ToS rewrite              no

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            no

SPAN                     source,destination

cat5509> (enable)

Raadpleeg voor meer informatie over systeemvereisten voor trunking de systeemvereisten voor het uitvoeren van trunking.

- Zorg dat de trunking modi overeenkomen over de hoofdlink. Als een kant van de link is geconfigureerd als een ISL-romp, moet de andere kant van de link ook worden geconfigureerd als ISL. Op dezelfde manier moet, als één kant van de link is geconfigureerd als 802.1Q, de andere kant van de link ook worden geconfigureerd als 802.1Q.

- In trunking van 802.1Q, worden alle VLAN-pakketten op de verbinding van de boomstam, behalve het inheemse VLAN getagd. De lokale VLAN-pakketten worden niet gelabeld op de hoofdkoppeling. Daarom moet het native VLAN op beide switches dezelfde zijn die voor trunking zijn ingesteld. Op deze manier kunnen we afleiden tot welk VLAN een frame hoort wanneer we een frame zonder tag ontvangen. Standaard is VLAN 1 het native VLAN op alle switches.

- In CatOS kan het native VLAN worden gewijzigd door de set VLAN vlan vlan-id mod/port opdracht uit te geven, waar mod/poort de boompoort is.

Raadpleeg voor meer informatie trunking tussen Catalyst 4000, 5000 en 6000 Series Switches die 802.1Q insluiting gebruiken.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten in dit document, gebruikt u het Opdrachtplanningprogramma (alleen geregistreerd klanten).

Netwerkdiagram

Dit document gebruikt de netwerkinstellingen die in het onderstaande schema zijn weergegeven.

Configuraties

Dit document maakt gebruik van de onderstaande configuraties.

Opmerking: Commentaar tussen de uitgangen wordt toegevoegd in de blauwe cursief.

- Catalyst 5509

- Catalyst 6500

Catalyst 5509

#version 6.4(2)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5509

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network, set the VLAN Trunking Protocol (VTP) !--- mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP on Catalyst Switches.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-supg.6-4-2.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor IIIG

!--- The dot1q trunking mode is set to on. Depending on your network !--- and requirements, set the trunking mode accordingly.

set trunk 2/1  on dot1q 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports.

!

#module 3 empty

!

#module 4 empty

#module 5 : 24-port 10/100BaseTX Ethernet

!--- Ports 5/3-24 have been assigned to VLAN 2.

set vlan 2    5/3-24

!--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 5/2-24 enable

!--- For details on why to enable portfast,refer to !--- Using PortFast and Other Commands to Fix Workstation Startup Connectivity Delays.

!

#module 6 empty

!

!--- Output suppressed.

end

Catalyst 6500

#Version 6.4(2)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat6500

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to !--- Configuring VTP on Catalyst Switches.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

!--- The lines below are wrapped around for display reasons.

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state   active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state

active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state

active mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat6000-sup2.6-4-2.bin

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisorset module name    1

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 8-port 1000BaseX Ethernet

set module name    3

!--- The dot1q trunking mode is set to on. Depending on your network !--- and requirements, set the trunking mode accordingly.

set trunk 3/1  on dot1q 1-1005,1025-4094

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports.

!

#module 4 : 48-port 10/100BaseTX Ethernet

!--- Ports 4/3-24 have been assigned to VLAN 2.

set vlan 2    4/3-48

!--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-48 enable

!--- For details on why to enable portfast, refer to !--- Using PortFast and Other Commands to Fix Workstation Startup Connectivity Delays.

!

#module 5 : 12-port 10BaseFL Ethernet

end

!--- Output suppressed.

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie correct werkt.

Bepaalde show opdrachten worden ondersteund door het uitvoergereedschap van de tolk (alleen geregistreerde klanten), waardoor u een analyse van show opdracht uitvoer kunt bekijken.

- Module voor poortfuncties/poort tonen

- poortmodule/poort tonen

- toonbank

- vtp-domein tonen

Uitvoer van voorbeeldopdracht

Catalyst 5509 Switch

U kunt onder meer de volgende opdrachten gebruiken om de trunking-configuraties te controleren:

toon port mogelijkheden module/poort - deze opdracht wordt gebruikt om te controleren of de poort trunking kan uitvoeren.

cat5509> (enable)  show port capabilities 2/1

Model                    WS-X5550

Port                     2/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

!--- This particular port supports both 802.1Q and ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  no

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on,desired),send-(off,on,desired)

Security                 no

Dot1x                    yes

Membership               static

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              no

ToS rewrite              no

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            no

SPAN                     source,destination

cat5509> (enable)

toon port module/poort - Deze opdracht vertelt de status van een bepaalde poort en of het al dan niet trunking is.

cat5509> (enable) show port 2/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

2/1                     connected  trunk      normal   full  1000 1000BaseSX

Port   Trap      IfIndex

-----  --------  -------

2/1   disabled  47

Port     Broadcast-Limit Broadcast-Drop

-------- --------------- --------------

2/1                   -              0

Port  Send FlowControl  Receive FlowControl   RxPause    TxPause    Unsupported

admin    oper     admin     oper                              opcodes

----- -------- -------- --------- ---------   ---------- ---------- -----------

2/1  desired  off      off       off         0          0          0

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

2/1           0          0          0          2         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

2/1           0          0          0          0         0         0         -

!--- Output suppressed.

Strommelbak - Deze opdracht wordt gebruikt om de trunking status en configuratie te controleren.

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

vtp-domein tonen - Deze opdracht wordt gebruikt om de VTP-informatie te controleren.

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Als u de uitvoer hebt van een opdracht voor ondersteuning van uw Cisco-apparaat, kunt u Output Interpreter (alleen geregistreerde klanten) gebruiken om mogelijke problemen en oplossingen weer te geven.

Catalyst 6500 Switch

Hieronder volgen een aantal opdrachten die worden gebruikt om de trunking-configuraties te controleren:

toon port mogelijkheden module/poort - deze opdracht wordt gebruikt om te controleren of de poort trunking kan uitvoeren.

cat6500> (enable) show port capabilities 3/1

Model                    WS-X6408A-GBIC

Port                     3/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1p1q4t),tx-(1p2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            no

SPAN                     source,destination

COPS port group          3/1-4

Link debounce timer      yes

toon port module/poort - Deze opdracht vertelt de status van een bepaalde poort en of het al dan niet trunking is.

cat6500> (enable) show port 3/1

Port  Name                 Status     Vlan       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full  1000 1000BaseSX

Port  Security Violation Shutdown-Time Age-Time Max-Addr  Trap    IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1   disabled shutdown     0             0       1      disabled   61

!--- Output suppressed.

Strommelbak - Deze opdracht wordt gebruikt om de trunking status en configuratie te controleren.

cat6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           dot1q          trunking      1

Port Vlans allowed on trunk

-------- ---------------------------------------------------------------------

3/1 1-1005,1025-4094

Port Vlans allowed and active in management domain

-------- ---------------------------------------------------------------------

3/1 1-2

Port Vlans in spanning tree forwarding state and not pruned

-------- ---------------------------------------------------------------------

3/1 1-2

vtp-domein tonen - Deze opdracht wordt gebruikt om de VTP-informatie te controleren.

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Trunking tussen Catalyst 4000, 5000 en 6000 Series Switches met gebruik van 802.1q insluiting

- VLAN-trunks configureren op Fast Ethernet- en Gigabit Ethernet-poorten

- VTP configureren op Catalyst Switches

- Gebruik van PortFast en andere opdrachten voor het repareren van de connectiviteit van het werkstation

- Ondersteuning voor LAN-switching technologie

- Productondersteuning voor Catalyst LAN- en ATM-Switches

- Technische ondersteuning - Cisco-systemen