Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor VPN-taakverdeling op een CSM-switchingmodule (Content Switching Module). Het in evenwicht brengen van de lading van VPN is een mechanisme dat intelligente VPN sessies langs een reeks VPN concentrators of de head-end apparaten van VPN distribueert. Om deze redenen wordt VPN-taakverdeling geïmplementeerd:

- het overwinnen van prestatie- of schaalbaarheidsbeperkingen voor VPN-apparaten; bijvoorbeeld pakketten per seconde, verbindingen per seconde en doorvoersnelheid

- om redundantie te bieden (verwijder één punt van mislukking)

Voorwaarden

Vereisten

Zorg ervoor dat u aan deze vereisten voldoet voordat u deze configuratie probeert:

- Voer de omgekeerde Route Injection (RRI) in de head-end apparaten in om de routeinformatie uit de spaken automatisch te verspreiden.

- Schakel VLAN 61 en 51 in om dezelfde vorm te delen.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco Catalyst 6500 met CSM-module

- Cisco 2621 router

- Cisco 7206 router

- Cisco 7206VXR router

- Cisco 7204VXR router

- Cisco 7140 router

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

Opmerking: Gebruik het Opname Gereedschap (alleen geregistreerde klanten) om meer informatie te verkrijgen over de opdrachten die in deze sectie worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Configuraties

Dit document gebruikt deze configuraties:

- CSM-configuratie

- Head-end routerconfiguratie - 7206VXR

- Spraakrouterconfiguratie - 7206

CSM-configuratie

Voer de volgende stappen uit:

1. Voer RI in de head-end apparaten uit, om de routinginformatie uit de spaken automatisch te verspreiden.

Opmerking: VLAN 61 en VLAN 51 delen dezelfde ubnet.

2. Defineert de VLAN-client en de VLAN-server.

3. Bepaal de sonde die wordt gebruikt om de status van de IPSec-servers te controleren.

!--- The CSM is located in slot 4.

module ContentSwitchingModule 4

vlan 51 client

ip address 172.21.51.244 255.255.255.240

!

vlan 61 server

ip address 172.21.51.244 255.255.255.240

!

probe ICMP_PROBE icmp

interval 5

retries 2

!

4. Defineer de serverboerderij met de echte IPSec servers.

5. Configuratie van mislukking purge, om de verbindingen te spoelen die aan dode servers behoren.

6. Definieer het kleverige beleid.

!--- Serverfarm VPN_IOS and real server members.

serverfarm VPN_IOS

nat server

no nat client

!--- Set the behavior of connections when the real servers have failed.

failaction purge

real 172.21.51.242

inservice

real 172.21.51.247

inservice

probe ICMP_PROBE

!

!--- Ensure that connections from the same client match the same server !--- load balancing (SLB) policy. !--- Use the same real server on subsequent connections; issue the !--- sticky command.

sticky 5 netmask 255.255.255.255 timeout 60

!

policy VPNIOS

sticky-group 5

serverfarm VPN_IOS

!

7. Defineer VServers, één per verkeersstroom.

!--- Virtual server VPN_IOS_ESP.

vserver VPN_IOS_ESP

!--- The virtual server IP address is specified.

virtual 172.21.51.253 50

!--- Persistence rebalance is used for HTTP 1.1, to rebalance the connection !--- to a new server using the load balancing policy.

persistent rebalance

!--- Associate the load balancing policy with the VPNIOS virtual server.

slb-policy VPNIOS

inservice

!

vserver VPN_IOS_IKE

virtual 172.21.51.253 udp 500

persistent rebalance

slb-policy VPNIOS

inservice

!

Head-end routerconfiguratie - 7206VXR

crypto isakmp policy 10

authentication pre-share

crypto isakmp key cisco123 address 0.0.0.0

!

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto mib ipsec flowmib history tunnel size 200

crypto mib ipsec flowmib history failure size 200

!

crypto dynamic-map mydyn 10

set transform-set myset

reverse-route

!

crypto map mymap 10 ipsec-isakmp dynamic mydyn

!

interface FastEthernet0/0

ip address 172.21.51.247 255.255.255.240

crypto map mymap

!

interface FastEthernet2/0

ip address 10.1.1.6 255.255.255.0

router eigrp 1

redistribute static

network 10.0.0.0

no auto-summary

no eigrp log-neighbor-changes

!

ip default-gateway 172.21.51.241

ip classless

ip route 0.0.0.0 0.0.0.0 172.21.51.241

no ip http server

!

Spraakrouterconfiguratie - 7206

crypto isakmp policy 10

authentication pre-share

crypto isakmp key cisco123 address 172.21.51.253

!

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto mib ipsec flowmib history tunnel size 200

crypto mib ipsec flowmib history failure size 200

!

crypto map mymap 10 ipsec-isakmp

set peer 172.21.51.253

set transform-set myset

match address 101

!

interface Loopback0

ip address 10.3.3.3 255.255.255.0

!

interface Ethernet0/0

ip address 172.21.51.250 255.255.255.240

duplex auto

crypto map mymap

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.21.51.241

no ip http server

!

access-list 101 permit ip 10.3.3.0 0.0.0.255 10.1.1.0 0.0.0.255

!

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt.

Het Uitvoer Tolk (uitsluitend geregistreerde klanten) (OIT) ondersteunt bepaalde show opdrachten. Gebruik de OIT om een analyse van tonen opdrachtoutput te bekijken.

- Geef de show module csm alle modeminhoud of showSwitchingModule alle opdracht uit; beide opdrachten genereren dezelfde informatie .

De opdracht SLB virtuele serverinformatie toont module contentSwitchingModule en alle servers.

Cat6506-1-Native# show module contentSwitchingModule all vservers

---------------------- CSM in slot 4 ----------------------

slb vserver      prot     virtual              vlan    state       conns

---------------------------------------------------------------------------

VPN_IOS_ESP      50     172.21.51.253/32:0      ALL   OPERATIONAL   2

VPN_IOS_IKE      UDP   172.21.51.253/32:500     ALL   OPERATIONAL   2

De show module contentSwitchingModule alle verbindingen opdracht toont SLB verbindingsinformatie.

Cat6506-1-Native# show module contentSwitchingModule all conns

---------------------- CSM in slot 4 ----------------------

prot vlan source                destination           state

----------------------------------------------------------------------

In  UDP  51   172.21.51.250:500     172.21.51.253:500     ESTAB

Out UDP  61   172.21.51.242:500     172.21.51.250:500     ESTAB

In  50   51   172.21.51.251         172.21.51.253         ESTAB

Out 50   61   172.21.51.247         172.21.51.251         ESTAB

In  50   51   172.21.51.250         172.21.51.253         ESTAB

Out 50   61   172.21.51.242         172.21.51.250         ESTAB

In  UDP  51   172.21.51.251:500     172.21.51.253:500     ESTAB

Out UDP  61   172.21.51.247:500     172.21.51.251:500     ESTAB

De show module contentSwitchingModule alle kleverige opdracht toont de SLB kleverige database.

Cat6506-1-Native# show module contentSwitchingModule all sticky

---------------------- CSM in slot 4 ----------------------

client IP:    172.21.51.250

real server:  172.21.51.242

connections:  0

group id:     5

timeout:      38

sticky type:  netmask 255.255.255.255

client IP:    172.21.51.251

real server:  172.21.51.247

connections:  0

group id:     5

timeout:      40

sticky type:  netmask 255.255.255.255

- Geef de opdracht tonen ip route op de router uit.

2621VPN# show ip route

!--- Output suppressed.

10.0.0.0/24 is subnetted, 3 subnets

D EX    10.2.2.0 [170/30720] via 10.1.1.6, 00:13:57, FastEthernet0/0

D EX    10.3.3.0 [170/30720] via 10.1.1.5, 00:16:15, FastEthernet0/0

C       10.1.1.0 is directly connected, FastEthernet0/0

D*EX 0.0.0.0/0 [170/30720] via 10.1.1.5, 00:37:58, FastEthernet0/0

[170/30720] via 10.1.1.6, 00:37:58, FastEthernet0/0

2621VPN#

7206VXR# show ip route

!--- Output suppressed.

172.21.0.0/28 is subnetted, 1 subnets

C       172.21.51.240 is directly connected, FastEthernet0/0

10.0.0.0/24 is subnetted, 3 subnets

S       10.2.2.0 [1/0] via 0.0.0.0, FastEthernet0/0

D EX    10.3.3.0 [170/30720] via 10.1.1.5, 00:16:45, FastEthernet2/0

C       10.1.1.0 is directly connected, FastEthernet2/0

S*   0.0.0.0/0 [1/0] via 172.21.51.241

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- VPN-taakverdeling voor CSM in configuratie-voorbeeld van verzendende modus

- Catalyst 6500 Series opdracht voor contentswitchingmodule voor Switch, versie 4.1(2)

- Technische ondersteuning en documentatie – Cisco Systems