Inhoud

Inleiding

Voordat u begint

Conventies

Voorwaarden

Gebruikte componenten

BPdu Formats

Gerelateerde informatie

Inleiding

Dit document beschrijft DECen IEEE 802.1d Bridge Protocol Data Unit (BPDU)-formaten.

Voordat u begint

Conventies

Zie de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Voorwaarden

Er zijn geen specifieke voorwaarden van toepassing op dit document.

Gebruikte componenten

Dit document is niet beperkt tot specifieke software- en hardware-versies.

BPdu Formats

Een DECdu heeft het volgende formaat:

DEC code:     E1

bpdu type:    19 hello, 02 topology change notice

version:      01

bit field:    1 byte

1 : topology change notice

2 : topology change notice ack

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : use short timers

root priority:   2 bytes

root id:         6 bytes

root path cost:  2 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         1 byte

message age:     1 byte

hello time:      1 byte

max age:         1 byte

forward delay:   1 byte

Een IEEE 802.1d-DBP heeft het volgende formaat:

protocol id:   0000 IEEE 802.1d

version id:    00

bpdu type:     00 config bpdu, 80 tcn bpdu

bit field:     1 byte

1 : topology change flag

2 : unused    0

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : topology change ack

root priority    2 bytes

root id:         6 bytes

root path cost:  4 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         2 bytes

message age:     2 bytes in 1/256 secs

max age:         2 bytes in 1/256 secs

hello time:      2 bytes in 1/256 secs

forward delay:   2 bytes in 1/256 secs

Gerelateerde informatie

- Technische ondersteuning - Cisco-systemen