Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Topologische grafiek

Configureren

Configuraties

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

In deze configuratie, twee verschillende X.25 bronnen (we hebben dspu-host gebruikt om de eindapparaten in deze instelling te simuleren). Verwijs voor meer informatie over downstreamfysieke eenheden (DSPU) naar deze documenten:

- Ondersteuning van DSPU en SNA servicepunt configureren

- Downstream fysieke eenheid vaak gestelde vragen

Deze twee eindapparaten communiceren met verschillende adapters op de website van het mainframe over X.25. De externe X.25 bronnen waren geconfigureerd voor verschillende doeladressen (in verschillende lengtes en verschillende adressen). Enige inkomende vraag waarvan het X.121-bestemmingsadres overeenkomt met het "qlc dlsw-subadres" van de router wordt verzonden naar Data Link Switching Plus (DLSw+) (met een ID.STN-type). Wanneer DLSw+ een vraag van "Kan u bereiken" over een virtueel MAC-adres in de pool ontvangt, probeert de Gekwalificeerde Logical Link Control (QLLC)-code om een Virtual Circuit (VC) in te stellen op het X.121-adres dat kaarten naar het virtuele MAC-adres dat is opgegeven. Als een inkomende vraag wordt ontvangen, stuurt QLLC een ID.STN.IND met een virtueel MAC-adres uit de pool naar DLSw+.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de software- en hardwareversies:

- Cisco IOS-softwarerelease 12.2(6a) werd gebruikt in patronen (Cisco 2612)

- Cisco IOS-softwarerelease 12.0(20)E is gebruikt in naam en knooppunt (Cisco 2500, Cisco 4000)

- Cisco IOS-softwarerelease 12.1(7)E werd gebruikt in Nexus (Cisco 4500)

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Topologische grafiek

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten in dit document, gebruikt u het Opdrachtplanningprogramma (alleen geregistreerd klanten).

Configuraties

De MAC-adressen van het mainframe zijn als volgt:

- 4000.7507.0000

- 400.7507.fff

Dit document gebruikt de configuraties die hier worden weergegeven:

- Cisco 7507 (mesh)

- Cisco 2612 (pasta’s)

- Cisco 4500 (Nesle)

- Cisco 2500 (naam)

- Cisco 4000 (groen)

Cisco 7507 (mesh)

source-bridge ring-group 100

dlsw local-peer peer-id 10.48.64.75 promiscuous

!

interface Channel4/2

ip address 10.48.64.225 255.255.255.240

no keepalive

lan TokenRing 0

source-bridge 88 1 100

adapter 0 4000.7507.0000

adapter 1 4000.7507.ffff

Cisco 2612 (pasta’s)

!

source-bridge ring-group 200

dlsw local-peer peer-id 10.48.64.40

dlsw remote-peer 0 tcp 10.48.64.75

!

interface Ethernet0/0

ip address 10.48.64.40 255.255.255.0

half-duplex

!

interface Serial0/0

no ip address

!

interface TokenRing0/0

no ip address

ring-speed 16

!

interface Serial0/1

no ip address

encapsulation x25

x25 alias .*

!--- It is used against the destination !--- address of a received call.

x25 htc 10

x25 win 7

x25 wout 7

qllc accept-all-calls

qllc dlsw subaddress 123456789012345 vmacaddr 4000.3333.0000 2 partner 4000.7507.0000

qllc dlsw subaddress 2224 vmacaddr 4000.2222.0000 2 partner 4000.7507.ffff

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

Cisco 4500 (Nesle)

!

x25 routing

!

!

!

interface Ethernet0

ip address 10.48.64.34 255.255.255.0

media-type 10BaseT

!

interface Ethernet1

no ip address

shutdown

media-type 10BaseT

!

interface Ethernet2

no ip address

media-type 10BaseT

!

interface Serial0

no ip address

encapsulation x25 dce

clockrate 250000

!

interface Serial1

no ip address

!

interface Serial2

no ip address

encapsulation x25 dce

no ip mroute-cache

clockrate 250000

!

interface Serial3

no ip address

encapsulation x25 dce

clockrate 250000

!

interface TokenRing0

no ip address

ring-speed 16

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

x25 route input-interface Serial2 interface Serial0

x25 route input-interface Serial3 interface Serial0

x25 route 555 interface Serial2

x25 route 666 interface Serial3

!

line con 0

exec-timeout 0 0

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password 7 071836

login

!

ntp clock-period 17179258

ntp server 10.48.64.100

end

Cisco 2500 (naam)

hostname namur

!

logging buffered 150000 debugging

enable password 7 120E12

!

dspu host OZDEN xid-snd 00000000 x25 2224 qllc 12 interface Serial1

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 555

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 12

dspu start OZDEN

!

interface TokenRing0

no ip address

no ip directed-broadcast

shutdown

!

Cisco 4000 (groen)

dspu host GOODE xid-snd 11132323 x25 123456789012345 qllc 20 interface Serial1

!

interface Ethernet0

ip address 10.48.64.17 255.255.255.0

no ip directed-broadcast

media-type 10BaseT

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 666

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 20

dspu start GOODE

!

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie actief is.

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

- tonen CLC2—Hiermee geeft u de LLC2 verbindingen weer die actief zijn in de router.

- informatie over de softwareversie en de displays weergeven.

- toon dlsw peer-displays dlsw peer verbindingsinformatie.

- toont stroomdetail van DLSW - Hiermee geeft u de details van het DLSW-circuit weer.

- Geef QLC serienummer 0/1-Informatie weer over QLLC seriële 0/1.

- Geef x25 interface-serie 0/1-Hier de status van de lijn en het protocol weer op X.25 seriële interface 0/1.

- toon x25 route-Toont de X.25 routingtabel.

- toon x25 interface-serienummer 0-Hier wordt de status van de lijn en het protocol weergegeven op X.25 seriële interface 0.

- Geef de status van de DSPU-functie weer.

- toon x25 interface seriële 1-Hier wordt de status van de lijn en het protocol weergegeven op X.25 seriële interface 1.

Meatfeast

#show llc2

....

Channel4/2 DTE: 4000.7507.ffff 4000.2222.0000 04 04 state NORMAL

V(S)=1, V??)=1, Last N??)=1, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5430/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Channel4/2 DTE: 4000.7507.0000 4000.3333.0000 04 04 state NORMAL

V(S)=6, V??)=6, Last N??)=6, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5630/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Pathos

pathos#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.2(6a), RELEASE SOFTWARE (fc1)

Copyright ??) 1986-2001 by cisco Systems, Inc.

Compiled Sat 01-Dec-01 22:30 by pwade

Image text-base: 0x80008088, data-base: 0x810616B4

pathos#show dlsw peer

Peers:                state     pkts_rx   pkts_tx  type  drops ckts TCP   uptime

TCP 10.48.64.75     CONNECT        118        91  conf      0    2   0 00:32:12

Total number of connected peers: 1

Total number of connections:     1

pathos#show dlsw circuit detail

Index           local addr(lsap)    remote addr(dsap)  state          uptime

234881048       4000.2222.0000(04)  4000.7507.ffff(04) CONNECTED      00:29:50

PCEP: 81C25730   UCEP: 81D88528

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:19; Rx CW:20, Granted:39; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             429/453        Info-frames:           1/1

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

1426063385      4000.3333.0000(04)  4000.7507.0000(04) CONNECTED      00:29:49

PCEP: 81D081B4   UCEP: 81D108B0

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:34; Rx CW:20, Granted:34; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             554/513        Info-frames:           6/6

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

Total number of circuits connected: 2

pathos#show qllc serial 0/1

Interface Serial0/1

vc 2 66620

Circuit State P4/D1, Logical Link State QLOpened 4000.3333.0000(04)->4000.7507.0000(04)

0 packets held

vc 1 55512

Circuit State P4/D1, Logical Link State QLOpened 4000.2222.0000(04)->4000.7507.ffff(04)

0 packets held

pathos#

pathos#show x25 interface  serial 0/1

SVC 1,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 55512 <-->

qllc 4000.2222.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 66620 <-->

qllc 4000.3333.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

pathos#

Nesle

nesle#show x25 route

#  Match                         Substitute          Route to

1  input-int Serial2                                 Serial0

2  input-int Serial3                                 Serial0

3  dest 555                                          Serial2

4  dest 666                                          Serial3

nesle#show x25 interface serial 0

SVC 1,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 55512 <--> 2224 from Serial2 SVC 10

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 66620 <--> 123456789012345 from Serial3 SVC 1024

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 2

SVC 10,  State: D1,  Interface: Serial2

Started 00:32:51, last input 00:32:50, output 00:32:50

Connects 55512 <--> 2224 to Serial0 SVC 1

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 3

SVC 1024,  State: D1,  Interface: Serial3

Started 00:32:53, last input 00:32:52, output 00:32:52

Connects 66620 <--> 123456789012345 to Serial0 SVC 2

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

Namur

namur#show dspu

dspu host OZDEN Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 8 FRAMES SENT 8

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 0

namur#show x25 interface serial 1

SVC 10,  State: D1,  Interface: Serial1

Started 00:34:55, last input 00:34:54, output 00:34:54

Connects 2224 <-->

qllc

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

namur#

Goode

goode#show dspu

dspu host GOODE Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 18 FRAMES SENT 18

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 5

goode#show x25 interface serial 1

SVC 1024,  State: D1,  Interface: Serial1

Started 00:41:25, last input 00:41:25, output 00:41:25

Connects 123456789012345 <-->

qllc

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

goode#

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Ondersteuning van Data-Link Switching Plus (DLSw+) technologie

- IBM-technologieondersteuning

- Technische ondersteuning en documentatie – Cisco Systems