목차

소개

절차

소개

이 문서에서는 Cisco ASR(Aggregation Services Router) 5000 Series 및 5500 Series 라인 카드의 문제를 해결하는 절차에 대해 설명합니다.이 절차에서는 ASR 5000 또는 ASR 5500 섀시에서 생성된 SSD(Show Support Detail) 파일에서 얻은 일부 명령 및 키워드를 강조 표시합니다.각 명령의 출력에서는 장애가 발생한 카드의 증상을 제공하고 문제를 정확히 파악하는 데 도움이 됩니다.여기서 목표는 여러 가지 하드웨어 문제가 있으므로 특정 라인 카드에서 특정 문제를 해결하는 것이 아닙니다.또한 개별 상황은 충분히 다를 수 있으므로 일반적인 문제 해결 가이드가 문제가 될 수 있습니다.

절차

1. show alarm outstanding 명령을 입력합니다.
이 명령의 출력에는 실패한 카드가 표시됩니다.이 정보는 SSD에서 찾을 수 있습니다.

******** show alarm outstanding *******

Sev Object  Event

--- ------- -------------------------------------------------------------------------------------

CR  Card 7  Card Failure Detected on card 7 Device CPU_0 failure reason CARD_BOOT_TIMEOUT_EXPIRED

2. show snmp trap history verbose 명령을 입력합니다.
문제에 따라 발생한 하드웨어 장애에 따라 트랩이 생성됩니다.이 정보는 SSD의 일부입니다.

******** show snmp trap history verbose *******

Timestamp                Trap Information

------------------------ ----------------------------------------------------

Tue Jan 28 08:24:18 2014 Internal trap notification 9 (CardBootFailed) card 7 type Packet Services Card

3. show logs level error 명령을 입력합니다.
문제에 따라 발생한 하드웨어 오류에 대한 로그가 생성됩니다.  이 정보는 SSD에서 찾을 수 있습니다.

******** show logs level error *******

2014-Jan-28+08:39:35.669 [hat 3018 critical] [8/0/4429 <hatsystem:0> atsystem_fail.c:1192]

[hardware internal system syslog] Card Failure Detected on card 7 Device CPU_0

failure reason CARD_BOOT_TIMEOUT_EXPIRED

4. show card hardware 명령을 입력합니다.
명령의 출력에 카드에 버전 정보가 있습니다.이 정보는 SSD에 포함되어 있습니다.

******** show card hardware *******

Card 7:

Card Type               : Packet Services Card (R01)

Description             : PSC

Starent Part Number     : 530-02-0030 09

Starent Serial Num      : PLB43074818

Switch Fabric Modes     : control plane, switch fabric

(Version Information Unavailable) <--- Missing information due to card not accessible

5. show card diag 명령을 입력합니다.
명령의 출력에는 카드의 현재 및 마지막 오류와 카드의 사용 가능 여부가 포함됩니다.이 정보는 SSD에 포함되어 있습니다.

******** show card diag *******

Card 7:

Counters:

Successful Warm Boots : 2

(last at Friday March 02 15:02:37 EST 2012)

Successful Cold Boots : 21

(last at Monday December 16 14:09:24 EST 2013)

Total Boot Attempts   : 0

In Service Date       : Fri Jan 20 15:26:25 2012 (Estimated)

Status:

IDEEPROM Magic Number : Good

Boot Mode             : Normal

Card Diagnostics      : Pass

Current Failure       : Failure: Device=CPU_0, Reason=CARD_BOOT_TIMEOUT_EXPIRED,

(0x03001000)

(last at Tuesday January 28 08:39:35 EST 2014)

Last Failure          : Failure: Device=CPU_0, Reason=CARD_BOOT_TIMEOUT_EXPIRED,

(0x03001000)

(last at Tuesday January 28 08:39:35 EST 2014)

Card Usable           : No (Current Failure)

Current Environment:

Temperature: Card     : 23 C (limit 101 C)

Temperature: CPU0     : 23 C (limit 101 C)

Temperature: CPU1     : 25 C (limit 101 C)

Temperature: LM93     : 25 C (limit 101 C)

Voltage: 3.3V STANDBY : 3.285 V (min 3.130 V, max 3.458 V)

6. show task resources 명령을 입력합니다.
명령의 출력에는 실패한 카드에 대한 정보가 표시되지 않습니다.이 정보는 SSD에서 찾을 수 있습니다.

******** show task resources *******

task   cputime        memory     files      sessions

cpu facility      inst used allc   used  alloc used allc  used  allc S status

----------------------- --------- ------------- --------- ------------- ------

6/1 rmmgr           61 3.6%  10%   4.5M  23.0M   15  500    --    -- -   good

6/1 npumgr           6 1.5% 100%  81.4M 278.0M   26 1000    --    -- -   good

6/1 sitreap    6100841 0.0% 5.0%   0.1M  15.0M    4  100    --    -- -   good

6/1 msgd       6100839 0.8% 7.0%   0.8M  15.0M    6  500    --    -- -   good

6/1 nscontrol  6123706 0.2% 5.0%   1.4M  15.0M    9  500    --    -- -   good

<<<<<<<< 7/1 missing due to card 7 not running >>>>>>>>>

8/0 sitmain         80 0.0%  15%  10.9M  16.0M   14 1000    --    -- -   good

8/0 sitparent       80 0.1%  20%  10.5M  14.0M   11  500    --    -- -   good

8/0 evlogd           0 0.1%  95%  12.4M  70.0M   16 4000    --    -- -   good

8/0 drvctrl          0 2.7%  15%  14.7M  20.0M   19  500    --    -- -   good

8/0 hatsystem        0 0.4%  10%  10.2M  15.0M   13  500    --    -- -   good

8/0 hatcpu          80 0.1%  10%  10.1M  15.0M   12  500    --    -- -   good

7. show cpu table 명령을 입력합니다.
명령의 출력에는 실패한 카드에 대한 정보가 표시되지 않습니다.이 정보는 SSD의 일부입니다.

******** show cpu table *******

--------Load--------  ------CPU-Usage-----  ---------Memory--------

cpu  state     now   5min  15min     now   5min  15min    now  5min 15min total

----  -----  ------ ------ ------  ------ ------ ------  ----- ----- ----- -----

1/0  Actve    0.02   0.02   0.05    0.6%   0.5%   0.5%   842M  842M  842M 16.0G

1/1  Actve    2.39   2.48   2.59   11.7%   7.9%   7.9%   138M  137M  137M  512M

2/0  Actve    0.02   0.07   0.11    0.5%   0.5%   0.5%   887M  885M  885M 16.0G

2/1  Actve    2.83   2.78   2.66   10.4%   7.9%   8.0%   138M  137M  137M  512M

3/0  Actve    0.02   0.06   0.11    0.4%   0.4%   0.4%   824M  823M  823M 16.0G

3/1  Actve    3.71   2.96   2.80   13.4%   8.0%   7.8%   139M  137M  137M  512M

4/0  Actve    0.03   0.10   0.13    0.5%   0.5%   0.5%   845M  845M  845M 16.0G

4/1  Actve    2.34   2.55   2.61   11.8%   7.7%   7.7%   138M  137M  137M  512M

5/0  Actve    0.14   0.11   0.13    0.6%   0.5%   0.5%   887M  886M  885M 16.0G

5/1  Actve    2.49   2.84   2.75   12.7%   8.4%   7.9%   138M  137M  137M  512M

6/0  Actve    0.18   0.16   0.14    0.5%   0.4%   0.4%   824M  823M  822M 16.0G

6/1  Actve    2.85   2.78   2.74   12.5%   8.0%   8.0%   138M  137M  137M  512M

<<<<<<<< 7/1 missing due to card 7 not running >>>>>>>>>>

8/0  Actve    0.20   0.09   0.12   18.9%   6.4%   5.2%  1045M 1011M 1009M 4096M

9/0  Sndby    0.02   0.03   0.08    2.0%   0.7%   0.7%   605M  604M  604M 4096M

8. show card table all 명령을 입력합니다.
명령의 출력은 카드가 오프라인 상태임을 나타냅니다.이 정보는 SSD의 일부입니다.

******** show card table all *******

Slot         Card Type                         Oper State     SPOF  Attach

-----------  --------------------------------  -------------  ----  ------

1: PSC      Packet Services Card              Active         Yes    17  -

2: PSC      Packet Services Card A            Active         Yes    18  -

3: PSC      Packet Services Card A            Active         Yes    19  -

4: PSC      Packet Services Card A            Active         Yes    20  -

5: PSC      Packet Services Card A            Active         Yes    21  -

6: PSC      Packet Services Card A            Active         Yes    22  -

7: PSC      Packet Services Card              Offline        -       -  -

8: SMC      System Management Card            Active         No     24 25

9: SMC      System Management Card            Standby        Yes     -  -

10: PSC      None                              -              -       -  -

11: PSC      None                              -              -       -  -

12: PSC      None                              -              -       -  -

13: PSC      None                              -              -       -  -

14: PSC      None                              -              -       -  -

15: PSC      None                              -              -       -  -

16: PSC      None                              -              -       -  -

17: LC       10 Gig Ethernet Line Card         Active         Yes     1

18: LC       10 Gig Ethernet Line Card         Active         Yes     2

19: LC       10 Gig Ethernet Line Card         Active         Yes     3

20: LC       10 Gig Ethernet Line Card         Active         Yes     4

21: LC       1000 Ethernet Line Card           Standby        -       5

22: LC       1000 Ethernet Line Card           Standby        -       6

23: LC       None                              -              -       -

24: SPIO     Switch Processor I/O Card         Active         No      8

25: SPIO     Switch Processor I/O Card         Standby        -       8

26: LC       None                              -              -       -

27: LC       None                              -              -       -

28: LC       None                              -              -       -

29: LC       None                              -              -       -

30: LC       None                              -              -       -

31: LC       None                              -              -       -

32: LC       None                              -              -       -

33: LC       None                              -              -       -

34: LC       None                              -              -       -

35: LC       None                              -              -       -

36: LC       None                              -              -       -

37: LC       None                              -              -       -

38: LC       None                              -              -       -

39: LC       None                              -              -       -

40: RCC      Redundancy Crossbar Card          Standby        -

41: RCC      Redundancy Crossbar Card          Standby        -

42: LC       None                              -              -       -

43: LC       None                              -              -       -

44: LC       None                              -              -       -

45: LC       None                              -              -       -

46: LC       None                              -              -       -

47: LC       None                              -              -       -

48: LC       None

9. show hardware version 명령을 입력합니다.
카드가 오프라인이므로 명령 출력에 "사용 가능한 데이터가 없습니다"가 표시됩니다.  이 정보는 SSD의 일부입니다.

******** show hardware version *******

Slot Type     SSCB  PSR  PSR2    BIOS A    BIOS B       DT       DT2

---- ----  -------  ---  ----  --------  --------  -------  --------

1:   PSC      1.6    2     -    9.2.13    7.8.14     3.16        --

2:  PSCA      1.6    -     0    1.1.10    1.0.14       --      3.20

3:  PSCA      1.6    -     0    1.1.10    1.0.14       --      3.20

4:  PSCA      1.6    -     0    1.1.10    1.0.20       --      3.20

5:  PSCA      1.6    -     0    1.1.10    1.0.14       --      3.20

6:  PSCA      1.6    -     0    1.1.10    1.0.14       --      3.20

7:   PSC  (no data available)

10:  None       --    -     -        --        --       --        --

11:  None       --    -     -        --        --       --        --

12:  None       --    -     -        --        --       --        --

13:  None       --    -     -        --        --       --        --

14:  None       --    -     -        --        --       --        --

15:  None       --    -     -        --        --       --        --

16:  None       --    -     -        --        --       --        --

10. show nputrl events 명령을 입력합니다.
이 명령의 출력에는 실패한 카드의 상태가 오프라인, 부팅(루프 상태인 경우) 등으로 표시됩니다.이 정보는 SSD의 일부입니다.

******** show npuctrl events *******

[41]@01-28-2014 08:26:15.892 e/i=0/0 evt=exporter-done transition=await-exporter->normal spc=no

inst| npumgr-sta| card-state| card-inser        inst|npumgr-sta| card-state| card-inser

1|     normal|    standby|        yes           2|     normal|    standby|        yes

3|     normal|    standby|        yes           4|     normal|    standby|        yes

5|  export-db|    standby|        yes           6|  import-db| initializi|        yes

7|     absent|    booting|         no           8|     normal|     active|         no

9|     normal|    standby|        yes          10|     absent|      empty|         no

11|     absent|      empty|         no          12|     absent|      empty|         no

13|     absent|      empty|         no          14|     absent|      empty|         no

15|     absent|      empty|         no          16|     absent|      empty|         no

[42]@01-28-2014 08:54:08.041 e/i=6/1 evt=start-recovery transition=normal->await-importer-ack spc=no

inst| npumgr-sta| card-state| card-inser        inst|npumgr-sta| card-state| card-inser

1|   power-up| initializi|         no           2|     normal|     active|        yes

3|     normal|     active|        yes           4|     normal|     active|        yes

5|     normal|     active|        yes           6|     normal|     active|        yes

7|     absent|    offline|         no           8|     normal|     active|         no

9|     normal|    standby|        yes          10|     absent|      empty|         no

11|     absent|      empty|         no          12|     absent|      empty|         no

13|     absent|      empty|         no          14|     absent|      empty|         no

15|     absent|      empty|         no          16|     absent|      empty|         no

11. show temperature 명령을 입력합니다.
명령의 출력에는 실패한 카드의 일부 구성 요소의 온도만 표시됩니다.이 정보는 SSD의 일부입니다.

******** show temperature *******

Note:

Cards 6 and 7 are identical PSC cards but more components of good card are

shown than that of failed card.

Card  6:   29/101 C (LM94    )

58/115 C (NPU     )

43/101 C (NPU PCB )

44/101 C (DT      )

30/101 C (Midplane)

41/101 C (CPU-N1  )

43/110 C (IOH     )

30/100 C (DDR-N1C0)

31/100 C (DDR-N1C1)

Card  7:   23/101 C (CPU0    )

25/101 C (CPU1    )

25/101 C (LM93    )

12. show crash list 명령을 입력합니다.
이 명령의 출력에는 실패한 카드에 발생한 충돌이 표시됩니다.충돌 세부사항에서 "Hardware Error" 키워드를 찾습니다.이 정보는 SSD의 일부입니다.

******** show crash list *******

==         ====         =======  ========== =========== ================

#          Time         Process   Card/CPU/     SW         HW_SER_NUM

PID      VERSION   SMC / Crash Card

==         ====         =======  ========== =========== ================

1  2014-Feb-20+03:26:14 kernel   02/0/NA    14.0(NA)    SAD1726000V/SAD17010035

2  2014-Feb-20+09:24:38 kernel   02/0/NA    14.0(NA)    SAD1726000V/SAD17010035

********************* CRASH #01 ***********************

2.6.38-staros-v3-hw-64 #1 SMP PREEMPT Fri May 24 16:25:55 EDT 2013 1 0

SAD17010035 50083

.0 MMIO=90800000 MSI-X=32..63

<4>[    4.542816] > Module image device Init

<4>[    4.546668] --> Found components:

<6>[    4.821670] Refined TSC clocksource calibration: 2000.071 MHz.

<6>[    4.827687] Switching to clocksource tsc

<4>[    4.833859] 0,28,29,30,31,37,38,39,40,63,67,69

<6>[    4.838984] Starfile Build Number: 50083

------- truncated --------

<7>[   38.972206] dt_fpga 0000:01:00.0: restoring config space at offset 0x3

(was 0x0, writing 0x8)

<7>[   38.972214] dt_fpga 0000:01:00.0: restoring config space at offset 0x1

(was 0x100000, writing 0x100547)

<6>[   38.972269] DT reset complete after 0 retries

<6>[   42.565842] DT is now online

<4>[  157.055594] svc: failed to register lockdv1 RPC service (errno 97).

<6>[2128512.375560] [Hardware Error]: Machine check events logged

<6>[2193364.461636] [Hardware Error]: Machine check events logged

<0>[2196785.508632] [Hardware Error]: CPU 6: Machine Check Exception: 4

Bank 8: be0000000001009f

<0>[2196785.516865] [Hardware Error]: TSC fa3eb2f263a8b ADDR 106fefd5c0

MISC 1da0600000046343

<0>[2196785.524998] [Hardware Error]: PROCESSOR 0:206c2 TIME 1392846844

SOCKET 1 APIC 20

<0>[2196785.532533] [Hardware Error]: CPU 19: Machine Check Exception: 4

Bank 8: be0000000001009f

<0>[2196785.540840] [Hardware Error]: TSC fa3eb2f2640b7 ADDR 106fefd5c0

MISC 1da0600000046343

<0>[2196785.548976] [Hardware Error]: PROCESSOR 0:206c2 TIME 1392846844

SOCKET 1 APIC 23

----- truncated -------

<0>[2196785.756359] [Hardware Error]: TSC fa3eb2f271a7d ADDR 106fefd5c0

MISC 1da0600000046343

<0>[2196785.764488] [Hardware Error]: PROCESSOR 0:206c2 TIME 1392846844

SOCKET 1 APIC 32

<0>[2196785.772020] [Hardware Error]: CPU 18: Machine Check Exception: 4

Bank 8: be0000000001009f

<0>[2196785.780335] [Hardware Error]: TSC fa3eb2f263a95 ADDR 106fefd5c0

MISC 1da0600000046343

<0>[2196785.788464] [Hardware Error]: PROCESSOR 0:206c2 TIME 1392846844

SOCKET 1 APIC 21

<0>[2196785.795991] [Hardware Error]: Machine check: Processor context

corrupt

<0>[2196785.802660] Kernel panic - not syncing: Fatal machine check on

current CPU

<4>[2196785.809681] Pid: 0, comm: kworker/0:1 Tainted: P   M

2.6.38-staros-v3-hw-64 #1

<4>[2196785.817648] Call Trace:

<4>[2196785.820265]  <#MC>  [<ffffffff8104d444>] ? panic+0xd4/0x210

<4>[2196785.826025]  [<ffffffff8104e6ac>] ? printk+0x6c/0x70

<4>[2196785.831148]  [<ffffffff810726c4>] ? __atomic_notifier_call_chain+0x54/0x70

<4>[2196785.838162]  [<ffffffff810726f6>] ? atomic_notifier_call_chain+0x16/0x20

<4>[2196785.845008]  [<ffffffff81016da8>] ? mce_panic+0x208/0x210

<4>[2196785.850564]  [<ffffffff810176d4>] ? do_machine_check+0x604/0x890

<4>[2196785.856723]  [<ffffffff815a8dbb>] ? machine_check+0x1b/0x20

<4>[2196785.862449]  [<ffffffff8129fbaf>] ? intel_idle+0x9f/0x130

<4>[2196785.867993]  <<EOE>>  [<ffffffff81072e83>] ? pm_qos_request+0x43/0x80

<4>[2196785.874605]  [<ffffffff8145e64f>] ? cpuidle_idle_call+0xbf/0x2f0

<4>[2196785.880763]  [<ffffffff81001506>] ? cpu_idle+0x56/0xa0

<4>[2196785.886059]  [<ffffffff818edcd4>] ? start_secondary+0x1b4/0x230

<4>[2196785.892442] Logging crash to boot flash...

13. debug console card 명령을 입력합니다.
SSD의 이 부분에는 실패한 카드의 하드웨어 오류 세부 정보가 표시됩니다.이 정보는 SSD에서 찾을 수 있습니다.

******** debug console card 2 cpu 0 tail 4000 only *******

1392847108.339 card 2-cpu0: <4>[  162.266071] svc: failed to register lockdv1 RPC

service (errno 97).

1392847187.138 card 2-cpu0: <4>[  241.063929] mce_notify_irq: 1 callbacks suppressed

1392847187.138 card 2-cpu0: <6>[  241.068719] [Hardware Error]: Machine check events

logged

1392852796.521 card 2-cpu0: <6>[ 5850.625815] [Hardware Error]: Machine check events

logged

1392860403.004 card 2-cpu0: <6>[13457.344535] [Hardware Error]: Machine check events

logged

1392867612.569 card 2-cpu0: <0>[20667.120164] [Hardware Error]: CPU 9: Machine Check

Exception: 4 Bank 8: be0000000001009f

1392867612.569 card 2-cpu0: <0>[20667.128234] [Hardware Error]: TSC 25c13cfe4d7c ADDR

1045a9d5c0 MISC 1da0600000041281

1392867612.569 card 2-cpu0: <0>[20667.136123] [Hardware Error]: PROCESSOR 0:206c2

TIME 1392867612 SOCKET 1 APIC 30

1392867612.669 card 2-cpu0: <0>[20667.143504] [Hardware Error]: CPU 18: Machine Check

Exception: 4 Bank 8: be0000000001009f

---- truncated -----

1392867612.770 card 2-cpu0: <0>[20667.315270] [Hardware Error]: TSC 25c13d0097e4 ADDR

1045a9d5c0 MISC 1da0600000041281

1392867612.770 card 2-cpu0: <0>[20667.323160] [Hardware Error]: PROCESSOR 0:206c2

TIME 1392867612 SOCKET 1 APIC 24

1392867612.770 card 2-cpu0: <0>[20667.330533] [Hardware Error]: CPU 11: Machine

Check Exception: 4 Bank 8: be0000000001009f

1392867612.870 card 2-cpu0: <0>[20667.338688] [Hardware Error]: TSC 25c13d0099f6 ADDR

1045a9d5c0 MISC 1da0600000041281

1392867612.870 card 2-cpu0: <0>[20667.346574] [Hardware Error]: PROCESSOR 0:206c2 TIME

1392867612 SOCKET 1 APIC 34

1392867612.870 card 2-cpu0: <0>[20667.353947] [Hardware Error]: CPU 23: Machine Check

Exception: 4 Bank 8: be0000000001009f

1392867612.870 card 2-cpu0: <0>[20667.362100] [Hardware Error]: TSC 25c13d0099ec ADDR

1045a9d5c0 MISC 1da0600000041281

1392867612.870 card 2-cpu0: <0>[20667.369992] [Hardware Error]: PROCESSOR 0:206c2 TIME

1392867612 SOCKET 1 APIC 35

1392867612.870 card 2-cpu0: <0>[20667.377359] [Hardware Error]: CPU 21: Machine Check

Exception: 4 Bank 8: be0000000001009f

1392867612.870 card 2-cpu0: <0>[20667.385506] [Hardware Error]: TSC 25c13cfe4d68 ADDR

1045a9d5c0 MISC 1da0600000041281

1392867612.870 card 2-cpu0: <0>[20667.393395] [Hardware Error]: PROCESSOR 0:206c2 TIME

1392867612 SOCKET 1 APIC 31

1392867612.870 card 2-cpu0: <0>[20667.400765] [Hardware Error]: Machine check:

Processor context corrupt

1392867612.870 card 2-cpu0: <0>[20667.407275] Kernel panic - not syncing: Fatal

machine check on current CPU

1392867612.870 card 2-cpu0: <4>[20667.414136] Pid: 0, comm: kworker/0:1 Tainted:

P   M        2.6.38-staros-v3-hw-64 #1

1392867612.870 card 2-cpu0: <4>[20667.421945] Call Trace:

1392867612.870 card 2-cpu0: <4>[20667.424399]  <#MC>  [<ffffffff8104d444>]

? panic+0xd4/0x210

1392867612.870 card 2-cpu0: <4>[20667.430005]  [<ffffffff8104e6ac>]

? printk+0x6c/0x70

1392867612.870 card 2-cpu0: <4>[20667.434966]  [<ffffffff810726c4>]

? __atomic_notifier_call_chain+0x54/0x70

*1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0: CFE version 2.2.9 (34401) for BOXER_FROM_FLASH

(32bit,SP,LE,X86)

1392867660.394 card 2-cpu0: Build Date: Wed Jun 30 10:38:21 EDT 2010

(builds@releng7)

1392867660.394 card 2-cpu0: Copyright (C) 2001-2010 Starent Networks Corporation.

1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0: Initializing Arena.

1392867660.394 card 2-cpu0: Initializing PCI. [normal]

1392867660.394 card 2-cpu0: Initializing Devices.

1392867660.394 card 2-cpu0: Ophir 82571 Ethernet controller 0x10608086

(Serdes) on 2/0/0

1392867660.394 card 2-cpu0: WARNING: Memory size 49152 MB for cpu0 not

matching with

value 65536 MB in IDEEPROM

1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0: CPU type 0x0: 2000MHz

1392867660.394 card 2-cpu0: Total memory: 0xC00000000 bytes (49152MB)

1392867660.394 card 2-cpu0: Total memory used by CFE:

1392867660.394 card 2-cpu0:                 realmode: 0x00080000 -

0x00087140 (28992 bytes)

1392867660.394 card 2-cpu0:            protectedmode: 0x0C800000 -

0x0CC86A6C (4745836 bytes)

1392867660.394 card 2-cpu0: Done board_final_init...

1392867660.394 card 2-cpu0: Booting CFE ROM...

1392867660.394 card 2-cpu0: PID: ASR5K-PSC-64G-K9  , VID: V02, SN: SAD17010035

1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0: ERROR: Memory size 49152 MB for cpu0 not matching

with value 65536 MB in IDEEPROM

1392867660.394 card 2-cpu0:

1392867660.394 card 2-cpu0: ERROR: Bus 254 CPU 1 Chan 1 DIMM 0 NotPresent

1392867660.394 card 2-cpu0: Calling managementplane_init()

1392867660.394 card 2-cpu0: Calling managementplane_init() complete

1392867660.394 card 2-cpu0: Calling InitDPManagementPlaneEthernet()

1392867660.399 card 2-cpu0: Calling InitDPManagementPlaneEthernet() complete

1392867660.404 card 2-cpu0: CRITICAL: BIOS Failed to properly Size System

Memory aborting boot

1392867660.405 card 2-cpu0:

1392867660.410 card 2-cpu0: 2/0:cli> Boot Failure Detected.  Press Ctrl-C for cli

14. show leds all 명령을 입력합니다.
실행/실패 LED는 모두 녹색이어야 하며 대기 LED도 모두 녹색이어야 합니다.

[local]st40-1# show leds all

Slot 02: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 04: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 06: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 08: Run/Fail: Green       | Active:  Green       | Standby: Off

Status:   Green       | Service: Amber       |

Slot 09: Run/Fail: Green       | Active:  Off         | Standby: Green

Status:   Green       | Service: Amber       |

Slot 11: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 13: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 15: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 18: Run/Fail: Red         | Active:  Off         | Standby: Off <<hardware failure

Slot 22: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 24: Run/Fail: Green       | Active:  Green       | Standby: Off

Slot 25: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 27: Run/Fail: Green       | Active:  Off         | Standby: Off

Slot 34: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 38: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 40: Run/Fail: Green       | Active:  Off         | Standby: Green

Slot 41: Run/Fail: Green       | Active:  Off         | Standby: Green

15. show port table all 명령을 입력합니다.
이 명령의 출력에는 라인 카드와 해당 활성 포트의 상태가 표시됩니다.이 정보는 SSD의 일부입니다.

ASR 5000 섀시

******** show port table all *******

Port  Type                      Admin     Oper Link State             Redundant

----- ------------------------  --------  ---- ---- ----------------  ---------

22/1  10/100 Ethernet           Enabled   -    Up   -                   38/1

Untagged                  Enabled   Down -    Active      -

Tagged VLAN    11         Enabled   Up   -    Active      -

Tagged VLAN    12         Enabled   Up   -    Active      -

Tagged VLAN    13         Enabled   Up   -    Active      -

Tagged VLAN    15         Enabled   Up   -    Active      -

Tagged VLAN    16         Enabled   Up   -    Active      -

Tagged VLAN    14         Enabled   Up   -    Active      -

Tagged VLAN    17         Enabled   Up   -    Active      -

22/2  10/100 Ethernet           Disabled  Down Up   Standby             38/2

22/3  10/100 Ethernet           Disabled  Down Down Standby             38/3

22/4  10/100 Ethernet           Disabled  Down Down Standby             38/4

22/5  10/100 Ethernet           Disabled  Down Down Standby             38/5

22/6  10/100 Ethernet           Disabled  Down Down Standby             38/6

22/7  10/100 Ethernet           Disabled  Down Down Standby             38/7

22/8  10/100 Ethernet           Enabled   Down Down Active              38/8

24/1  1000 Ethernet Dual Media  Enabled   Up   Up   Active              25/1

24/2  1000 Ethernet Dual Media  Disabled  Down Down Active              25/2

24/3  RS232 Serial Console      Enabled   Up   Up   Active              25/3

24/4  BITS T1/E1 Timing         Disabled  Down Down Active              25/4

25/1  1000 Ethernet Dual Media  Enabled   Down Up   Standby             24/1

25/2  1000 Ethernet Dual Media  Disabled  Down Down Standby             24/2

25/3  RS232 Serial Console      Enabled   Down Up   Standby             24/3

25/4  BITS T1/E1 Timing         Disabled  Down Down Standby             24/4

34/1  1000 Ethernet             Enabled   Down Down Active              None

34/2  1000 Ethernet             Disabled  Down Down Active              None

34/3  1000 Ethernet             Disabled  Down Down Active              None

34/4  1000 Ethernet             Disabled  Down Down Active              None

38/1  10/100 Ethernet           Enabled   -    Down -                   22/1

Untagged                  Enabled   Down -    Standby     -

Tagged VLAN    11         Enabled   Down -    Standby     -

Tagged VLAN    12         Enabled   Down -    Standby     -

Tagged VLAN    13         Enabled   Down -    Standby     -

Tagged VLAN    15         Enabled   Down -    Standby     -

Tagged VLAN    16         Enabled   Down -    Standby     -

Tagged VLAN    14         Enabled   Down -    Standby     -

Tagged VLAN    17         Enabled   Down -    Standby     -

38/2  10/100 Ethernet           Disabled  Down Down Active              22/2

38/3  10/100 Ethernet           Disabled  Down Down Active              22/3

38/4  10/100 Ethernet           Disabled  Down Down Active              22/4

38/5  10/100 Ethernet           Disabled  Down Down Active              22/5

38/6  10/100 Ethernet           Disabled  Down Down Active              22/6

38/7  10/100 Ethernet           Disabled  Down Down Active              22/7

38/8  10/100 Ethernet           Enabled   Down Down Standby             22/8

ASR 5500 섀시

******** show port table all *******

Port  Role Type                      Admin    Oper Link State    Pair  Redundant

----- ---- ------------------------  -------- ---- ---- -------  ----- ---------

5/1  Mgmt 1000 Ethernet             Enabled  Up   Up   Active    6/1  L2 Link

5/2  Mgmt 1000 Ethernet             Disabled Down Down Active    6/2  L2 Link

5/3  Mgmt RS232 Serial Console      Enabled  Down Unkn Standby   6/3  L2 Link

5/10 Srvc 10G Ethernet              Enabled  -    Up   -         6/10 LA+  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN   101         Enabled  Up   -    Active   -     -

Tagged VLAN   102         Enabled  Up   -    Active   -     -

Tagged VLAN   104         Enabled  Up   -    Active   -     -

Tagged VLAN   105         Enabled  Up   -    Active   -     -

Tagged VLAN   103         Enabled  Up   -    Active   -     -

5/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/11 LA+  5/10

5/12 Srvc 10G Ethernet              Disabled Down Down Active    6/12 L2 Link

5/13 Srvc 10G Ethernet              Disabled Down Down Active    6/13 L2 Link

5/14 Srvc 10G Ethernet              Disabled Down Down Active    6/14 L2 Link

5/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/15 LA+  5/10

5/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/16 LA+  5/10

5/17 Srvc 10G Ethernet              Disabled Down Down Active    6/17 L2 Link

5/18 Srvc 10G Ethernet              Disabled Down Down Active    6/18 L2 Link

5/19 Srvc 10G Ethernet              Disabled Down Down Active    6/19 L2 Link

5/20 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/20 LA+  5/10

5/21 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/21 LA+  5/10

5/22 Srvc 10G Ethernet              Disabled Down Down Active    6/22 L2 Link

5/23 Srvc 10G Ethernet              Disabled Down Down Active    6/23 L2 Link

5/24 Srvc 10G Ethernet              Disabled Down Down Active    6/24 L2 Link

5/25 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/25 LA+  5/10

5/26 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/26 LA+  5/10

5/27 Srvc 10G Ethernet              Disabled Down Down Active    6/27 L2 Link

5/28 Srvc 10G Ethernet              Disabled Down Down Active    6/28 L2 Link

5/29 Srvc 10G Ethernet              Disabled Down Down Active    6/29 L2 Link

6/1  Mgmt 1000 Ethernet             Enabled  Down Up   Standby   5/1  L2 Link

6/2  Mgmt 1000 Ethernet             Disabled Down Down Standby   5/2  L2 Link

6/3  Mgmt RS232 Serial Console      Enabled  Down Unkn Standby   5/3  L2 Link

6/10 Srvc 10G Ethernet              Enabled  -    Up   -         5/10 LA!  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN   101         Enabled  Up   -    Active   -     -

Tagged VLAN   102         Enabled  Up   -    Active   -     -

Tagged VLAN   104         Enabled  Up   -    Active   -     -

Tagged VLAN   105         Enabled  Up   -    Active   -     -

Tagged VLAN   103         Enabled  Up   -    Active   -     -

6/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/11 LA!  5/10

6/12 Srvc 10G Ethernet              Disabled Down Down Standby   5/12 L2 Link

6/13 Srvc 10G Ethernet              Disabled Down Down Standby   5/13 L2 Link

6/14 Srvc 10G Ethernet              Disabled Down Down Standby   5/14 L2 Link

6/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/15 LA!  5/10

6/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/16 LA!  5/10

6/17 Srvc 10G Ethernet              Disabled Down Down Standby   5/17 L2 Link

6/18 Srvc 10G Ethernet              Disabled Down Down Standby   5/18 L2 Link

6/19 Srvc 10G Ethernet              Disabled Down Down Standby   5/19 L2 Link

6/20 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/20 LA!  5/10

6/21 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/21 LA!  5/10

6/22 Srvc 10G Ethernet              Disabled Down Down Standby   5/22 L2 Link

6/23 Srvc 10G Ethernet              Disabled Down Down Standby   5/23 L2 Link

6/24 Srvc 10G Ethernet              Disabled Down Down Standby   5/24 L2 Link

6/25 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/25 LA!  5/10

6/26 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/26 LA!  5/10

6/27 Srvc 10G Ethernet              Disabled Down Down Standby   5/27 L2 Link

6/28 Srvc 10G Ethernet              Disabled Down Down Standby   5/28 L2 Link

6/29 Srvc 10G Ethernet              Disabled Down Down Standby   5/29 L2 Link

16. show port datalink counters [<slot#>/<port#>] 명령을 입력합니다.
명령의 출력에는 포트의 통계가 표시됩니다.정보는 포트 유형에 따라 달라질 수 있습니다.여기에 표시된 통계는 부분 정보만 제공할 수 있습니다.의심스러운 포트를 결론짓기 전에 추가 조사를 해야 합니다.이 정보는 SSD의 일부가 아닙니다.

Counters for port 5/15:

Line Card 10 Gigabit Ethernet Port

Rx Counter                        Data  |  Tx Counter                       Data

-----------------------  -------------- + -----------------------  -------------

RX Bytes                929593433281710 | TX Bytes                980010533492940

RX Unicast frames            2622395473 | TX Unicast frames           1156468032

RX Multicast frames             6819022 | TX Multicast frames            6883788

RX Broadcast frames                   0 | TX Broadcast frames                  0

RX Size 64 frames            1072853571 | TX Size 64 frames           2180897214

RX Size   65 ..  127 fr      4229387075 | TX Size   65 ..  127 fr     3889237141

RX Size  128 ..  255 fr      2650809484 | TX Size  128 ..  255 fr      711064618

RX Size  256 ..  511 fr      1361009593 | TX Size  256 ..  511 fr     2349224327

RX Size  512 .. 1023 fr      3559787799 | TX Size  512 .. 1023 fr     1444113684

RX Size 1024 .. 1518 fr       448089039 | TX Size 1024 .. 1518 fr      474195217

RX Size 1519 .. 1522 fr      2185019476 | TX Size 1519 .. 1522 fr     2999521504

RX OverSize frames                    0 | TX OverSize frames                   0

RX UnderSize frames                   0 | TX UnderSize frames                  0

RX ExceedMaxSize frames               0

RX Fragment frames                69829 | TX Fragment frames                   0

RX Jabber frames                7090511 | TX Jabber frames                     0

RX Control frames                     0 | TX Control frames                  882

RX Pause frames                       0 | TX Pause frames                    882

RX FCS Error frames           828050684 | TX FCS Error frames                  0

RX Length Error frames                0 | TX Length Error frames               0

RX Code Error frames           38410621

RX ExMaxSize Err frames         1362770

-----------------------  -------------- + -----------------------  -------------

[local]ASR5K-1# show port datalink counters 17/1

Counters for port 17/1:

Line Card 10 Gigabit Ethernet Port

Rx Counter                        Data  |  Tx Counter                       Data

-----------------------  -------------- + -----------------------  -------------

RX Unicast frames                 19873 | TX Unicast frames                    0

RX Multicast frames               19873 | TX Multicast frames                  0

RX Broadcast frames                   0 | TX Broadcast frames                  0

RX Size   64 frames                   0 | TX Size   64 frames                  0

RX Size   65 ..  127 fr               0 | TX Size   65 ..  127 fr              0

RX Size  128 ..  255 fr               0 | TX Size  128 ..  255 fr              0

RX Size  256 ..  511 fr           19873 | TX Size  256 ..  511 fr              0

RX Size  512 .. 1023 fr               0 | TX Size  512 .. 1023 fr              0

RX Size 1024 .. 1518 fr               0 | TX Size 1024 .. 1518 fr              0

RX Size > 1518 frames                 0 | TX Size > 1518 frames                0

RX Bytes OK                     8326787 | TX Bytes OK                          0

RX Bytes BAD                          0 | TX Bytes BAD                         0

RX SHORT OK                           0 | TX PAUSE                             0

RX SHORT CRC                          0 | TX ERR                               0

RX OVF                                0 |

RX NORM CRC                           0 |

RX LONG OK                            0 |

RX LONG CRC                           0 |

RX PAUSE                              0 |

RX FALS CRS                           0 |

RX SYM ERR                            0 |

RX SPI FRAME COUNT                19873 | TX SPI FRAME COUNT                   0

RX SPI LEN ERR                        0 | TX SPI LEN ERR                       0

RX SPI DIP 2 ERR                      0 | TX SPI DIP 4 ERR                     0

RX SPI STATUS OOF ERR                 0 | TX SPI DATA OOF ERR                  0

RX FIFO OVERFLOW                      0 | TX FIFO FULL DROP                    0

RX PAUSE COUNT                        0 | TX DIP 4 PACKET DROP                 0

SPI EOP/ABORT                         0 |

RX FRAGMENTS COUNT                    0 |

RX MAC ERR                            0 |

RX JABBER COUNT                       0 |

-----------------------  -------------- + -----------------------  -------------

[local]st40-1# show port datalink counters 22/2

Counters for port 22/2:

Line Card Fast Ethernet Port

Rx Counter                        Data  |  Tx Counter                       Data

-----------------------  -------------- + -----------------------  -------------

RX Unicast frames                 13773 | TX Unicast frames                    0

RX Multicast frames              126510 | TX Multicast frames                  0

RX Broadcast frames               54954 | TX Broadcast frames                  0

RX Size   64 frames              109874 | TX Size   64 frames                  0

RX Size   65 ..  127 fr           81230 | TX Size   65 ..  127 fr              0

RX Size  128 ..  255 fr            2384 | TX Size  128 ..  255 fr              0

RX Size  256 ..  511 fr            1670 | TX Size  256 ..  511 fr              0

RX Size  512 .. 1023 fr              79 | TX Size  512 .. 1023 fr              0

RX Size 1024 .. 1518 fr               0 | TX Size 1024 .. 1518 fr              0

RX Size > 1518 frames                 0 | TX Size > 1518 frames                0

RX Bytes OK                    13824764 | TX Bytes OK                          0

RX Bytes BAD                          0 | TX Bytes BAD                         0

RX OVF                                0 | TX DEFER                             0

RX SHORT OK                           0 | TX COL                               0

RX SHORT CRC                          0 | TX SCOL                              0

RX NO SFD                             0 | TX MCOL                              0

RX NORM CRC                           0 | TX XCOL                              0

RX NORM ALI                           0 | TX LCOL                              0

RX LONG OK                            0 | TX PAUSE                             0

RX LONG CRC                           0 | TX ERR                               0

RX PAUSE                              0 |

RX FALS CRS                           0 |

RX SYM ERR                            0 |

-----------------------  -------------- + -----------------------  -------------

[local]st40-1# show port datalink counters 24/1

Counters for port 24/1:

SPIO 10/100/1000 Ethernet port

Rx Counter                        Data  |  Tx Counter                       Data

-----------------------  -------------- + -----------------------  -------------

RX Bytes                      148501169 | TX Bytes                     138116037

RX BAD frames                         0 | TX BAD frames                        0

RX Runt frames                        0 | TX Runt frames                       0

RX Oversize frames                    0 | TX Oversize frames                   0

RX Good frames                  1590640 | TX Good frames                 1258465

RX Multicast frames                4393 | TX Collisions                        0

RX Broadcast frames              365063 | TX Excessive collis                  0

RX Code ERROR                         0 | TX Late Collisions                   0

RX CRC ERROR                          0 | TX CRC ERROR                         0

RX length ERROR                       0 | TX ABORT                             0

RX Align ERROR                        0 |

-----------------------  -------------- + -----------------------  -------------

# show port datalink counters 5/15

Counters for port 5/15:

Line Card 10 Gigabit Ethernet Port

Rx Counter Data | Tx Counter Data

----------------------- -------------- + ----------------------- -------------

RX OverSize frames                   0 |

RX Bytes OK                 1558209913 | TX Bytes OK                    840628

RX Bytes BAD                         0 | TX Bytes BAD                        0

RX SHORT OK                          0 | TX PAUSE                            0

RX SHORT CRC                         0 | TX ERR                              0

RX OVF                               0 |

RX NORM CRC                          0 |

RX LONG OK                           0 |

RX LONG CRC                      82233 |

RX PAUSE                             0 |

RX FALS CRS                          0 |

RX SYM ERR                           0 |

----------------------- -------------- + ----------------------- -------------

17. show port npu counters 명령을 입력합니다.
명령의 출력에는 포트의 통계가 표시됩니다.이 통계는 포트 31/1이 수신하는 만큼 많은 데이터를 전송하지 않음을 보여줍니다.SSD는 15분 간격으로 2개의 통계를 제공합니다.두 통계를 사용하여 델타를 확인할 수 있습니다.

******** show port npu counters *******

Thursday April 30 15:07:06 UTC 2015

Counters for port 31/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast                    1088589       494910442            86            4368  <<<<<

Multicast                     2730          246420           330           35496

Broadcast                    10393          665152          6365          292790

IPv4 unicast               1088506       494905130             4             596

IPv4 non-unicast               656           82768           326           35112

IPv6 unicast                     0               0             0               0

IPv6 non-unicast                 0               0             4             384

Fragments received          258066       198717886           n/a             n/a

Packets reassembled         129021       193781884           n/a             n/a

Fragments to kernel             24           33204           n/a             n/a

HW error                         0               0           n/a             n/a

Port non-operational             0               0             0               0

SRC MAC is multicast             0               0           n/a             n/a

Unknown VLAN tag                 0               0           n/a             n/a

Other protocols               2074          163652           n/a             n/a

Not IPv4                         0               0           n/a             n/a

Bad IPv4 header                  0               0           n/a             n/a

IPv4 MRU exceeded                0               0           n/a             n/a

TCP tiny fragment                0               0             0               0

No ACL match                     0               0             0               0

Filtered by ACL                  0               0             0               0

TTL expired                      0               0           n/a             n/a

Flow lookup twice                0               0           n/a             n/a

Unknown IPv4 class               0               0           n/a             n/a

Too short: IP                    0               0           n/a             n/a

Too short: ICMP                  0               0             0               0

Too short: IGMP                  0               0             0               0

Too short: TCP                   0               0             0               0

Too short: UDP                   0               0             0               0

Too short: IPIP                  0               0           n/a             n/a

Too short: GRE                   0               0           n/a             n/a

Too short: GRE key               0               0           n/a             n/a

Don't frag discards            n/a             n/a             0               0

Fragment packets               n/a             n/a             0               0

Fragment fragments             n/a             n/a             0               0

IPv4VlanMap dropped              0               0           n/a             n/a

IPSec NATT keep alive            0               0           n/a             n/a

MPLS Flow not found              0               0           n/a             n/a

MPLS unicast                     0               0             0               0

Size < 17                        0               0             0               0

Size   17 ..   64            28449         1820528          6450          296712

Size   65 ..  127           549857        46030525           320           33820

Size  128 ..  255           191483        32170025            10            1796

Size  256 ..  511            38611        14091567             1             326

Size  512 .. 1023            30308        20922553             0               0

Size 1024 .. 2047           263006       380787195             0               0

Size 2048 .. 4095                0               0             0               0

Size 4096 .. 4500                0               0             0               0

Size > 4500                      0               0             0               0

******** show port npu counters *******

Thursday April 30 15:22:53 UTC 2015

Counters for port 31/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast                    1458664       690686035           104            5196  <<<<<

Multicast                     3566          321706           429           46150

Broadcast                    14078          900992          8295          381570

IPv4 unicast               1458563       690679571             4             596

IPv4 non-unicast               859          108182           425           45766

IPv6 unicast                     0               0             0               0

IPv6 non-unicast                 0               0             4             384

Fragments received          363014       279522687           n/a             n/a

Packets reassembled         181494       272589787           n/a             n/a

Fragments to kernel             26           36128           n/a             n/a

HW error                         0               0           n/a             n/a

Port non-operational             0               0             0               0

SRC MAC is multicast             0               0           n/a             n/a

Unknown VLAN tag                 0               0           n/a             n/a

Other protocols               2707          213524           n/a             n/a

Not IPv4                         0               0           n/a             n/a

Bad IPv4 header                  0               0           n/a             n/a

IPv4 MRU exceeded                0               0           n/a             n/a

TCP tiny fragment                0               0             0               0

No ACL match                     0               0             0               0

Filtered by ACL                  0               0             0               0

TTL expired                      0               0           n/a             n/a

Flow lookup twice                0               0           n/a             n/a

Unknown IPv4 class               0               0           n/a             n/a

Too short: IP                    0               0           n/a             n/a

Too short: ICMP                  0               0             0               0

Too short: IGMP                  0               0             0               0

Too short: TCP                   0               0             0               0

Too short: UDP                   0               0             0               0

Too short: IPIP                  0               0           n/a             n/a

Too short: GRE                   0               0           n/a             n/a

Too short: GRE key               0               0           n/a             n/a

Don't frag discards            n/a             n/a             0               0

Fragment packets               n/a             n/a             0               0

Fragment fragments             n/a             n/a             0               0

IPv4VlanMap dropped              0               0           n/a             n/a

IPSec NATT keep alive            0               0           n/a             n/a

MPLS Flow not found              0               0           n/a             n/a

MPLS unicast                     0               0             0               0

Size < 17                        0               0             0               0

Size   17 ..   64            36271         2321072          8398          386320

Size   65 ..  127           726857        60769944           416           44008

Size  128 ..  255           247902        41688950            13            2262

Size  256 ..  511            52061        19029750             1             326

Size  512 .. 1023            39817        27526320             0               0

Size 1024 .. 2047           373400       540572697             0               0

Size 2048 .. 4095                0               0             0               0

Size 4096 .. 4500                0               0             0               0

Size > 4500                      0               0             0               0