Inhoud

Inleiding

Voorwaarden

Hardware en softwareversies

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Opdrachten weergeven

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie van hoe u een Standaard route van de Rand Gateway Protocol (IPv6 BGP) aan het Uitgebreide Interior Gateway Routing Protocol (DHCPv6) opnieuw distribueert door middel van wederzijdse herverdeling tussen DHCPv6 en IPv6 BGP.

Voorwaarden

Zorg ervoor dat u aan deze vereisten voldoet voordat u deze configuratie probeert:

- Zorg voor een basiskennis van Eurv6

- beschikken over basiskennis van IPv6-BGP

- beschikken over basiskennis van IPv6-adressering

Hardware en softwareversies

De configuraties in dit document zijn gebaseerd op Cisco 7200 Series router met Cisco IOS® softwarerelease 15.0(1).

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

In dit voorbeeld communiceren routers R2 en R1 met elkaar via IPv6 eBGP. Routers R1 en R3 gebruiken EHWv6. De standaardroute wordt gecreëerd in router R2 door het standaard-originate bevel van de buur uit te geven. Om de IPv6 eBGP-routes in te verdelen in wanneer u Ev6 gebruikt, herverdelt u de bgp opdracht met metriek. Op dezelfde manier, om routes Ev6 opnieuw te verdelen in IPv6BGP, gebruik het redistribueren van eigrp AS nummeropdracht onder de adres-familieconfiguratiemodus.

N.B.: Gebruik het Opdrachtupgereedschap (alleen geregistreerde klanten) om meer informatie te vinden over de opdrachten die in dit document worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Configuraties

Dit document gebruikt deze configuraties:

- router R1

- router R2

- router R3

router R1

R1#show run

Building configuration...

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address BB10::10/128

!

interface Loopback20

no ip address

ipv6 address BB20::20/128

!

interface Loopback30

no ip address

ipv6 address BB30::30/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::11/64

serial restart-delay 0

!

interface Serial1/1

no ip address

ipv6 address 4040:1:1:1::10/64

ipv6 eigrp 1

serial restart-delay 0

!

!

router bgp 505

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 500

no auto-summary

!

address-family ipv6

redistribute eigrp 1

!--- EIGRP is redistributed in to BGP.

no synchronization

network BB10::10/128

network BB20::20/128

neighbor 3030:1:1:1::10 activate

exit-address-family

!

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

redistribute bgp 505 metric 100 1 255 1 1500

!--- EIGRP for IPv6 has a shutdown feature. !--- Make sure that the routing process is in "no shut" mode !--- in order to start running the protocol.

!--- BGP is redistributed with EIGRP default metrics.

!

end

router R2

R2#show run

Building configuration...

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address AB10::10/128

!

interface Loopback20

no ip address

ipv6 address AB20::20/128

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::10/64

serial restart-delay 0

!

router bgp 500

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 505

neighbor 3030:1:1:1::11 default-originate

no auto-summary

!

address-family ipv6

no synchronization

network AB10::10/128

network AB20::20/128

neighbor 3030:1:1:1::11 activate

neighbor 3030:1:1:1::11 default-originate

exit-address-family

!

end

!--- Originates default route to the !--- neighbor 3030:1:1:1::11.

router R3

R3#show run

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Loopback10

no ip address

ipv6 address CC10::10/128

ipv6 eigrp 1

!

interface Loopback20

no ip address

ipv6 address CC20::20/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 4040:1:1:1::11/64

ipv6 eigrp 1

serial restart-delay 0

!

!

ipv6 router eigrp 1

eigrp router-id 3.3.3.3

!

end

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt.

Het Uitvoer Tolk (uitsluitend geregistreerde klanten) (OIT) ondersteunt bepaalde show opdrachten. Gebruik de OIT om een analyse van de opdrachtoutput van de show te bekijken.

Opdrachten weergeven

Om te verifiëren dat de router R3 de opnieuw gedistribueerde IPv6 BGP standaardroute ontvangt, gebruik de ipv6 route eigrp opdracht in router R3.

tonen ipv6-route eigrp

In router R3
R3#show ipv6 route eigrp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

EX  ::/0 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB10::10/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB20::20/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

D   BB30::30/128 [90/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the default route !--- is redistributed in EIGRP. EX indicates EIGRP external routes.

Om de routes Ev6 in router R2 goed te redistribueren, gebruik het tonen IP6 route bgp opdracht in router R2.

IPv6-route

In router R2
R2#show ipv6 route bgp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

B   BB10::10/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   BB20::20/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC10::10/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC20::20/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the eigrp routes !--- are redistributed in to BGP.

Controleer de bereikbaarheid tussen routers R2 en R3 met de ping-opdracht.

pingelen

Van router R2:

R2#ping  CC10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/40/96 ms

R2#ping CC20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/44/100 ms

Van router R3:

R3#ping AA10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

R3#ping AA20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

!--- The above ping responses shows that R1 and R3 are able !--- to communicate with each other.

Gerelateerde informatie

- BGP-ondersteuningspagina

- IPv6-ondersteuningspagina

- Cisco IOS IPv6-opdrachtreferentie

- BGP-casestudy’s

- Categoriepagina voor EKE-ondersteuning

- Technische ondersteuning en documentatie – Cisco Systems