목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

구성

다음을 확인합니다.

문제 해결

문제 해결 명령

관련 정보

소개

이 문서에서는 MUX-PPP 및 SNAP(Subnetwork Access Protocol)을 지원하고 atm ilmi-pvc-discovery 하위 인터페이스를 사용하는 Cisco 6400 UAC(Universal Access Concentrator)의 샘플 컨피그레이션에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하는 정보를 제공합니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

Cisco 6400 NRP1

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Access-6400-NRP1

!

enable password <password>

!

username <username> password 0 <password>

username <username1> password 0 <password1>

username <username2> password 0 <password2>

!

!

!

!

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip domain-name cisco.com

ip name-server 171.68.10.70

!

!

!

bridge irb

!

!

process-max-time 200

!

interface Loopback1

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm ilmi-pvc-discovery subinterface

pvc 0/16 ilmi

!

!

interface ATM0/0/0.1 multipoint

!--- For VPI starting with number 1 (example: 1/34).

no ip directed-broadcast

class-int bridge1

bridge-group 1

!

interface ATM0/0/0.4 multipoint

!--- For VPI starting with number 4 (example: 4/33).

no ip directed-broadcast

class-int router

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

ip address 171.68.186.117 255.255.255.240

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

shutdown

!

interface Virtual-Template1

ip unnumbered Loopback1

no ip directed-broadcast

peer default ip address pool mypool

ppp authentication chap

!

interface BVI1

mac-address

ip address 10.10.33.1 255.255.255.0

no ip directed-broadcast

!

ip local pool mypool 10.1.1.2 10.1.1.200

ip classless

ip route 0.0.0.0 0.0.0.0 171.68.186.113

no ip http server

!

!

vc-class atm bridge1

encapsulation aal5snap

!

vc-class atm router

encapsulation aal5mux ppp Virtual-Template1

tacacs-server host 171.68.201.249

tacacs-server last-resort succeed

tacacs-server optional-passwords

tacacs-server extended

!

bridge 1 protocol ieee

bridge 1 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

password xxxxxx

login local

!

end

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

show atm pvc 명령 출력

Access-6400-NRP1# show atm pvc

VCD /               Peak Avg/Min Burst

Interface  Name  VPI  VCI  Type  Encaps  SC  Kbps  Kbps  Cells  Sts

0/0/0         2    0   16  PVC     ILMI  UBR 155000              UP

0/0/0.1       7    1   34  PVC-D   SNAP  UBR 155000              UP

!--- Snap (bridge). !--- Subinterface 1 took VPI .

0/0/0.4       8    4   33  PVC-D    MUX  UBR 155000              UP

!--- mux (ppp) !--- Subinterface 4 took VPI 4.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

ATM 이벤트 디버깅

다음 출력은 NRP(Node Route Processor)가 NSP(Node Switch Processor)에서 학습하는 VPI/VCI(Virtual Path Identifier/Virtual Channel Identifier)를 보여줍니다.

Access-6400-NRP1# debug atm events

ATM events debugging is on

Shut/no Shut on main ATM0/0/0 interface

Access-6400-NRP1#

*Dec 16 15:51:43.667: ATM0/0/0 nrp_sarmgr_shutdown: state=0

*Dec 16 15:51:44.515: Resetting ATM0/0/0

*Dec 16 15:51:45.015: Resetting ATM0/0/0

*Dec 16 15:51:45.015: nrp_sarmgr_config(ATM0/0/0)

*Dec 16 15:51:45.015: nrp_sarmgr_enable(ATM0/0/0

*Dec 16 15:51:45.215: nrp_sarmgr_enable(ATM0/0/0): restarting VCs: 0

*Dec 16 15:51:45.215: nrp_sarmgr_setup_vc(ATM0/0/0): vc:2 vpi:0 vci:16

*Dec 16 15:51:45.223: %SYS-5-CONFIG_I: Configured from console by console

*Dec 16 15:51:45.667: %LINK-3-UPDOWN: Interface ATM0/0/0, changed state to up

*Dec 16 15:51:46.667: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM0/0/0,

changed state to up

*Dec 16 15:51:47.219: %LINK-3-UPDOWN: Interface BVI1, changed state to up

*Dec 16 15:51:47.471: Reserved bw for 1/34 Available bw = 155000

*Dec 16 15:51:47.471: nrp_sarmgr_setup_vc(ATM0/0/0): vc:13 vpi:1 vci:34

*Dec 16 15:51:47.475: Reserved bw for 4/33 Available bw = 155000

*Dec 16 15:51:47.527: nrp_sarmgr_setup_vc(ATM0/0/0): vc:14 vpi:4 vci:33

*Dec 16 15:51:48.219: %LINEPROTO-5-UPDOWN: Line protocol on Interface BVI1,

changed state to up

*Dec 16 15:51:49.019: nrp_sarmgr_teardown_vc(ATM0/0/0): vc:13 vpi:1 vci:34

*Dec 16 15:51:49.179: nrp_sarmgr_teardown_vc(ATM0/0/0): vc:14 vpi:4 vci:33

*Dec 16 15:51:49.339: PPP-ATM(Virtual-Access1) deleting vaccess on VC 14

*Dec 16 15:51:49.351: %LANE-6-INFO: ATM0/0/0: ILMI prefix add event received

*Dec 16 15:51:49.659: Reserved bw for 1/34 Available bw = 155000

*Dec 16 15:51:49.659: nrp_sarmgr_setup_vc(ATM0/0/0): vc:15 vpi:1 vci:34

*Dec 16 15:51:49.659: Reserved bw for 4/33 Available bw = 155000

*Dec 16 15:51:49.715: nrp_sarmgr_setup_vc(ATM0/0/0): vc:16 vpi:4 vci:33

*Dec 16 15:51:55.419: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

Access-6400-NRP1#

IP 라우팅 모드에서 Cisco 675에 대한 PPP 디버그 출력

Success rate is 0 percent (0/5)

Access-6400-NRP1#

*Dec 16 15:38:03.439: Vi1 LCP: I CONFREQ [Open] id 42 len 14

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0xA60C0000 (0x0506A60C0000)

*Dec 16 15:38:03.439: Vi1 LCP: MRU 2048 (0x01040800)

*Dec 16 15:38:03.439: Vi1 IPCP: State is Closed

*Dec 16 15:38:03.439: Vi1 PPP: Phase is ESTABLISHING

*Dec 16 15:38:03.439: Vi1 LCP: O CONFREQ [Open] id 132 len 15

*Dec 16 15:38:03.439: Vi1 LCP: AuthProto CHAP (0x0305C22305)

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0x30995E50 (0x050630995E50)

*Dec 16 15:38:03.439: Vi1 LCP: O CONFACK [Open] id 42 len 14

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0xA60C0000 (0x0506A60C0000)

*Dec 16 15:38:03.439: Vi1 LCP: MRU 2048 (0x01040800)

*Dec 16 15:38:03.443: Vi1 IPCP: Remove route to 10.1.1.2

*Dec 16 15:38:03.443: Vi1 LCP: I CONFACK [ACKsent] id 132 len 15

*Dec 16 15:38:03.443: Vi1 LCP: AuthProto CHAP (0x0305C22305)

*Dec 16 15:38:03.443: Vi1 LCP: MagicNumber 0x30995E50 (0x050630995E50)

*Dec 16 15:38:03.447: Vi1 LCP: State is Open

*Dec 16 15:38:03.447: Vi1 PPP: Phase is AUTHENTICATING, by this end

*Dec 16 15:38:03.447: Vi1 CHAP: O CHALLENGE id 4 len 37 from "Access-6400-NRP1"

*Dec 16 15:38:03.451: Vi1 CHAP: I RESPONSE id 4 len 26 from "cisco"

*Dec 16 15:38:03.451: Vi1 CHAP: O SUCCESS id 4 len 4

*Dec 16 15:38:03.451: Vi1 PPP: Phase is UP

*Dec 16 15:38:03.451: Vi1 IPCP: O CONFREQ [Closed] id 5 len 16

*Dec 16 15:38:03.451: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.451: Vi1 IPCP: Type20 (0x900600000000)

*Dec 16 15:38:03.455: Vi1 IPCP: I CONFREQ [REQsent] id 43 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.2 (0x03060A010102)

*Dec 16 15:38:03.455: Vi1 IPCP: O CONFACK [REQsent] id 43 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.2 (0x03060A010102)

*Dec 16 15:38:03.455: Vi1 IPCP: I CONFREJ [ACKsent] id 5 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Type20 (0x900600000000)

*Dec 16 15:38:03.455: Vi1 IPCP: O CONFREQ [ACKsent] id 6 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.463: Vi1 IPCP: I CONFACK [ACKsent] id 6 len 10

*Dec 16 15:38:03.463: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.463: Vi1 IPCP: State is Open

*Dec 16 15:38:03.463: Vi1 IPCP: Install route to 10.1.1.2

show 명령 출력

Access-6400-NRP1# show user

Line       User      Host(s)            Idle Location

* 0        con 0     idle               00:00:00

Vi1                  Virtual PPP (ATM)  00:06:45

Interface  User      Mode               Idle Peer Address

Access-6400-NRP1# show interface atm 0/0/0 accounting

ATM0/0/0

Protocol       Pkts In    Chars In  Pkts Out   Chars Out

Trans. Bridge        0           0         3         222

Spanning Tree        0           0      1384       65048

PPP over ATM       358        6646       605       11657

Access-6400-NRP1# show interface atm 0/0/0

ATM0/0/0 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, sub MTU 4470, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback not supported

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

2047 maximum active VCs, 3 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:09:37, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

1307 packets input, 57832 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

2876 packets output, 123055 bytes, 0 underruns

0 output errors, 0 collisions, 3 interface resets

0 output buffer failures, 0 output buffers swapped out

Access-6400-NRP1#

Access-6400-NRP1#

Access-6400-NRP1#

Access-6400-NRP1# show interface atm 0/0/0.1

ATM0/0/0.1 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM

0 packets input, 0 bytes

1392 packets output, 59937 bytes

0 OAM cells input, 0 OAM cells output

Access-6400-NRP1# show interface atm 0/0/0.4

ATM0/0/0.4 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM

705 packets input, 11705 bytes

615 packets output, 9415 bytes

0 OAM cells input, 0 OAM cells output

Access-6400-NRP1# show atm vc 15

ATM0/0/0.1: VCD: 15, VPI: 1, VCI: 34

UBR, PeakRate: 155000

AAL5-LLC/SNAP, etype:0x0, Flags: 0xC20, VCmode: 0x0

OAM frequency: 0 second(s)

InARP frequency: 15 minutes(s)

InPkts: 0, OutPkts: 321, InBytes: 0, OutBytes: 13803

InPRoc: 0, OutPRoc: 321, Broadcasts: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

Access-6400-NRP1#

Access-6400-NRP1# show atm vc 16

ATM0/0/0.4: VCD: 16, VPI: 4, VCI: 33

UBR, PeakRate: 155000

AAL5-MUX, etype:0x9, Flags: 0xC23, VCmode: 0x0

OAM frequency: 0 second(s)

InARP DISABLED

InPkts: 6, OutPkts: 143, InBytes: 48, OutBytes: 2420

InPRoc: 3, OutPRoc: 143

InFast: 0, OutFast: 0, InAS: 3, OutAS: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

PPP: Virtual-Access1 from Virtual-Template1

Access-6400-NRP1#

Access-6400-NRP1# show interface virtual-access 1

Virtual-Access1 is up, line protocol is down

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback1 (10.1.1.1)

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP REQsent

Closed: IPCP

Bound to ATM0/0/0.4 VCD: 16, VPI: 4, VCI: 33

Cloned from virtual-template: 1

Last input 00:12:07, output never, output hang never

Last clearing of "show interface" counters 00:12:18

Queueing strategy: fifo > Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3 packets input, 18 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

158 packets output, 2675 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Access-6400-NRP1#

관련 정보

- DSL 기술 지원

- 제품 지원

- Technical Support - Cisco Systems