목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

구성

네트워크 다이어그램

구성

다음을 확인합니다.

HP-UX 호스트 명령

MDS/IPS-8 명령

문제 해결

Fabric Manager 및 Device Manager 표시

소개

서버에 상주하는 Cisco iSCSI 드라이버는 iSCSI 솔루션의 핵심 구성 요소입니다. 이러한 iSCSI 드라이버는 SCSI(Small Computer System Interface) 명령을 가로채고 IP 패킷으로 캡슐화한 다음 Cisco SN 5420, Cisco SN 5428, Cisco SN 5428-2 또는 Cisco MDS/IPS-8.This으로 리디렉션하여 HP-UX iSCSI 호스트를 SN 5428로 구성하는 샘플 구성을 제공합니다.

사전 요구 사항

요구 사항

이 구성을 시도하기 전에 다음 요구 사항을 충족해야 합니다.

- HP-UX 버전과 호환되는 iSCSI 드라이버를 설치합니다.최신 버전의 드라이버는 Cisco.com의 Cisco iSCSI 드라이버(등록된 고객만 해당) 다운로드 페이지에서 찾을 수 있습니다. README.txt 파일은 드라이버 zip(tar) 파일에 포함되어 있습니다. README에는 라이센스 계약서, 드라이버 설치 및 구성 지침, 드라이버 아키텍처의 기술 개요에 대한 정보가 포함되어 있습니다.

- 운영 체제 요구 사항 및 패치 요구 사항은 HP-UX 릴리즈 노트의 Cisco iSCSI Driver의 시스템 요구 사항 섹션에 설명되어 있습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- HP-UX 9000/800 A500 서버(프로세서 2개 포함)

참고: 이 Lab 설정에서는 iSCSI용 별도의 이더넷 어댑터가 없으며 사용 중인 어댑터는 100Mb입니다. 실제 환경에서는 iSCSI 개시자로 별도의 기가비트 이더넷(GE) 어댑터가 있습니다.

[/]#/opt/ignite/bin/print_manifest[...]

System Hardware

Model:              9000/800/A500-5X

Main Memory:        1024 MB

Processors:         2

OS mode:            64 bit

LAN hardware ID:    0x00306E1B6F51

Software ID:        586760518

Keyboard Language:  Not_Applicable

Storage devices                  HW Path      Interface

SEAGATE ST318404LC 17366 Mb      0/0/1/1.15.0 SCSI C896 Ultra Wide Single-Ended

SEAGATE ST318203LC 17366 Mb      0/0/2/1.15.0 SCSI C875 Ultra Wide Single-Ended

I/O Interfaces

Class          H/W Path       Driver         Description

lan            0/0/0/0        btlan3         HP PCI 10/100Base-TX Core

ext_bus        0/0/1/0        c720           SCSI C896 Ultra Wide LVD

ext_bus        0/0/1/1        c720           SCSI C896 Ultra Wide Single-Ended

ext_bus        0/0/2/0        c720           SCSI C875 Fast Wide Single-Ended

ext_bus        0/0/2/1        c720           SCSI C875 Ultra Wide Single-Ended

tty            0/0/4/0        asio0          PCI Serial (103c1048)

tty            0/0/5/0        asio0          PCI Serial (103c1048)

fc             0/2/0/0        td             HP Tachyon XL2 Fibre Channel Mass Storage Adapter

Installed Software

Your system was installed with HP-UX version B.11.00.

Your system has the following software products installed and

configured on the system disk drive(s).

Product          Revision          Description

A6795A           B.11.00.10        PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE           B.11.00           Patch Bundle

HPUXEng64RT      B.11.00.01        English HP-UX 64-bit Runtime Environment

HWE1100          B.11.00.0203.5    Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag       B.11.00.20.09     HPUX 11.0 Support Tools Bundle, Mar 2002

UXCoreMedia      B.11.00.02        HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic     B.11.00.02        HP-UX Unlimited-User License

XSWGR1100        B.11.00.47.08     General Release Patches, November 1999 (ACE)

[...]

- HP-UX용 Cisco iSCSI 드라이버 3.3.3이 사용되었습니다. HP에서 가장 안정적인 최신 ARPA(Address Resolution Protocol) 전송 누적 패치를 설치하는 것이 좋습니다. 이 문서가 작성되었을 때 PHNE_28538입니다. 이 패치는 여러 종속성이 있으므로 필요한 경우 설치해야 합니다.자세한 설치 정보는 공식 HP 지원 사이트 (등록된 고객만 해당)를 참조하십시오.

[/]# swlist

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

#

# Bundle(s):

#

A6795A                        B.11.00.10     PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE                        B.11.00        Patch Bundle

HPUXEng64RT                   B.11.00.01     English HP-UX 64-bit Runtime Environment

HWE1100                       B.11.00.0203.5 Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag                    B.11.00.20.09  HPUX 11.0 Support Tools Bundle, Mar 2002

QPK1100                       B.11.00.56.5   Quality Pack for HP-UX 11.00, March 2002

UXCoreMedia                   B.11.00.02     HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic                  B.11.00.02     HP-UX Unlimited-User License

XSWGR1100                     B.11.00.47.08  General Release Patches, November 1999 (ACE)

#

# Product(s) not contained in a Bundle:

#

ISCSI                         3.3.3          ISCSI software

bison                         1.875          bison

flex                          2.5.4a         flex

gcc                           3.2.3          gcc

gettext                       0.11.5         gettext

less                          376            less

libiconv                      1.9            libiconv

make                          3.80           make

ncurses                       5.2            ncurses

termcap                       1.3.1          termcap

zsh                           4.0.7          zsh

[/]# swlist BUNDLE

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

# BUNDLE                B.11.00        Patch Bundle

BUNDLE.PHCO_23651     1.0            fsck_vxfs(1M) cumulative patch

BUNDLE.PHKL_28496     1.0            SCSI IO Subsystem Cumulative Patch

BUNDLE.PHKL_27980     1.0            VxFS 3.1 cumulative patch: CR_EIEM

BUNDLE.PHKL_22840     1.0            IDS/9000; syscalls related to file/socket

BUNDLE.PHCO_28505     1.0            user/group(add/mod/del)(1M) cumulative patch

BUNDLE.PHKL_28150     1.0            LVM Cumulative Patch w/Performance Upgrades

BUNDLE.PHNE_28538     1.0            cumulative ARPA Transport patch

BUNDLE.PHNE_28143     1.0            LAN product cumulative patch

BUNDLE.PHNE_27902     1.0            Cumulative STREAMS Patch

BUNDLE.PHKL_29434     1.0            POSIX AIO;getdirentries;MVFS;rcp;mmap/IDS;

BUNDLE.PHKL_28766     1.0            Probe,IDDS,PM,VM,PA-8700,AIO,T600,FS,PDC,CLK

BUNDLE.PHKL_28004     1.0            Fibre Channel Mass Storage Driver Patch

BUNDLE.PHKL_27729     1.0            ioscan -u incorrect display (kernel patch).

BUNDLE.PHKL_24187     1.0            ioscan performance gain for SCSI Subsystem

BUNDLE.PHKL_24165     1.0            Kernel Patch For "ioscan -k" Performance

BUNDLE.PHKL_23409     1.0            NFS, Large Data Space, kernel memory leak

BUNDLE.PHKL_20016     1.0            2nd CPU not recognized in G70/H70/I70

BUNDLE.PHKL_18543     1.0            PM/VM/UFS/async/scsi/io/DMAPI/JFS/perf patch

BUNDLE.PHCO_27818     1.0            ioscan(1M) cumulative patch

BUNDLE.PHCO_27375     1.0            cumulative SAM/ObAM patch

- Cisco MDS 9216 with Software Version 1.2(1a).

vatican# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Module               DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:57:5e:c0 to 20:10:00:0c:30:57:5e:c0

2    1.2(1a)      0.2     20:41:00:0c:30:57:5e:c0 to 20:48:00:0c:30:57:5e:c0

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-00 to 00-0b-be-f8-7f-04  JAB070804Q3

2    00-05-30-00-a8-56 to 00-05-30-00-a8-62  JAB070205AM

* this terminal session

vatican# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 963108 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

vatican uptime is 1 days 6 hours 17 minute(s) 25 second(s)

Last reset at 955065 usecs after Wed Sep 10 08:13:50 2003

Reason: Reset Requested by CLI command reload

System version: 1.1(2)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

이 문서에서 사용되는 Cisco MDS 9000은 MDS 9000 제품군(MDS 9506, MDS 9509, MDS 9216)의 모든 FC(Fibre Channel) 스위치 제품을 나타냅니다. Cisco IPS(Intrusion Prevention System) 블레이드는 IP Storage Services Module을 가리킵니다. 문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 정보

Cisco IPS(Intrusion Prevention System) 모듈은 FC(Fibre Channel) 스토리지 디바이스에 대한 IP 호스트 액세스를 제공합니다. IPS 모듈은 DS-X9308-SMIP입니다. 투명한 SCSI 라우팅을 제공합니다. iSCSI 프로토콜을 사용하는 IP 호스트는 FC 네트워크의 iSCSI 대상에 투명하게 액세스할 수 있습니다. IP 호스트는 TCP/IP 연결을 통해 iSCSI PDU(Protocol Data Units)에 캡슐화된 SCSI 명령을 MDS 900 IPS 포트로 전송합니다. IPS 모듈에서 연결은 적절하게 구성된 GE 인터페이스 형식으로 제공됩니다. IPS 모듈을 사용하면 가상 iSCSI 대상을 생성하여 FC SAN에서 사용 가능한 물리적 FC 대상에 매핑할 수 있습니다. 물리적 대상이 IP 네트워크에 연결된 것처럼 IP 호스트에 FC 대상을 표시합니다.

IPS 모듈을 통해 스토리지에 액세스해야 하는 각 iSCSI 호스트에는 호환되는 iSCSI 드라이버가 설치되어 있어야 합니다. iSCSI 프로토콜의 도움을 받아 iSCSI 드라이버를 사용하면 iSCSI 호스트가 IP 네트워크를 통해 SCSI 요청 및 응답을 전송할 수 있습니다. 호스트 운영 체제의 관점에서 iSCSI 드라이버는 호스트의 주변 장치 채널에 대한 FC 드라이버와 유사한 SCSI 전송 드라이버로 나타납니다. 스토리지 디바이스의 관점에서 각 IP 호스트는 FC 호스트로 표시됩니다. IP 호스트에서 FC 스토리지 디바이스로 SCSI를 라우팅하는 작업은 다음과 같은 주요 작업으로 구성됩니다.

- 호스트와 IPS 모듈 간에 IP 네트워크를 통해 iSCSI 요청 및 응답 전송

- IP 네트워크의 호스트와 FC 스토리지 디바이스 간의 SCSI 요청 및 응답 라우팅(iSCSI를 FCP로, FCP를 iSCSI로 변환). 이 라우팅은 IPS 모듈에서 수행됩니다.

- IPS 모듈과 FC 스토리지 디바이스 간에 FCP 요청 또는 응답 전송

IPS 모듈은 기본적으로 FC 대상을 iSCSI로 가져오지 않습니다. IPS 모듈이 FC 대상을 iSCSI 이니시에이터에서 사용할 수 있게 하려면 동적 또는 정적 매핑을 구성해야 합니다. 둘 다 구성되면 정적으로 매핑된 FC 타겟은 구성된 이름을 갖습니다. 이 문서에서는 정적 매핑의 예를 제공합니다. 동적 매핑을 사용하면 iSCSI 호스트가 IPS 모듈에 연결될 때마다 새 FC N 포트가 생성되고 이 N 포트에 할당된 nWWN 및 pWWN이 다를 수 있습니다. IPS 모듈에 연결할 때마다 iSCSI 호스트에 대해 동일한 nWWN 및 pWWN을 가져오려면 고정 매핑 방법을 사용합니다. IPS 모듈에서 정적 매핑을 사용하여 이니시에이터의 pWWN 또는 nWWN을 기반으로 액세스 제어 및 LUN(Logical Unit Number) 매핑 및 마스킹 컨피그레이션이 있는 지능형 FC 스토리지 시스템에 액세스할 수 있습니다.

타겟이 광고되는 특정 IPS 포트 목록을 생성하고 이를 액세스할 수 있는 iSCSI 이니시에이터 노드 이름 목록을 생성하여 정적으로 매핑된 각 iSCSI 대상에 대한 액세스를 제어할 수 있습니다. FC 조닝 (zoning) 기반 액세스 제어 및 iSCSI 기반 액세스 제어는 iSCSI에 대한 액세스 제어를 제공하는 두 가지 메커니즘입니다. 두 메서드를 동시에 사용할 수 있습니다. 이 컨피그레이션에서는 특정 VSAN에 대해 기본 영역 지정이 허용됩니다. IPS 모듈은 iSCSI 노드 이름 기반 및 FC 조닝 기반 액세스 제어 목록을 모두 사용하여 iSCSI 검색 및 iSCSI 세션 생성 중에 액세스 제어를 적용합니다.

- iSCSI 검색: iSCSI 호스트가 iSCSI 검색 세션을 생성하고 모든 iSCSI 대상에 대해 쿼리하면 IPS 모듈은 액세스 제어 정책에 따라 이 iSCSI 호스트가 액세스할 수 있는 iSCSI 대상 목록만 반환합니다.

- iSCSI 세션 생성: IP 호스트가 iSCSI 세션을 시작하면 IPS 모듈은 지정된 iSCSI 대상(세션 로그인 요청)이 정적 매핑된 대상인지 확인하고, true인 경우 IP 호스트의 iSCSI 노드 이름이 대상에 액세스할 수 있는지 확인합니다. IP 호스트에 액세스 권한이 없으면 로그인이 거부됩니다.

그런 다음 IPS 모듈을 통해 이 IP 호스트에 대해 FC 가상 N 포트(N 포트가 이미 있을 수 있음)를 생성하고 IP 호스트에서 액세스하는 FC 대상 pWWN의 FCID에 대해 FC 이름 서버 쿼리를 수행합니다. IP 호스트 가상 N 포트의 pWWN을 이름 서버 쿼리의 요청자로 사용합니다. 따라서 이름 서버는 pWWN에 대해 영역 적용 쿼리를 수행하고 쿼리에 응답합니다. 이름 서버에서 FCID를 반환하면 iSCSI 세션이 수락됩니다. 그렇지 않으면 로그인 요청이 거부됩니다.

구성

이 섹션에서는 Linux용 MDS 9216 및 Cisco iSCSI 드라이버를 구성하는 방법에 대해 설명합니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 보려면 Cisco MDS 9000 제품군 명령 참조 및 Cisco MDS 9000 제품군 소프트웨어 구성 가이드를 사용하십시오.

네트워크 다이어그램

이 문서에서는 다음 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음과 같은 구성을 사용합니다.

- 테이프(HP 9000/800 A500 HP-UX 11.00)

- 바티칸(MDS 9216)

테이프(HP 9000/800 A500 HP-UX 11.00)

On the HP-UX host only the file /etc/iscsi.conf has to be modified:

[/]# cat /etc/iscsi.conf

# iSCSI configuration file - see iscsi.conf(4)

# DiscoveryAddress Settings

# -------------------------

# Add "DiscoveryAddress=xxx" entries for each iSCSI router instance.

# The driver attempts to discover iSCSI targets at that address

# and make as many targets as possible available for use.

# 'xxx' can be an IP address or a hostname.  A TCP port number can be

# specified by appending a colon and the port number to the address.

# All entries have to start in column one and must not contain any

# whitespace.

#

# Example:

#

# DiscoveryAddress=scsirouter1

DiscoveryAddress=10.48.69.242

!--- Configure the IP address of the GE interface that acceps iSCSI request from your host.

# The DiscoveryAddress Settings can take following entry.

#

# 1) Authentication Settings

# 2) ConnectionTimeout Settings

!--- Other required driver parameters could be changed in the iscsi.conf file.

......

[/]# cat /etc/iscsi.bindings

# iSCSI bindings, file format version 1.0.

# NOTE: this file is automatically maintained by the iSCSI daemon.

# You do not need to edit this file under most circumstances.

# If iSCSI targets in this file have been permanently deleted, you

# may wish to delete the bindings for the deleted targets.

#

# Format:

# bus   target  iSCSI

# id    id      TargetName

#

[...]

0       10      seagate

0       11      spa-vt

!--- The iSCSI driver discovery daemon process looks up each discovered !--- target in the /etc/iscsi.bindings file. If an entry exists in the file for the target, !--- the corresponding SCSI target ID is assigned to the target. If no entry !--- exists for the target, the smallest available SCSI target ID is assigned !--- and an entry is written to the /etc/iscsi.bindings file for this target.

!--- Note that the /etc/iscsi.bindings file permanently contains entries !--- for all iSCSI targets ever logged into from this host. If a target is !--- no longer available to a host, you can manually edit the file and remove !--- entries so that the obsolete target no longer consumes a SCSI target ID. !--- If you know the iSCSI target name of a target in advance, and you want !--- it to be assigned a particular SCSI target ID, you can add an entry !--- manually. You must stop the iSCSI driver before editing the !--- /etc/iscsi.bindings file. The maximum number of targets is 14.

!--- Enter [/]#/sbin/init.d/iscsi start to manually start the iSCSI driver.

!--- Enter [/]#/sbin/init.d/iscsi stop to manually stop the iSCSI driver.

바티칸(Cisco MDS 9216)

!--- If you are starting from the factory default configuration, you !--- need to setup the IP address and mask of the management interface. !--- This would normally be done during the initial setup

.

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!--- In this configuration example, all the iSCSI targets are in a single vsan

.

vsan database

vsan 1016

vsan 1016 interface fc1/3

vsan 1016 interface fc1/7

!--- These are the boot variables.

boot system bootflash:/s111a

boot kickstart bootflash:/k111a

# Simple IP configuration

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

!--- Declare that the iSCSI initiator with the IP address of the host.

# It belongs to the vsan of our choice

iscsi authentication none

iscsi initiator ip-address 10.48.69.238

vsan 1016

!--- Define the first virtual target, it is a JBOD. Identify the target !--- by its pWWN, advertise it on a GE interface, and allow access to the initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:20:37:67:f7:a2

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- The second target is a Clariion disk array. Since the maximum LUN number that you !--- can have under HP-UX without additional software is 7, define a mapping from FC LUN numbers !--- to the iSCSI LUN numbers you are going to present to the host.

iscsi virtual-target name spa-vt

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0020 iscsi-lun 0003

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0021 iscsi-lun 0004

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- Permit access to the targets on the FC level. Create a simple zone configuration to do this. !--- Alternatively, you could have simply set the default zoning policy in vsan 1016 to permit.

zone name jbod vsan 1016

member pwwn 21:00:00:20:37:67:f7:a2

member symbolic-nodename 10.48.69.238

zone name spa vsan 1016

member pwwn 50:06:01:60:88:02:a8:2b

member symbolic-nodename 10.48.69.238

zoneset name iscsidoc vsan 1016

member jbod

member spa

zoneset  activate name iscsidoc vsan 1016

!--- Set the IP address and mask of the GE interface and enable it.

interface GigabitEthernet2/1

ip address 10.48.69.242 255.255.255.192

iscsi authentication none

no shutdown

# Lastly we bring up the iSCSI interface up

interface iscsi2/1

no shutdown

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하고 문제가 발생할 경우 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

특정 show 명령은 명령 조회 도구(등록된 고객만 해당)에서 지원되므로 show 명령 출력의 분석을 볼 수 있습니다.

HP-UX 호스트 명령

- netstat-n 또는 lsof - TCP 연결을 확인합니다.

- iscsi-ls—현재 사용 가능한 디바이스를 표시합니다.

- dmesg - 진단 메시지를 수집합니다.

MDS/IPS-8 명령

- show zone—영역 정보를 표시합니다.

- show flogi database—FLOGI 서버 정보를 표시합니다.

- show fcns database—특정 VSAN에 대한 Name Server 정보를 표시합니다.

- show vsan membership - 다른 VSAN에 대한 인터페이스 정보를 표시합니다.

- show iscsi—다양한 iSCSI 정보를 표시합니다.

- show ips - IP 서비스에 대한 다양한 정보를 표시합니다.

- show scsi-target—특정 VSAN에 대한 SCSI 디바이스를 표시합니다(FC-LUN을 iSCSI-LUN에 매핑하기 위한 경우).

- show interface - 다양한 인터페이스에 대한 정보를 표시합니다.

- show ip route - IP 경로 정보를 표시합니다.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

이 컨피그레이션과 관련된 문제 해결 정보는 다음과 같습니다:

- Ape(HP 9000/800 A500 HP-UX 11.00)에서 표시

- 바티칸에서 표시(MDS 9216)

- Fabric Manager 및 Device Manager 표시

테이프(HP 9000/800 A500 HP-UX 11.00)

# /sbin/init.d/iscsi stop

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsi_[tr]x_threads to terminate .....

[/]# /sbin/init.d/iscsi start

Number of indices in scsi_isc table used by System: 5

Index used by iSCSI controller: 255

Number of free indices: 251

[/]# netstat -n | grep '10.48.69.242'

tcp        0      0  10.48.69.238.49501     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49500     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49499     10.48.69.242.3260       ESTABLISHED

!--- If you have lsof, you can also try the following:

[/]# lsof -i @10.48.69.242

COMMAND  PID USER   FD   TYPE     DEVICE SIZE/OFF NODE NAME

iscsid  2836 root    1u  inet 0x41aa9268   0t1300  TCP ape.cisco.com:49499->10.48.69.242:3260 (ESTABLISHED)

!--- Note that ioscan does not report iSCSI devices. To see the list

!--- of available iSCSI devices from the host, issue the iscsi-ls command.

[/]# iscsi-ls -l

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     0        = DISK  c255t10d0  'SEAGATE  ST318203FC      0004'

BLOCKS : 35566479  BLOCKSIZE : 512 CAPACITY : 17366.00MB

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     4        = DISK  c255t11d4  'DGC      RAID 1          0632'

BLOCKS : 6291419  BLOCKSIZE : 512 CAPACITY : 3071.00MB

LUN     3        = DISK  c255t11d3  'DGC      RAID 1          0632'

BLOCKS : 10485607  BLOCKSIZE : 512 CAPACITY : 5119.00MB

!--- To see detailed statistics for currently established iSCSI sessions, use this:

[/]# iscsi-ls -c

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

!--- Here are some of the entries you can expect to find in the syslog:

[/]# dmesg

[...]

iSCSI: session 0x4179b000 target 11 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: session 0x41a64800 target 10 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: Direct Access Device found at lun 3 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: Direct Access Device found at lun 0 on target 10

Vendor Id  : SEAGATE

Product Id : ST318203FC                 Product Rev: 0004

iSCSI: Direct Access Device found at lun 4 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2,

senselen 18, sense key 06, ASC/ASCQ 29/00, task (0x40718b00) to (host 255 target 11 lun 3),

TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x3

iSCSI: iscsi_recv_cmd: task (0x40718b00) itt 9 to (host 255 target 11 lun 3), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2, senselen 18,

sense key 06, ASC/ASCQ 29/00, task (0x40718c00) to (host 255 target 11 lun 4), TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x4

iSCSI: iscsi_recv_cmd: task (0x40718c00) itt 11 to (host 255 target 11 lun 4), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

바티칸에서 표시(MDS 9216)

vatican# show zone status vsan 1016

VSAN: 1016 default-zone: deny distribute: active only Interop: Off

Full Zoning Database :

Zonesets:1  Zones:3 Aliases: 0

Active Zoning Database :

Name: iscsidoc  Zonesets:1  Zones:3

Status: Activation completed at Wed Sep 17 13:03:56 2003

vatican# show zone active vsan 1016

zone name jbod vsan 1016

* fcid 0x7902e8 [pwwn 21:00:00:20:37:67:f7:a2]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spa vsan 1016

* fcid 0x790104 [pwwn 50:06:01:60:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spb vsan 1016

* fcid 0x790105 [pwwn 50:06:01:68:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

vatican# show flogi database vsan 1016

---------------------------------------------------------------------------

INTERFACE  VSAN    FCID            PORT NAME               NODE NAME

---------------------------------------------------------------------------

fc1/3      1016  0x7902e8  21:00:00:20:37:67:f7:a2  20:00:00:20:37:67:f7:a2

fc1/7      1016  0x790104  50:06:01:60:88:02:a8:2b  50:06:01:60:11:02:a8:2b

fc1/11     1016  0x790105  50:06:01:68:88:02:a8:2b  50:06:01:60:11:02:a8:2b

iscsi2/1   1016  0x790100  20:03:00:0c:30:57:5e:c2  20:02:00:0c:30:57:5e:c2

Total number of flogi = 4.

vatican# show fcns database vsan 1016

VSAN 1016:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x790100    N     20:03:00:0c:30:57:5e:c2 (Cisco)         scsi-fcp:init isc..w

0x790104    N     50:06:01:60:88:02:a8:2b (Clariion)      scsi-fcp:target

0x790105    N     50:06:01:68:88:02:a8:2b (Clariion)      scsi-fcp:target

0x7902e8    NL    21:00:00:20:37:67:f7:a2 (Seagate)       scsi-fcp:target

Total number of entries = 4

--- FCID 0X790100 is the virtual N port(HBA) for the iSCSI host.

vatican# show fcns database detail vsan 1016

------------------------

VSAN:1016  FCID:0x790100

------------------------

port-wwn (vendor)     :20:03:00:0c:30:57:5e:c2 (Cisco)

node-wwn              :20:02:00:0c:30:57:5e:c2

class                 :2,3

node-ip-addr          :10.48.69.238

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

symbolic-port-name    :

symbolic-node-name    :10.48.69.238

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:41:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790104

------------------------

port-wwn (vendor)     :50:06:01:60:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:07:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790105

------------------------

port-wwn (vendor)     :50:06:01:68:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:0b:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x7902e8

------------------------

port-wwn (vendor)     :21:00:00:20:37:67:f7:a2 (Seagate)

node-wwn              :20:00:00:20:37:67:f7:a2

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :NL

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:03:00:0c:30:57:5e:c0

hard-addr             :0x000000

Total number of entries = 4

vatican# show iscsi initiator

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag: 0x80

VSAN ID 1016, FCID 0x790100

vatican# show iscsi initiator configured

iSCSI Node name is 10.48.69.238

Member of vsans: 1016

vatican# show iscsi initiator detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

vatican# show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:20:37:67:f7:a2

=== The "*" means you have both discovery and target session. If there

is no "*" in front of the pWWN, it means you only have discovery session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0000, FC LUN: 0000

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

target: spa-vt

* Port WWN 50:06:01:60:88:02:a8:2b

Secondary PWWN 50:06:01:68:88:02:a8:2b

Configured node

No. of LU mapping: 2

iSCSI LUN: 0003, FC LUN: 0020

iSCSI LUN: 0004, FC LUN: 0021

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

vatican# show iscsi stats iscsi 2/1

iscsi2/1

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

50932 packets input, 60370640 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes, 2476 fragments

output 115926 packets, 112863536 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show ips arp interface gigabitethernet 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet    10.48.69.200        0     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.201        5     0202.3d30.45c9  ARPA  GigabitEthernet2/1

Internet    10.48.69.206        5     0202.3d30.45ce  ARPA  GigabitEthernet2/1

Internet    10.48.69.209        3     0202.3d30.45d1  ARPA  GigabitEthernet2/1

Internet    10.48.69.226        2     0060.08f6.bc1a  ARPA  GigabitEthernet2/1

Internet    10.48.69.229        4     0800.209e.edab  ARPA  GigabitEthernet2/1

Internet    10.48.69.231        1     0002.b3c1.7dab  ARPA  GigabitEthernet2/1

Internet    10.48.69.233        0     0010.4200.7d5b  ARPA  GigabitEthernet2/1

Internet    10.48.69.238        0     0030.6e1b.6f51  ARPA  GigabitEthernet2/1

Internet    10.48.69.239       10     0030.6e1c.a00b  ARPA  GigabitEthernet2/1

Internet    10.48.69.241        0     000b.cdaf.b4c3  ARPA  GigabitEthernet2/1

Internet    10.48.69.248        4     0202.3d30.45f8  ARPA  GigabitEthernet2/1

Internet    10.48.69.252        1     0202.3d30.45fc  ARPA  GigabitEthernet2/1

Internet      10.10.2.28        7     0202.3d0a.021c  ARPA  GigabitEthernet2/1

vatican# show ips stats tcp interface gigabitethernet 2/1 detail

TCP Statistics for port GigabitEthernet2/1

TCP send stats

261205 segments, 117757220 bytes

140632 data, 51907 ack only packets

2655 control (SYN/FIN/RST), 0 probes, 2639 window updates

63382 segments retransmitted, 90885612 bytes

63382 retransmitted while on ethernet send queue, 1 packets split

13327 delayed acks sent

TCP receive stats

249073 segments, 72669 data packets in sequence, 61525764 bytes in sequence

2335 predicted ack, 68605 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

4396 duplicate bytes, 205 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 2625 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

80504 acks, 117762158 ack bytes, 0 ack toomuch, 96274 duplicate acks

0 ack packets left of snd_una, 7 non-4 byte aligned packets

54199 window updates, 0 window probe

6343 pcb hash miss, 709 no port, 6 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 2718 accepts, 2718 established

2716 closed, 15 drops, 0 conn drops

3 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

37062 segments timed, 41787 rtt updated

817 retransmit timeout, 1 persist timeout

22654 keepalive timeout, 22643 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

2720 entries, 2718 connections completed, 0 entries timed out

0 dropped due to overflow, 2 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 2 duplicate SYN, 183 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local  Address        Remote Address        State      Send-Q   Recv-Q

10.48.69.242:3260     10.48.69.238:49499    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49500    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49501    ESTABLISH  0        0

0.0.0.0:3260          0.0.0.0:0             LISTEN     0        0

vatican# discover scsi-target local

discovery started

vatican# show scsi-target devices vsan 1016

--------------------------------------------------------------------------------

VSAN    FCID        PWWN                      VENDOR    MODEL             REV

--------------------------------------------------------------------------------

1016    0x790104    50:06:01:60:88:02:a8:2b   DGC       RAID 0            0632

1016    0x7902e8    21:00:00:20:37:67:f7:a2   SEAGATE   ST318203FC        0004

vatican# show scsi-target lun vsan 1016

- RAID from DGC (Rev 0632)

FCID is 0x790104 in VSAN 1016, PWWN is 50:06:01:60:88:02:a8:2b

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

da:05:b6:a9:b6:9d:7b:00

C:1 A:0 T:0 00:00:00:00

0x1    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

6a:66:0d:74:cb:33:88:6c

C:1 A:0 T:0 00:01:00:00

0x2    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ec:81:5b:a2:c4:43:0d:8a

C:1 A:0 T:0 00:02:00:00

0x3    2147      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

e0:47:b3:be:3b:00:e0:d5

C:1 A:0 T:0 00:03:00:00

0x4    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

00:51:5b:7f:3d:9a:7b:ce

C:1 A:0 T:0 00:04:00:00

0x5    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ab:b1:ae:80:59:c0:fc:f0

C:1 A:0 T:0 00:05:00:00

0x6    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ad:91:58:af:d2:fd:c7:47

C:1 A:0 T:0 00:06:00:00

0x7    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

b1:ef:e7:6c:44:5c:16:97

C:1 A:0 T:0 00:07:00:00

0x8    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

84:4f:09:60:30:1e:fc:50

C:1 A:0 T:0 00:08:00:00

0x9    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

aa:6d:e2:0e:ce:7a:cc:21

C:1 A:0 T:0 00:09:00:00

0xa    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

5b:66:67:89:6c:f2:d1:56

C:1 A:0 T:0 00:0a:00:00

0xb    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a9:32:bd:04:4a:bb:3d:9b

C:1 A:0 T:0 00:0b:00:00

0xc    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

cd:d9:96:f7:57:3f:07:0c

C:1 A:0 T:0 00:0c:00:00

0xd    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

0c:e5:ba:39:68:ca:d6:f0

C:1 A:0 T:0 00:0d:00:00

0xe    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

60:6e:ee:76:98:fc:ab:97

C:1 A:0 T:0 00:0e:00:00

0xf    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

8b:58:80:7b:12:fb:6b:12

C:1 A:0 T:0 00:0f:00:00

0x10   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a1:2f:6d:b0:c3:d6:c2:46

C:1 A:0 T:0 00:10:00:00

0x11   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

2c:48:c4:74:25:4b:26:dd

C:1 A:0 T:0 00:11:00:00

0x20   5369      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ba:18:6a:40:22:40:94:75

C:1 A:0 T:0 00:20:00:00

0x21   3221      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

74:d2:42:9e:31:8d:ff:86

C:1 A:0 T:0 00:21:00:00

- ST318203FC from SEAGATE (Rev 0004)

FCID is 0x7902e8 in VSAN 1016, PWWN is 21:00:00:20:37:67:f7:a2

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    18210     Online  LRE8091500007039 C:1 A:0 T:3 20:00:00:20:37:67:f7:a2

vatican# show interface iscsi 2/1

iscsi2/1 is up

Hardware is GigabitEthernet

Port WWN is 20:41:00:0c:30:57:5e:c0

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 0, Number of TCP connection: 0

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

Maximum allowed bandwidth is 500000 kbps

Minimum available bandwidth is 500000 kbps

Estimated round trip time is 10000 usec

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 50920 packets, 60370032 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes fragments 2476

Output 115914 packets, 112862928 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show interface gigabitethernet 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 10.48.69.242/26

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

iSCSI authentication: NONE

5 minutes input rate 440 bits/sec, 55 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

850346 packets input, 127958119 bytes

6488 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

289960 packets output, 201600774 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

vatican# show ip route

Codes: C - connected, S - static

Default gateway is 10.48.69.129

C 10.48.69.192/26 is directly connected, gigabitethernet2-1

C 10.48.69.128/26 is directly connected, mgmt0

Fabric Manager 및 Device Manager 표시

이 섹션에서는 MDS Fabric Manager 1.2(1a) 및 Device Manager 1.2(1a)의 화면 캡처를 제공합니다.

패브릭 관리자의 토폴로지 다이어그램

장치 관리자

LUN의 pWWN, LUN ID 및 용량을 표시하려면 Device Manager에서 FC- > LUN을 선택합니다.

iSCSI 세션을 표시하려면 Device Manager에서 IP > -iSCSI를 선택합니다.