Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Problemen oplossen

Opdrachten voor troubleshooting

Uitvoer van voorbeeldprobleemoplossing

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor het implementeren van een ISDN-back-up met drijvende statische routes en biedt basisinformatie over het oplossen van problemen voor dit type configuratie.

Raadpleeg voor informatie over de meest gebruikelijke implementaties van ISDN-back-up en vergelijkingen tussen deze onderdelen het volgende document: Evalueren van back-upinterfaces, zwevende statische routen en Dialer Watch voor DDR-back-up.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de onderstaande software- en hardwareversies.

- Twee Cisco 2500 routers die Cisco IOS®-softwarereleases 12.2(3) en 12.2(5) uitvoeren

De informatie in dit document is gebaseerd op apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als u in een levend netwerk werkt, zorg er dan voor dat u de potentiële impact van om het even welke opdracht begrijpt alvorens het te gebruiken.

Conventies

Zie de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten die in dit document worden gebruikt, gebruikt u het Opdrachtupgereedschap (alleen geregistreerde klanten).

Netwerkdiagram

Dit document gebruikt de netwerkinstellingen die in het onderstaande schema zijn weergegeven.

Configuraties

Dit document maakt gebruik van de onderstaande configuraties.

- krimson (Cisco 2500 router)

- Kevin (Cisco 2500 router)

krimson (Cisco 2500 router)

krimson#show running-config

Building configuration...

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname krimson

!

username kevin password 0 <password>

!

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.7.7.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.1 255.255.255.0

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

dialer pool-member 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.1 255.255.255.0

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool 1

dialer remote-name kevin

dialer string 8114

dialer-group 1

no cdp enable

ppp authentication chap

!

ip classless

ip route 10.8.8.0 255.255.255.0 10.1.2.2

ip route 10.8.8.0 255.255.255.0 10.9.9.2 180

no ip http server

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

Kevin (Cisco 2500 router)

kevin#show running-config

Building configuration...

Current configuration : 1205 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname kevin

!

username krimson password 0 <password>

!

isdn switch-type basic-net3

!

!

!

interface Loopback0

ip address 10.8.8.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.2 255.255.255.0

clockrate 2000000

!

interface Serial1

no ip address

shutdown

!

interface BRI0

no ip address

encapsulation ppp

dialer pool-member 1

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer remote-name krimson

dialer string 8113

dialer-group 1

no cdp enable

ppp authentication chap

!

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie correct werkt.

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

- Toon ip route - Hiermee wordt IP routing in tabelgedeelten weergegeven.

- Toont interfaces - statistieken van alle interfaces die op de router of toegangsserver zijn geconfigureerd.

Problemen oplossen

Deze sectie bevat informatie waarmee u problemen met de configuratie kunt oplossen.

Opdrachten voor troubleshooting

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

Opmerking: Voordat u debug-opdrachten afgeeft, raadpleegt u Belangrijke informatie over debug-opdrachten.

- debug ISDN Q931 - Informatie over installatie bij oproepen en verwijdering van ISDN-netwerkverbindingen (Layer 3) tussen de lokale router (gebruikerszijde) en het netwerk.

- debug ISDN-gebeurtenissen - gebeurtenissen van ISDN die aan de gebruikerszijde (op de router) van de ISDN-interface plaatsvinden. De ISDN-gebeurtenissen die kunnen worden weergegeven, zijn Q.931-gebeurtenissen (installatie en verwijdering van ISDN-netwerkverbindingen).

- debug dialer - Hiermee geeft u informatie over de pakketten of gebeurtenissen op een dialerinterface weer.

- debug ppp onderhandeling - veroorzaakt het debug ppp bevel om PPP pakketten die tijdens PPP opstarten worden verzonden te tonen, waar PPP opties worden besproken.

- debug van PPP-verificatie - veroorzaakt de debug ppp-opdracht om verificatieprotocolberichten weer te geven, inclusief Challenge Verificatie Protocol (CHAP)-pakketuitwisselingen en Wachtwoord Verificatieprotocol (PAP)-uitwisselingen.

Uitvoer van voorbeeldprobleemoplossing

Hier kunnen we de reservefunctionaliteit testen door de shutdown te gebruiken en geen sluitingsopdrachten op de seriële interface aan de afstandszijde. Dit leidt derhalve tot de verdwijning van de primaire ip-route naar het betrokken doelnetwerk.

Laten we eerst de beginstatus van de primaire interface en de ip-routingtabel bekijken:

Kant bellen:

krimson#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:07, output 00:00:07, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 1000 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

92 packets input, 7599 bytes, 0 no buffer

Received 62 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

99 packets output, 8991 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

4 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

!--- The IP route for the destination network points to the primary link.

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

Zijde genoemd:

kevin#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:00, output 00:00:08, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

106 packets input, 9432 bytes, 0 no buffer

Received 71 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

98 packets output, 8016 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

kevin#

Nu kunnen we de koppelingsfout simuleren door de opdracht shutdown te gebruiken in de afstandsseriële interface:

krimson#

*Mar 4 15:25:18.302: %LINK-3-UPDOWN: Interface Serial0, changed state to

down

*Mar 4 15:25:19.302: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

We kunnen hier zien dat de primaire link naar beneden is gegaan.

krimson#show interface serial 0

Serial0 is down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:22, output 00:00:32, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

108 packets input, 8526 bytes, 0 no buffer

Received 78 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

114 packets output, 9895 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

5 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

krimson#

De routingtabeldetails tonen nu dat de drijvende statische route in de routingtabel is geïnstalleerd:

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

krimson#

Op de geroepen router, kunnen we de primaire verbindingsmislukking simuleren gesimuleerd door het bevel van de shutdown op de lokale seriële 0 interface te gebruiken:

kevin#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

kevin(config)#interface serial 0

kevin(config-if)#shutdown

*Mar 4 15:32:00.250: %LINK-5-CHANGED: Interface Serial0, changed state to

administratively down

*Mar 4 15:32:01.250: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 4 15:32:03.742: %SYS-5-CONFIG_I: Configured from console by console

Nu kunnen we zien dat de primaire link naar beneden gaat:

kevin#show interface serial 0

Serial0 is administratively down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:01:28, output 00:01:18, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

114 packets input, 9895 bytes, 0 no buffer

Received 79 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

108 packets output, 8526 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

Het ping-verkeer dat als interessant verkeer wordt gedefinieerd start de uitgaande vraag via de back-updialer 0-interface.

krimson#ping 10.8.8.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.8.8.1, timeout is 2 seconds:

*Mar 4 15:27:39.618: BR0 DDR: rotor dialout [priority]

*Mar 4 15:27:39.622: BR0 DDR: Dialing cause ip (s=10.9.9.1, d=10.8.8.1)

*Mar 4 15:27:39.626: BR0 DDR: Attempting to dial 8114

*Mar 4 15:27:39.642: ISDN BR0: TX -> SETUP pd = 8 callref = 0x09

*Mar 4 15:27:39.646: Bearer Capability i = 0x8890

*Mar 4 15:27:39.654: Channel ID i = 0x83

*Mar 4 15:27:39.658: Called Party Number i = 0x80, '8114',

Plan:Unknown, Type:Unknown

*Mar 4 15:27:39.718: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0x89

*Mar 4 15:27:39.722: Channel ID i = 0x89

*Mar 4 15:27:39.974: ISDN BR0: RX <- CONNECT pd = 8 callref = 0x89

*Mar 4 15:27:39.990: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:27:39.998: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:27:40.010: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:27:40.010: BR0:1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

*Mar 4 15:27:40.014: BR0:1 LCP: O .!!!CONFREQ [Closed] id 19 len 15

*Mar 4 15:27:40.018: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.022: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.030: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref = 0x09

*Mar 4 15:27:40.054: BR0:1 LCP: I CONFREQ [REQsent] id 9 len 15

*Mar 4 15:27:40.058: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.062: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.066: BR0:1 LCP: O CONFACK [REQsent] id 9 len 15

*Mar 4 15:27:40.066: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.070: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.074: BR0:1 LCP: I CONFACK [ACKsent] id 19 len 15

*Mar 4 15:27:40.078: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.082: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.082: BR0:1 LCP: State is Open

*Mar 4 15:27:40.086: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0 load]

*Mar 4 !

Suc15:27:40.090: BR0:1 CHAP: O CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:27:40.106: BR0:1 CHAP: I CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:27:40.110: BR0:1 CHAP: O RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:27:40.138: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:27:40.150: BR0:1 CHAP: I RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:27:40.158: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:27:40.162: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:27:40.166: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:27:40.170: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.186: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:27:40.190: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.190: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:27:40.194: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.202: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:27:40.206: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.206: BR0:1 IPCP: State is Open

*Mar 4 15:27:40.214: BR0:1 DDR: dialer protocol up

*Mar 4 15:27:40.218: Di0 IPCP: Install route to 10.9.9.2

*Mar 4 15:27:41.162: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to upcess rate is 80 percent (4/5), round-trip min/avg/max =

36/47/76 ms

krimson#

Tegelijkertijd tonen de uiteinden die op de geroepen kant lopen de volgende output voor deze zelfde vraag:

kevin#

*Mar 4 15:34:21.698: ISDN BR0: RX <- SETUP pd = 8 callref = 0x07

*Mar 4 15:34:21.706: Bearer Capability i = 0x8890

*Mar 4 15:34:21.714: Channel ID i = 0x89

*Mar 4 15:34:21.718: Calling Party Number i = 0xA1, '8113',

Plan:ISDN, Type:National

*Mar 4 15:34:21.734: Called Party Number i = 0xC1, '8114',

Plan:ISDN, Type:Subscriber(local)

*Mar 4 15:34:21.762: ISDN BR0: Event: Received a DATA call from 8113 on B1

at 64 Kb/s

*Mar 4 15:34:21.762: ISDN BR0: Event: Accepting the call id 0xC

*Mar 4 15:34:21.766: BR0:1: interface must be fifo queue, force fifo

*Mar 4 15:34:21.774: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:34:21.786: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:34:21.798: BR0:1 PPP: Treating connection as a callin

*Mar 4 15:34:21.802: BR0:1 PPP: Phase is ESTABLISHING, Passive Open [0 sess,

0 load]

*Mar 4 15:34:21.806: BR0:1 LCP: State is Listen

*Mar 4 15:34:21.818: ISDN BR0: TX -> CALL_PROC pd = 8 callref = 0x87

*Mar 4 15:34:21.826: Channel ID i = 0x89

*Mar 4 15:34:21.854: ISDN BR0: TX -> CONNECT pd = 8 callref = 0x87

*Mar 4 15:34:21.918: ISDN BR0: RX <- CONNECT_ACK pd = 8 callref = 0x07

*Mar 4 15:34:21.926: Channel ID i = 0x89

*Mar 4 15:34:21.978: BR0:1 LCP: I CONFREQ [Listen] id 19 len 15

*Mar 4 15:34:21.982: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.986: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:21.990: BR0:1 LCP: O CONFREQ [Listen] id 9 len 15

*Mar 4 15:34:21.994: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.994: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:21.998: BR0:1 LCP: O CONFACK [Listen] id 19 len 15

*Mar 4 15:34:22.002: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.006: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:22.030: BR0:1 LCP: I CONFACK [ACKsent] id 9 len 15

*Mar 4 15:34:22.034: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.034: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:22.038: BR0:1 LCP: State is Open

*Mar 4 15:34:22.042: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0

load]

*Mar 4 15:34:22.046: BR0:1 CHAP: O CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:34:22.050: BR0:1 CHAP: I CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:34:22.054: BR0:1 CHAP: Waiting for peer to authenticate first

*Mar 4 15:34:22.070: BR0:1 CHAP: I RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:34:22.078: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:34:22.082: BR0:1 CHAP: Processing saved Challenge, id 7

*Mar 4 15:34:22.090: BR0:1 CHAP: O RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:34:22.114: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:34:22.118: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:34:22.122: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:34:22.126: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.130: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:34:22.134: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.138: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:34:22.142: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.226: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:34:22.230: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.230: BR0:1 IPCP: State is Open

*Mar 4 15:34:22.242: BR0:1 DDR: dialer protocol up

*Mar 4 15:34:22.250: Di0 IPCP: Install route to 10.9.9.1

*Mar 4 15:34:23.114: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar 4 15:34:27.794: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

8113 krimson

De staat na de back-up is "omhoog":

krimson#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:13:26

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

36 packets input, 2160 bytes

36 packets output, 2160 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:33

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:26, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

126 packets input, 3664 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3777 bytes, 0 underruns

0 output errors, 0 collisions, 15 interface resets

0 output buffer failures, 0 output buffers swapped out

28 carrier transitions

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 3 masks

C 10.9.9.2/32 is directly connected, Dialer0

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

Op de opgeroepen zijde:

De staat na de back-up is "omhoog".

kevin#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.2/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:16:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

40 packets input, 2224 bytes

40 packets output, 2224 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:11

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:48, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

136 packets input, 3857 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3744 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

35 carrier transitions

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 3 masks

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.9.9.1/32 is directly connected, Dialer0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

Hier simuleren we het herstel van de primaire verbinding door de opdracht no shutdown te gebruiken op de afstandsseriële interface:

krimson#

*Mar 4 15:28:58.726: %LINK-3-UPDOWN: Interface Serial0, changed state to up

*Mar 4 15:28:59.730: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to up

De back-up wordt losgekoppeld nadat de tijdelijke versie is verstreken.

krimson#show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds Charges

Type Number Number Name Used Left Idle

Units/Currency

--------------------------------------------------------------------------------

Out 8114 kevin 120 1 118 0

--------------------------------------------------------------------------------

krimson#

*Mar 4 15:29:41.738: BR0:1 DDR: idle timeout

*Mar 4 15:29:41.742: BR0 DDR: has total 0 call(s), dial_out 0, dial_in 0

*Mar 4 15:29:41.746: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:29:41.750: %DIALER-6-UNBIND: Interface BR0:1 unbound from profile

Di0

*Mar 4 15:29:41.754: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.758: %ISDN-6-DISCONNECT: Interface BRI0:1 disconnected from

8114 kevin, call lasted 121 seconds

*Mar 4 15:29:41.774: ISDN BR0: TX -> DISCONNECT pd = 8 callref = 0x09

*Mar 4 15:29:41.782: Cause i = 0x8090 - Normal call clearing

*Mar 4 15:29:41.790: Di0 IPCP: Remove route to 10.9.9.2

*Mar 4 15:29:41.862: ISDN BR0: RX <- RELEASE pd = 8 callref = 0x89

*Mar 4 15:29:41.886: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 4 15:29:41.894: BR0:1 IPCP: State is Closed

*Mar 4 15:29:41.894: BR0:1 PPP: Phase is TERMINATING [0 sess, 0 load]

*Mar 4 15:29:41.898: BR0:1 LCP: State is Closed

*Mar 4 15:29:41.898: BR0:1 PPP: Phase is DOWN [0 sess, 0 load]

*Mar 4 15:29:41.902: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.910: ISDN BR0: TX -> RELEASE_COMP pd = 8 callref = 0x09

*Mar 4 15:29:42.886: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to down

De eerste staat is nu hersteld.

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

Gerelateerde informatie

- Ondersteuning van kiestechnologie

- Technische ondersteuning - Cisco-systemen