목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

위로

구성

다음을 확인합니다.

관련 정보

소개

이 문서에서는 Catalyst 9600 스위치를 설정하기 위한 초기 컨피그레이션 및 확인 절차에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

설치 가이드에 따라 섀시 및 수퍼바이저가 설치되었는지 확인합니다.

- 섀시 설치 가이드

- Supervisor 설치 설명서

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 구성되어 있습니다.

- 하드웨어: Catalyst 9600 스위치

- 소프트웨어: Cisco IOS® XE 16.12.3a

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 이해해야 합니다.

배경 정보

Catalyst 9600을 3단계로 부팅, 구성 및 확인할 수 있습니다.

위로

- 콘솔 연결

- 시스템 전원 켜기

- 콘솔 메시지 관찰

- 구성 선택 대화 상자 옵션

구성

- 장치 관리

- 호스트 이름

- 시계

- 구성 저장

다음을 확인합니다.

- 소프트웨어 버전 및 패키지

- 시스템 하드웨어, 전원 등

- 관리 IP 연결

- 시스템 상태

- 시간

위로

- RJ45 또는 USB를 사용하여 Catalyst 9600의 콘솔에 PC를 연결합니다.

- 시스템 전원 켜기

- 콘솔은 시스템 하드웨어 초기화 및 기타 정보를 화면에 출력합니다.

초기 부팅:

Initializing Hardware...

Initializing Hardware......

System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Compiled 30-04-2020 12:00:00.00 by rel

Current ROMMON image : Primary Rommon Image

Last reset cause:LocalSoft

C9600-SUP-1 platform with 16777216 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt]  0

boot: attempting to boot from [bootflash:packages.conf]

boot: reading file packages.conf

<truncated

###########################################################################

<truncated>

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

System Configuration 대화 상자가 표시될 때까지 기다립니다. 수동 컨피그레이션 모드를 시작하려면 No 옵션을 선택하고 자동 설치를 종료하려면 Yes를 선택하여 간단한 수동 컨피그레이션으로 들어갑니다.

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]: yes

Press RETURN to get started

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, changed state to down

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet0/0, changed state to down

구성

참고: "enable" 모드에서 언제든지 show running-config 명령을 사용하여 구성된 값을 확인합니다.

네트워크의 IP 주소로 관리 포트를 구성하고 포트를 활성화합니다.

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#interface gigabitEthernet 0/0

Switch(config-if)#ip address 10.122.186.8 255.255.255.240

Switch(config-if)#no shutdown

관리 네트워크용 기본 게이트웨이에 연결하기 위해 고정 경로를 구성합니다. 네트워크 IP 및 게이트웨이를 사용합니다.

Switch(config)#ip route vrf Mgmt-vrf 10.122.157.250 255.255.255.255 10.122.186.1

텔넷을 통해 액세스하고 선택한 비밀번호를 설정하려면 라인 VTY, 가상 터미널을 구성합니다.

Switch(config)#line vty 0 4

Switch(config-line)#password cisco

Switch(config-line)#login

전송 입력은 모든 프로토콜을 허용합니다(예: VTY 세션을 통해 디바이스에 액세스하기 위한 ssh, telnet).

Switch(config-line)#transport input all

Switch(config-line)#exit

콘솔 액세스를 위한 사용자 모드 비밀번호를 구성합니다.

Switch(config)#line console 0

Switch(config-line)#password cisco

Switch(config-line)#login

Switch(config-line)#exit

강력한 활성화 모드 비밀번호를 구성합니다.

Switch(config)#enable secret cisco

시스템 시계를 설정합니다.

Switch(config)#clock timezone utc +5 30

*Nov 6 04:34:58.910: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:05:58 utc Fri Nov 6 2020 to 10:04:58 utc Fri Nov 6 2020, configured from console by console.

*Nov 6 04:35:59.634: %SYS-5-CONFIG_I: Configured from console by console

Switch#clock set 04:30:00 6 Nov 2020

*Nov 5 23:00:00.000: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:06:19 utc Fri Nov 6 2020 to 04:30:00 utc Fri Nov 6 2020, configured from console by console.

Nov 5 23:00:00.000: %PKI-6-AUTHORITATIVE_CLOCK: The system clock has been set.

시스템의 호스트 이름을 구성합니다.

Switch(config)#hostname Catalyst-9600

지금까지 구성된 컨피그레이션을 startup-config에 저장합니다.

Catalyst-9600#write memory

Building configuration...

[OK]

*Nov  5 16:11:46.061: %SYS-2-PRIVCFG_ENCRYPT: Successfully encrypted private config file

다음을 확인합니다.

시스템의 소프트웨어 버전을 확인하고, 가동 시간, 시스템 세부 정보 등을 확인합니다.

Catalyst-9600#show version

Cisco IOS XE Software, Version 16.12.03a

Cisco IOS Software [Gibraltar], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 16.12.3a, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2020 by Cisco Systems, Inc.

Compiled Tue 28-Apr-20 09:37 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2020 by cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

BOOTLDR: System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Catalyst-9600 uptime is 36 minutes

Uptime for this control processor is 37 minutes

System returned to ROM by Reload Command

System image file is "bootflash:packages.conf"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Technology Package License Information:

------------------------------------------------------------------------------

Technology-package                                     Technology-package

Current                        Type                       Next reboot

------------------------------------------------------------------------------

network-advantage   Smart License                            network-advantage

dna-advantage            Subscription Smart License     dna-advantage

AIR License Level: AIR DNA Advantage

Next reload AIR license Level: AIR DNA Advantage

Smart Licensing Status: UNREGISTERED/EVAL MODE

cisco C9606R (X86) processor (revision V00) with 1867991K/6147K bytes of memory.

Processor board ID FXS2302Q2EP

1 Virtual Ethernet interface

24 Forty/Hundred Gigabit Ethernet interfaces

48 TwentyFive Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

16009160K bytes of physical memory.

11161600K bytes of Bootflash at bootflash:.

1638400K bytes of Crash Files at crashinfo:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Configuration register is 0x102

설치된 패키지를 확인합니다.

Catalyst-9600#show install summary

[ R0 R1 ] Installed Package(s) Information:

State (St): I - Inactive, U - Activated & Uncommitted,

C - Activated & Committed, D - Deactivated & Uncommitted

--------------------------------------------------------------------------------

Type  St   Filename/Version

--------------------------------------------------------------------------------

IMG   C    16.12.3a.0.4

--------------------------------------------------------------------------------

Auto abort timer: inactive

--------------------------------------------------------------------------------

관리 VRF의 경로를 확인합니다.

Switch#show ip route vrf Mgmt-vrf

Routing Table: Mgmt-vrf

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

S*    0.0.0.0/0 [1/0] via 10.122.186.1                       <--- the default gateway

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

S        10.122.157.250/32 [1/0] via 10.122.186.1

C        10.122.186.0/28 is directly connected, GigabitEthernet0/0

L        10.122.186.8/32 is directly connected, GigabitEthernet0/0

기본 게이트웨이를 통해 네트워크에 연결할 수 있는지 확인합니다.

Switch#ping vrf Mgmg-vrf 10.122.186.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.122.186.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Switch#

시스템에 설치된 모듈을 확인합니다.

Catalyst-9600#show module

Chassis Type: C9606R

Mod Ports Card Type                                   Model          Serial No.

---+-----+--------------------------------------+--------------+--------------

1   24   24-Port 40GE/12-Port 100GE                  C9600-LC-24C     CAT2252L0PY

3   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SH

4   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SU

6   48   48-Port 10GE / 25GE                         C9600-LC-48YL    CAT2302L16G

Mod MAC addresses                    Hw   Fw           Sw                 Status

---+--------------------------------+----+------------+------------------+--------

1   70B3.175A.7580 to 70B3.175A.75FF 0.10 17.3.1r[FC2]  16.12.03a          ok

3   70B3.175A.5680 to 70B3.175A.56FF 0.10 17.3.1r[FC2]  16.12.03a          ok

4   70B3.175A.5600 to 70B3.175A.567F 0.10 17.3.1r[FC2]  16.12.03a          ok

6   6C8B.D307.6680 to 6C8B.D307.66FF 0.10 17.3.1r[FC2]  16.12.03a          ok

Mod Redundancy Role     Operating Redundancy Mode Configured Redundancy Mode

---+-------------------+-------------------------+---------------------------

3   Active              sso                       sso

4   Standby             sso                       sso

Chassis MAC address range: 64 addresses from 6cb2.ae4a.70c0 to 6cb2.ae4a.70ff

POST(Power-on self-test) 및 진단 결과를 사용하여 시스템 상태를 확인합니다.

Catalyst-9600#show post

Stored system POST messages:

Switch C9606R

--------------

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback: loopback Test: End, Status Passed

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback: loopback Test: End, Status Passed

Catalyst-9600#show diagnostic result module all

Current bootup diagnostic level: minimal

module 1:   SerialNo : CAT2252L0PY

Overall Diagnostic Result for module 1 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  U  U  U  U  U  U  .  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

module 3:   SerialNo : CAT2252L0SH

Overall Diagnostic Result for module 3 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> .

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> .

module 4:   SerialNo : CAT2252L0SU

Overall Diagnostic Result for module 4 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> U

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> U

module 6:   SerialNo : CAT2302L16G

Overall Diagnostic Result for module 6 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

.  .  U  U  U  .  U  .  U  .  .  .  U  U  .  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  .  U  U  U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  .  .  U

시계가 제대로 설정되어 있는지 확인합니다.

Catalyst-9600#show clock

*16:32:55.196 UTC Thu Nov 5 2020

설치된 전원 공급 장치 및 해당 상태를 확인합니다.

Catalyst-9600#show power detail

Power                                                       Fan States

Supply  Model No              Type  Capacity  Status        1     2

------  --------------------  ----  --------  ------------  -----------

PS1     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS4     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS Current Configuration Mode : none

PS Current Operating State    : none

Power supplies currently active    : 2

Power supplies currently available : 2

Power Summary          Maximum

(in Watts)    Used    Available

-------------  ------  ---------

System Power   2800    3940

-------------  ------  ---------

Total          2800    3940

Power Budget Mode           : Dual Sup

Power                                  Out of  In

Mod  Model No              State     Budget  Instantaneous  Peak  Reset   Reset

---  --------------------  --------  ------  -------------  ----  ------  -----

1    C9600-LC-24C          accepted  300     0              0     300     10

3    C9600-SUP-1           accepted  950     0              0     950     202

4    C9600-SUP-1           accepted  950     0              0     950     202

6    C9600-LC-48YL         accepted  300     0              0     300     10

FM1  C9606-FAN             accepted  300     --             --    300     --

---  --------------------  --------  ------  -------------  ----  ------  -----

Total allocated power:            2800

Total required power: 2800

관련 정보

- 자세한 구성 옵션은 시스템 관리 컨피그레이션 가이드를 참조하십시오.

- 기술 지원 및 문서 − Cisco Systems