목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

구성

설정

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 Nexus 5000 Series 스위치에서 점보 MTU(Maximum Transmission Unit) 패킷을 구성할 때 발생하는 문제를 설명합니다.

사전 요구 사항

다음을 확인합니다.

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음과 같은 Nexus 스위치를 기반으로 합니다.

- Nexus 5020

- NX-OS 버전 4.1(3)N2(1a)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 정보

이 문서에서는 Nexus 5000 Series 스위치에서 점보 패킷을 사용해야 할 때 발생하는 문제에 대해 설명합니다. Nexus 5000 및/또는 Nexus 7000 스위치 간에 점보 패킷을 전송하려고 할 때 이 시나리오가 발생할 수 있습니다.

구성

두 Nexus 5000 스위치 간 또는 Nexus 5000 스위치와 Nexus 7000 스위치 간에 패킷 손실이 발생할 수 있습니다.

패킷 크기가 9216바이트인 호스트를 ping할 때 50%의 패킷 손실이 발생할 수 있습니다.

Nexus-5000#ping 172.16.0.1 packet-size 9216 count 20

PING 172.16.0.1 (172.16.0.1): 9216 data bytes

9224 bytes from 172.16.0.1: icmp_seq=0 ttl=254 time=6.094 ms

Request 1 timed out

9224 bytes from 172.16.0.1: icmp_seq=2 ttl=254 time=5.507 ms

Request 3 timed out

9224 bytes from 172.16.0.1: icmp_seq=4 ttl=254 time=5.529 ms

Request 5 timed out

9224 bytes from 172.16.0.1: icmp_seq=6 ttl=254 time=10.09 ms

Request 7 timed out

9224 bytes from 172.16.0.1: icmp_seq=8 ttl=254 time=5.597 ms

Request 9 timed out

9224 bytes from 172.16.0.1: icmp_seq=10 ttl=254 time=5.497 ms

Request 11 timed out

9224 bytes from 172.16.0.1: icmp_seq=12 ttl=254 time=5.491 ms

Request 13 timed out

9224 bytes from 172.16.0.1: icmp_seq=14 ttl=254 time=5.555 ms

Request 15 timed out

9224 bytes from 172.16.0.1: icmp_seq=16 ttl=254 time=6.021 ms

Request 17 timed out

9224 bytes from 172.16.0.1: icmp_seq=18 ttl=254 time=5.51 ms

--- 172.16.0.1 ping statistics ---

20 packets transmitted, 10 packets received, 50.00% packet loss

round-trip min/avg/max = 5.491/6.089/10.09 ms

설정

점보 패킷이 Nexus 5020 및 Nexus 7010을 통과해야 하는 경우 Nexus 5020에서 정책 맵을 구성하고  system jumbomtu size Nexus 7010 Series Switch에서 확인할 수 있습니다.

Nexus 5020에서 정책 맵을 구성하려면 다음 단계를 완료하십시오.

Nexus-5020

!--- You can enable the Jumbo MTU for the whole switch by setting the MTU to its maximum size (9216 bytes)

!--- in the policy map for the default Ethernet system class (class-default).

switch(config)#policy-map type network-qos jumbo

switch(config-pmap-nq)#class type network-qos class-default

switch(config-pmap-c-nq)#mtu 9216

switch(config-pmap-c-nq)#exit

switch(config-pmap-nq)#exit

switch(config)#system qos

switch(config-sys-qos)#service-policy type network-qos jumbo

자세한 내용은 Cisco Nexus 5000 Series NX-OS Layer 2 Switching 컨피그레이션 가이드, 릴리스 4.2(1)N1(1)을 참조하십시오.

Nexus 7010 스위치에서 점보 프레임을 설정하려면 다음 단계를 완료하십시오.

Nexus-7010

!--- Set the MTU to its maximum size (9216 bytes) in order to enable the Jumbo MTU for the whole switch.

switch(config)#system jumbomtu 9216

!--- Set the MTU specification for an interface.

switch(config)#interface ethernet x/x

!--- By default, Cisco NX-OS configures Layer 3 parameters. In order to configure Layer 2 parameters, use this command.

switch(config-if)#switchport

switch(config-if)#mtu 9216

switch(config-if)#exit

다음을 확인합니다.

확인하기 위해 1500바이트 이상의 패킷 크기로 ping할 수 있습니다. Ping -l 9000 x.x.x.x.

또한  show interface ethernet port/slot  명령을 사용하여 점보 프레임이 설정되었는지 확인합니다.

Nexus 5000에서  show queuing interface ethernet 1/1  명령을 사용합니다:

Nexus5000#show queuing interface ethernet 1/1

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 243200, HW MTU: 9280 (9216 configured)

Nexus 7000에서  show interface ethernet 1/9  명령을 사용합니다:

Nexus-7010#show interface ethernet 1/9

Ethernet1/9 is up

Hardware: 10000 Ethernet, address: 0000.0000.0000 (bia 0000.0000.0000)

MTU 9216 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is access

full-duplex, 10 Gb/s, media type is 10g

Beacon is turned off

Auto-Negotiation is turned off

Input flow-control is off, output flow-control is off

Rate mode is dedicated

Switchport monitor is off

Last link flapped 00:57:24

Last clearing of "show interface" counters 00:56:14

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 360 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 448 bps, 0 pps

RX

5894254 unicast packets  0 multicast packets  0 broadcast packets

5894254 input packets  29108950332 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  0 input discard

0 Rx pause

TX

5894228 unicast packets  2225 multicast packets  0 broadcast packets

5896453 output packets  29109001641 bytes

0 jumbo packets

0 output error  0 collision  0 deferred  0 late collision

0 lost carrier  0 no carrier  0 babble

0 Tx pause

0 interface resets

참고: Nexus 7000 Series의 점보 카운터는 지원되지 않으며 Tx 및 Rx 프레임에 null 값이 표시되지만 MTU 크기에 주목하면 구성된 점보 프레임이 표시됩니다.

문제 해결

현재 이 구성의 문제를 해결하는 데 사용할 수 있는 정보가 없습니다.

관련 정보

- Cisco Nexus 5000 Series Switch

- Cisco Nexus 7000 Series 스위치 지원 페이지

- Cisco 기술 지원 및 다운로드