Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe u een stand-by Hot Standby Router Protocol (HSRP) voor IPv6 (HSRPv2) kunt configureren om een object te volgen en de HSRP-prioriteit te wijzigen op basis van de staat van het object.

Elk getraceerd object heeft een uniek nummer dat is gespecificeerd in de tracking opdrachtregel interface (CLI). HSRPv2 gebruikt dit nummer om een specifiek object te volgen. Het volgen proces opinieert periodiek het getraceerde object voor waardemutaties en verstuurt elke verandering (als omhoog of omlaag waarden) naar HSRPv2, direct of na een gespecificeerde vertraging. Dit document gebruikt de opdracht interface om een te traceren interface te configureren.

Voorwaarden

Vereisten

Zorg ervoor dat u aan deze vereisten voldoet voordat u deze configuratie probeert:

- kennis van het configureren van HSRP; Raadpleeg HSRP configureren voor meer informatie.

- basiskennis van de uitvoering van IPv6-adressering en basisconnectiviteit; Raadpleeg IPv6-adressering en basisconnectiviteit voor meer informatie.

- Basiskennis van uitgebreide Objecttracering

- HSRPv2 moet op een interface worden ingeschakeld voordat HSRP IPv6 kan worden geconfigureerd.

- IPv6-routing moet op het apparaat zijn ingeschakeld zodat HSRP IPv6 kan worden geconfigureerd.

Gebruikte componenten

De configuraties in dit document zijn gebaseerd op de Cisco7200 Series router die Cisco IOS® softwarerelease 15.0(1) draait.

Conventies

Raadpleeg Cisco Technical Tips Convention voor informatie over documentconventies.

Configureren

De R2- en R3-routers worden via een seriële interface op R1 aangesloten. De Fast Ethernet interfaces van R2 en R3 worden zodanig geconfigureerd met HSRP IPv6 dat R2 als de actieve router werkt en R3 als de standby router fungeert. In router R2 wordt het tracking-proces ingesteld om de status van het interfacelijn-protocol van de seriële interface 1/0 bij te houden: Indien de seriële interface S1/0 van R2 daalt, verandert de R3 router zijn status van Standby in Actief.

N.B.: Gebruik het Opdrachtupgereedschap (alleen geregistreerde klanten) om meer informatie te vinden over de opdrachten die in dit document worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Configuraties

Dit document gebruikt deze configuraties:

- Configuratie van router R1

- Configuratie van router R2

- Configuratie van router R3

Configuratie van router R1

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::1/64

serial restart-delay 0

!

!

interface Serial1/1

no ip address

ipv6 address 2011:11:11:11::1/64

serial restart-delay 0

!

end

Configuratie van router R2

!

version 15.0

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

track 1 interface Serial1/0 line-protocol

!--- Tracking process 1 is configured in the router !--- to track state of the interface line protocol !--- of serial interface 1/0

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::2/64

serial restart-delay 0

!

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::10/64

standby version 2

standby 10 ipv6 autoconfig

!--- Assigns a standby group and standby IP address.

standby 10 preempt delay minimum 45

!--- The preempt command allows the router to become the !--- active router when it has the priority higher than all the other !--- HSRP-configured routers. Without this command, even if a router has higher !--- priority value, it will not become an active router. !--- The delay minimum value causes the local router to postpone !--- taking over the active role for a minimum of 45 seconds.

standby 10 track 1 decrement 10

!--- Configures HSRP to track an object and change the Hot Standby !--- priority on the basis of the state of the object.

!--- In this example,the HSRP tracks the interface s1/0 mentioned !--- in the track process 1.

!--- Decrement value specified the amount by which the Hot Standby !--- priority for the router is decremented (or incremented) when the tracked object !--- goes down (or comes back up). The range is from 1 to 255. The default is 10.

!

end

Configuratie van router R3

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Serial1/0

no ip address

ipv6 address 2011:11:11:11::2/64

serial restart-delay 0

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::11/64

standby version 2

standby 10 ipv6 autoconfig

standby 10 priority 95

standby 10 preempt delay minimum 45

!

end

Verifiëren

Gebruik de opdracht Show standby op de R2- en R3-routers om de configuratie te controleren.

router R2

R2#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:26:03

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 1.872 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C802:AFF:FE10:38, priority 95 (expires in 8.048 sec)

Priority 100 (default 100)

Track object 1 state Up decrement 10

Group name is "hsrp-Fa2/0-10" (default)

router R3

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Standby

4 state changes, last state change 00:26:25

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.176 secs

Preemption enabled, delay min 45 secs

Active router is FE80::C801:14FF:FEF4:38, priority 100 (expires in 9.888 sec)

MAC address is ca01.14f4.0038

Standby router is local

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Om tracking-informatie weer te geven, gebruikt u de opdracht Show track in router R2.

router R2

R2#show track 1

Track 1

Interface Serial1/0 line-protocol

Line protocol is Up

3 changes, last change 00:28:39

Tracked by:

HSRP FastEthernet2/0 10

!--- Displays the information about the objects that !--- are tracked by tracking process 1.

R2#show track int brief

Track   Object                           Parameter        Value Last Change

1       interface   Serial1/0            line-protocol    Up    00:31:19

!--- Displays the information about the tracked interface.

Als de actieve router (R2 in dit voorbeeld) omlaag gaat, verandert de standby router zijn status direct in Actief zoals in deze tabel wordt getoond:

Wanneer de actieve router (R2) naar beneden gaat...

router R2
R2(config)#interface s1/0

R2(config-if)#shut

R2(config-if)#

*May 21 20:56:54.223: %TRACKING-5-STATE: 1 interface Se1/0 line-protocol Up->Down

R2(config-if)#

*May 21 20:56:56.203: %LINK-5-CHANGED: Interface Serial1/0, changed state to administratively down

*May 21 20:56:57.203: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0, changed state to down

R2(config-if)#

*May 21 20:57:43.087: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Active -> Speak

R2(config-if)#

*May 21 20:57:54.479: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Speak -> Standby

!--- When the interface goes down, the active router changes !--- its state to Standby.

router R3

R3#

*May 21 20:56:53.419: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Standby-> Active

!--- The standby router is now the active router.

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:02:32

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.080 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C801:14FF:FEF4:38, priority 90 (expires in 9.664 sec)

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Ondersteuning van IPv6-technologie

- Eerste hop-redundantieprotocollen configureren in IPv6

- Hot Standby Router Protocol (HSRP): Veelgestelde vragen

- RFC 2281 - Cisco Hot Standby Router Protocol (HSRP)

- Technische ondersteuning en documentatie – Cisco Systems