목차

루프백을 사용하여 이더넷 인터페이스 테스트

내부 루프백

루프백 구성

clear counters

로컬 IP Ping

인터페이스 카운터 확인

컨트롤러 카운터 확인

외부 루프백

루프백 구성

clear counters

로컬 IP Ping

인터페이스 카운터 확인

컨트롤러 카운터 확인

참조

루프백을 사용하여 이더넷 인터페이스 테스트

필요한 경우 루프백을 사용하여 라인 카드, 패브릭, NP(Network Processor), 트렌시버 또는 옵티컬 트랜짓 경로의 문제를 찾을 수 있습니다.

루프백에는 크게 내부 루프백과 외부 루프백의 두 가지 종류가 있습니다.

내부 루프는 원격으로 수행할 수 있지만 많은 정보를 제공하지는 않습니다.

외부 루프는 사이트에서 수행해야 하지만 가장 많은 정보를 제공해야 합니다.

다음 예에서는 이 인터페이스를 사용합니다.

RP/0/RSP0/CPU0:ASR9001-F# show run int tenGigE 0/0/1/1

interface TenGigE0/0/1/1

ipv4 address 10.100.101.1 255.255.255.0

!

내부 루프백

원격 사이트에 액세스하지 않고도 수행할 수 있는 기본 테스트입니다. CPU, 패브릭 경로, NP 및 트랜시버의 문제는 찾을 수 있지만 옵티컬 또는 전송 문제는 찾을 수 없습니다.

루프백 구성

이는 트래픽에 영향을 미칩니다

RP/0/RSP0/CPU0:ASR9001-F# configure

RP/0/RSP0/CPU0:ASR9001-F(config)# int tenGigE 0/0/1/1

RP/0/RSP0/CPU0:ASR9001-F(config-if)# loopback internal

RP/0/RSP0/CPU0:ASR9001-F(config-if)# commit

RP/0/RSP0/CPU0:ASR9001-F(config-if)# end

clear counters

이렇게 하면 인터페이스와 컨트롤러 모두의 카운터가 지워집니다.

RP/0/RSP0/CPU0:ASR9001-F# clear counters tenGigE 0/0/1/1

Clear "show interface" counters on this interface [confirm]

로컬 IP Ping

RP/0/RSP0/CPU0:ASR9001-F# ping 10.100.101.1 count 10000 size 1500 timeout 0

pings with timeout=0 may result in system instability and

control protocol flaps resulting in traffic impact.

DO you really want to continue[confirm with only 'y' or 'n'] [y/n] :y

Type escape sequence to abort.

Sending 10000, 1500-byte ICMP Echos to 10.100.101.1, timeout is 0 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[output omitted]

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (10000/10000), round-trip min/avg/max = 1/1/5 ms

인터페이스 카운터 확인

RP/0/RSP0/CPU0:ASR9001-F# show interfaces tenGigE 0/0/1/1

TenGigE0/0/1/1 is up, line protocol is up

Interface state transitions: 3

Hardware is TenGigE, address is 70e4.2217.ba65 (bia 70e4.2217.ba65)

Layer 1 Transport Mode is LAN

Internet address is 10.100.101.1/24

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, link type is force-up

output flow control is off, input flow control is off

loopback set (External),

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 00:02:40

5 minute input rate 685000 bits/sec, 126 packets/sec

5 minute output rate 685000 bits/sec, 126 packets/sec

10003 packets input, 15140657 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10003 packets output, 15140657 bytes, 0 total output drops

Output 0 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

컨트롤러 카운터 확인

RP/0/RSP0/CPU0:ASR9001-F# show controllers tenGigE 0/0/1/1 stats

Statistics for interface TenGigE0/0/1/1 (cached values):

Ingress:

Input total bytes           = 15140657

Input good bytes            = 15140657

Input total packets         = 10003

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 0

Input pkts 65-127 bytes     = 0

Input pkts 128-255 bytes    = 3

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 10000

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10003

Input unicast pkts          = 10000

Input multicast pkts        = 3

Input broadcast pkts        = 0

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

Egress:

Output total bytes          = 15140657

Output good bytes           = 15140657

Output total packets        = 10003

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 0

Output pkts 65-127 bytes    = 0

Output pkts 128-255 bytes   = 3

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 10000

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10003

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 0

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

외부 루프백

이 테스트에서는 라인 카드 CPU(Central Processing Unit), 패브릭 경로, NP, 트랜시버 및 옵틱스를 확인합니다.

이 테스트에서는 전송(Tx) 신호를 수신(Rx) 포트로 물리적으로 루프하려면 파이버 케이블 길이가 필요합니다.

루프백 구성

이는 트래픽에 영향을 미칩니다

RP/0/RSP0/CPU0:ASR9001-F# configure

RP/0/RSP0/CPU0:ASR9001-F(config)# interface tenGigE 0/0/1/1

RP/0/RSP0/CPU0:ASR9001-F(config-if)# loopback external

RP/0/RSP0/CPU0:ASR9001-F(config-if)# commit

RP/0/RSP0/CPU0:ASR9001-F(config-if)# end

clear counters

이렇게 하면 인터페이스와 컨트롤러 모두의 카운터가 지워집니다.

RP/0/RSP0/CPU0:ASR9001-F# clear counters

Clear "show interface" counters on all interfaces [confirm]

로컬 IP Ping

RP/0/RSP0/CPU0:ASR9001-F# ping 10.100.101.1 count 10000 size 1500 timeout 0

pings with timeout=0 may result in system instability and

control protocol flaps resulting in traffic impact.

DO you really want to continue[confirm with only 'y' or 'n'] [y/n] :y

Type escape sequence to abort.

Sending 10000, 1500-byte ICMP Echos to 10.100.101.1, timeout is 0 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[output omitted]

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (10000/10000), round-trip min/avg/max = 1/1/5 ms

인터페이스 카운터 확인

RP/0/RSP0/CPU0:ASR9001-F# show interfaces tenGigE 0/0/1/1

TenGigE0/0/1/1 is up, line protocol is up

Interface state transitions: 7

Hardware is TenGigE, address is 70e4.2217.ba65 (bia 70e4.2217.ba65)

Layer 1 Transport Mode is LAN

Internet address is 10.100.101.1/24

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, link type is force-up

output flow control is off, input flow control is off

loopback set (Internal),

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 00:00:32

5 minute input rate 504000 bits/sec, 52 packets/sec

5 minute output rate 504000 bits/sec, 52 packets/sec

10001 packets input, 15140219 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 1 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10001 packets output, 15140219 bytes, 0 total output drops

Output 0 broadcast packets, 1 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

컨트롤러 카운터 확인

RP/0/RSP0/CPU0:ASR9001-F# show controllers tenGigE 0/0/1/1 stats

Statistics for interface TenGigE0/0/1/1 (cached values):

Ingress:

Input total bytes           = 15140219

Input good bytes            = 15140219

Input total packets         = 10001

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 0

Input pkts 65-127 bytes     = 0

Input pkts 128-255 bytes    = 1

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 10000

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10001

Input unicast pkts          = 10000

Input multicast pkts        = 1

Input broadcast pkts        = 0

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

Egress:

Output total bytes          = 15140219

Output good bytes           = 15140219

Output total packets        = 10001

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 0

Output pkts 65-127 bytes    = 0

Output pkts 128-255 bytes   = 1

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 10000

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10001

Output unicast pkts         = 10000

Output multicast pkts       = 1

Output broadcast pkts       = 0

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

참조

Cisco ASR 9000 Series Aggregation Services Router Interface and Hardware Component Command Reference, Release 4.3.x 장: Cisco ASR 9000 Series Router의 이더넷 인터페이스 명령