목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 이론

구성

네트워크 다이어그램

지침

구성

다음을 확인합니다.

샘플 show 명령 출력

Catalyst 5500 스위치

Catalyst 6500 스위치

채널 모드에서 무조건 사용에 대한 특별한 고려 사항

문제 해결

EtherChannel의 성능 문제

관련 정보

소개

이 문서에서는 Catalyst OS(CatOS)를 실행하는 Catalyst 5500/5000 스위치와 Cisco IOS® 소프트웨어를 실행하는 Catalyst 6500/6000 또는 Catalyst 4500/4000 스위치 간의 EtherChannel 설정에 대해 설명합니다.EtherChannel은 개별 링크를 단일 논리적 링크로 번들링하여 스위치나 기타 디바이스 간에 더 높은 대역폭과 이중화를 제공합니다.EtherChannel을 FEC(Fast EtherChannel) 또는 GEC(Gigabit EtherChannel)로 참조할 수 있습니다.EtherChannel을 구성하는 데 사용하는 인터페이스 또는 포트의 속도에 따라 달라집니다.이 구성은 Cisco IOS 소프트웨어를 실행하는 Catalyst 4500/4000 또는 6500/4000 또는 6500/6000 시리즈 스위치에 연결된 CatOS를 실행하는 Catalyst 4500/4000 시리즈 스위치에도 적용됩니다.

이 문서의 컨피그레이션은 각 스위치에서 FEC로 두 개의 고속 이더넷(FE) 포트를 번들로 제공합니다.이 문서에서는 "EtherChannel"이라는 용어를 사용하여 GEC, FEC, 포트 채널, 채널 및 포트 그룹을 참조합니다.

이 문서에서는 스위치의 컨피그레이션 파일 및 관련 샘플 show 명령의 출력만 보여 줍니다.EtherChannel 구성 방법에 대한 자세한 내용은 다음 문서를 참조하십시오.

- EtherChannel 구성(Cisco IOS 소프트웨어를 실행하는 Catalyst 6500/6000 스위치)

- EtherChannel 구성(Cisco IOS 소프트웨어를 실행하는 Catalyst 4500/4000 스위치)

- 샘플 구성:CatOS를 실행하는 Catalyst 스위치 간 EtherChannel

사전 요구 사항

요구 사항

이 컨피그레이션을 시도하기 전에 다음에 대한 기본적인 이해가 있는지 확인하십시오.

- EtherChannel 컨피그레이션

- CLI(Command Line Interface)를 사용한 Catalyst 6500/6000 및 Catalyst 5500/5000 시리즈 스위치 구성

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- CatOS 6.4(8) 소프트웨어를 실행하는 Cisco Catalyst 5505 스위치

- Cisco IOS Software 릴리스 12.1(20)E를 실행하는 Cisco Catalyst 6509 스위치

참고: Catalyst 스위치의 EtherChannel 시스템 요구 사항은 Catalyst 스위치에서 EtherChannel을 구현하려면 시스템 요구 사항을 참조하십시오.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.모든 디바이스는 지워진(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

배경 이론

채널 모드를 사용하여 EtherChannel을 조건 없이 구성하거나 자동 협상을 통해 구성할 수 있습니다.자동 협상을 통해 구성할 때 스위치는 원엔드 채널을 협상합니다.이를 위해 Cisco 전용 PAgP(Port Aggregation Protocol)(channel mode 권장 명령 포함) 또는 IEEE 802.3ad LACP(Link Aggregate Control Protocol)(channel mode active 또는 channel mode passive 명령 포함)를 사용합니다. 이 문서에서 EtherChannel 컨피그레이션은 자동 협상을 위해 PAgP를 사용합니다.

CatOS 시스템 소프트웨어를 실행하는 모든 Catalyst 스위치는 PAgP를 지원합니다.Cisco IOS System Software를 실행하는 Catalyst 6500/6000 또는 4500/4000 Series 스위치도 PAgP를 지원합니다.PAgP를 지원하는 디바이스 간에 EtherChannel을 설정하는 권장 모드는 권장 모드입니다.PAgP는 두 디바이스 간의 부적절한 컨피그레이션을 차단합니다.연결 디바이스가 PAgP를 지원하지 않고 채널을 조건 없이 설정해야 하는 경우 채널 모드를 사용할 수 있습니다.자동 및 바람직한 채널 모드에서 무음 또는 무음 키워드를 사용할 수 있습니다.Catalyst 6500/6000 또는 4500/4000 스위치에는 모든 포트에서 기본적으로 무음 키워드가 활성화되어 있습니다.Catalyst 5500/5000 Series 스위치에는 구리 포트에서 기본적으로 무음 키워드가 활성화되어 있습니다.모든 파이버 포트(FE 및 기가비트 이더넷[GE])의 경우 5500/5000 스위치에는 기본적으로 비무음 키워드가 활성화되어 있습니다.Cisco 스위치 간에 연결할 때 default silent 또는 non-silent 키워드를 사용합니다.

참고: PAgP 채널링 모드 및 무음/무음 모드에 대한 자세한 내용은 EtherChannel을 구성하려면 Using PAgP(권장) 섹션 및 Configuring EtherChannel Between Catalyst 4500/400, 5500/50/505050을 참조하십시오. CatOS 시스템 소프트웨어를 실행하는 0 및 6500/6000 스위치.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하기 위한 정보를 제공합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

지침

활성 링크가 EtherChannel로 취합되면 포트가 일시적으로 스패닝 트리를 떠나 논리적 단일 포트로 다시 연결됩니다.스패닝 트리가 다시 변환될 때까지 네트워크 트래픽이 중단됩니다.

다른 고려 사항으로 인해 EtherChannel 컨피그레이션에 PAgP 또는 LACP와 같은 프로토콜을 사용하지 않는 경우 필요한 매개변수가 양쪽에서 동일한지 확인합니다.이와 다른 경우 채널의 한 쪽 끝이 err-disable 모드로 전환됩니다.오류 비활성화 모드에서 포트를 복구하려면 다음을 참조하십시오.

- Cisco IOS 플랫폼에서 포트 상태 복구 비활성화 오류 발생

- CatOS 플랫폼에서 errDisable 포트 상태 복구

- EtherChannel 불일치 탐지 이해

구성

이 문서에서는 다음 구성을 사용합니다.

- Catalyst 5500

- Catalyst 6500

참고: 구성하는 모듈 또는 스위치 포트의 기능을 확인하려면 CatOS를 실행하는 스위치에 대해 show port capabilities module 명령을 사용합니다.Cisco IOS Software를 실행하는 스위치의 경우 show interfaces capabilities 명령을 사용합니다.

참고: 컨피그레이션에서 출력 간 주석은 파란색 기울임꼴로 표시됩니다.

Catalyst 5500

cat5500 (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

......

................

................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

# time: Wed Jan 28 2004, 09:39:55

!

# version 6.4(2)

!

# errordetection

set errordetection portcounter enable

!

# frame distribution method

set port channel all distribution mac both

!

# vtp

set vtp domain cisco

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state

active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state

active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state

active mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

# ip

!--- This is the IP address for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

# set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat5000-supg.6-4-8.bin

!

# mls

set mls nde disable

!

# port channel

!--- Ports are assigned to admin-group 200. Administrative groups !--- specify which ports can form an EtherChannel together. An administrative group !--- can contain a maximum of eight ports. This admin-group assignment happens !--- automatically with the configuration of the port channel. You can also !--- assign it manually, as done in this example. However, you do not need to assign !--- the admin-group manually. Let the switch create !--- the admin-group automatically. !--- Note: This configuration sets ports 4/1 through 4/4 !--- for port channel, but only configures ports 4/1-2. This is !--- normal behavior. You can use ports 4/3 and 4/4 for any other purpose.

set port channel 4/1-4 200

!

# default port status is enable

!

!

#module 1 : 0-port Supervisor III

!

#module 2 : 2-port MM MIC FDDI

!

#module 3 : 24-port 10/100BaseTX Ethernet

!

#module 4 : 12-port 10/100BaseTX Ethernet

!--- This enables port channeling with PAgP and configures desirable silent mode.

set port channel 4/1-2 mode desirable silent

!

#module 5 : 2-port MM OC-3 Dual-Phy ATM

!--- Output suppressed.

end

컨피그레이션의 명령에 대한 자세한 내용은 Catalyst 5000 제품군 명령 참조(6.3 및 6.4)를 참조하십시오.

Catalyst 6500

Cat6509# show running-config

Building configuration...

Current configuration : 3852 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat6509

!

!

redundancy

main-cpu

auto-sync standard

ip subnet-zero

!

!

interface port-channel1

no ip address

!--- This example has configured a Layer 2 (L2) EtherChannel. !--- You can configure a Layer 3 (L3) EtherChannel on the Catalyst !--- 6500/6000 switches running Cisco IOS Software; however, this is not !--- the focus of this document. For details on the Layer 3 EtherChannel configuration, !--- refer to the document Configuring EtherChannels.

switchport

!--- This command puts the interface in VLAN1, by default.

switchport mode access

!

interface FastEthernet6/1

no ip address

!--- On the Catalyst 6500/6000, you must issue the switchport command once, !--- without any keywords, to configure the interface as an L2 port. !--- By default, all the ports are router ports (L3 ports). !--- On a Catalyst 4500/4000 switch, all ports are L2 ports by default. !--- You do not need an additional command.

switchport

!--- This command puts the interface in VLAN1, by default.

switchport mode access

!--- The port is a member of channel group 1 with autonegotiation !--- that uses PAgP and silent mode.

channel-group 1 mode desirable

!

interface FastEthernet6/2

no ip address

!--- On the Catalyst 6500/6000, you must issue the switchport command once, !--- without any keywords, to configure the interface as a L2 port. !--- By default, all the ports are router ports (L3 ports). !--- On a Catalyst 4500/4000 switch, all ports are L2 ports by default. !--- You do not need an additional command.

switchport

!--- This command puts the interface in VLAN1, by default.

switchport mode access

!--- The port is a member of channel group 1 with autonegotiation !--- that uses PAgP and silent mode.

channel-group 1 mode desirable

!

interface FastEthernet6/3

no ip address

!

interface FastEthernet6/4

no ip address

!

!--- Output suppressed.

interface FastEthernet6/45

no ip address

shutdown

!

interface FastEthernet6/46

no ip address

shutdown

!

interface FastEthernet6/47

no ip address

shutdown

!

interface FastEthernet6/48

no ip address

shutdown

!

!--- This is the IP address for management.

ip address 10.10.10.3 255.255.255.0

!

ip classless

no ip http server

!

!

!

line con 0

line vty 0 4

!

end

Cat6509#

컨피그레이션의 명령에 대한 자세한 내용은 Catalyst 5000 제품군 명령 참조(6.3 및 6.4)를 참조하십시오.

참고: 존재하지 않는 VLAN에 인터페이스를 할당하면 VLAN 데이터베이스에 VLAN을 생성할 때까지 인터페이스가 종료됩니다.자세한 내용은 Configuring VLANs(VLAN 구성)의 Creating or Modifying an Ethernet VLAN(이더넷 VLAN 생성 또는 수정) 섹션을 참조하십시오.

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

CatOS 스위치에서 포트 채널을 확인하려면 다음 명령을 실행합니다.

- show port capabilities module

- 포트 채널 표시

- show port module/port

- 포트 채널 정보 표시

CatOS 스위치에서 STP(Spanning Tree Protocol) 상태를 확인하려면 다음 명령을 실행합니다.

- 공백 표시

- spantree vlan 표시

- spantree 모듈/포트 표시

Cisco IOS Software를 실행하는 Catalyst 6500/6000 또는 Catalyst 4500/4000 Series 스위치에서 포트 채널을 확인하려면 다음 명령을 실행합니다.

- 인터페이스 기능 표시

- show interfaces port-channel port-channel interface number

- etherchannel 요약 표시

- show etherchannel port-channel

Cisco IOS Software를 실행하는 Catalyst 6500/6000 또는 Catalyst 4500/4000 Series 스위치에서 STP 상태를 확인하려면 다음 명령을 실행합니다.

- 스패닝 트리 세부 정보 표시

- spanning-tree vlan vlan 번호 표시

샘플 show 명령 출력

Catalyst 5500 스위치

- show port capabilities module

이 명령은 모듈이 채널링할 수 있는지 확인합니다.또한 EtherChannel을 구성하기 위해 함께 번들링할 수 있는 포트 그룹도 알려줍니다.이 예에서는 두 개의 포트 4/1-2 또는 네 개의 포트 4/1-4를 그룹화하여 채널을 구성할 수 있습니다.

cat5500 (enable) show port capabilities 4

Model                    WS-X5203

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    pps(0-150000),percentage(0-100)

Flow control             no

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              no

ToS rewrite              no

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            no

SPAN                     source,destination

!--- Output suppressed.

- 포트 채널 표시

이 명령은 show port 명령과 함께 포트 채널의 상태를 확인합니다.

cat5500 (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent       200   865

4/2  connected  desirable silent       200   865

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  Switch                          Fa6/1                     cisco Catalyst 6000

4/2  Switch                          Fa6/2                     cisco Catalyst 6000

----- ------------------------------- ------------------------- ----------------

cat5500 (enable)

- show port module/port

cat5500 (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  1          normal a-full a-100 10/100BaseTX

!--- Output suppressed.

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent       200   865

4/2  connected  desirable silent       200   865

----- ---------- -------------------- ----- -----

!--- Output suppressed.

cat5500 (enable) show port 4/2

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/2                     connected  1          normal a-full a-100 10/100BaseTX

!--- Output suppressed.

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent       200   865

4/2  connected  desirable silent       200   865

----- ---------- -------------------- ----- -----

!--- Output suppressed.

- 포트 채널 정보 표시

cat5500 (enable) show port channel info

Switch Frame Distribution Method: Mac both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

4/1  connected  desirable silent       200     865 a-100 a-full    1

4/2  connected  desirable silent       200     865 a-100 a-full    1

----- ---------- -------------------- ----- ------- ----- ------ ----

Port  ifIndex Oper-group Neighbor   Oper-Distribution PortSecurity/

Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

4/1  334              1 65537      Mac both

4/2  334              1 65537      Mac both

----- ------- ---------- ---------- ----------------- -------------

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  Switch                          Fa6/1                     cisco Catalyst 6000

4/2  Switch                          Fa6/2                     cisco Catalyst 6000

----- ------------------------------- ------------------------- ----------------

!--- Output suppressed.

- 공백 표시

STP 명령은 채널 내의 모든 포트가 함께 그룹화되고 전달 상태에 있는지 확인합니다.

cat5500 (enable) show spantree 1

VLAN 1

Spanning tree enabled

Spanning tree type          IEEE

Designated Root             00-30-40-a7-a4-00

Designated Root Priority    32768

Designated Root Cost        0

Designated Root Port        1/0

Root Max Age   20 sec    Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-30-40-a7-a4-00

Bridge ID Priority          32768

Bridge Max Age 20 sec    Hello Time 2  sec   Forward Delay 15 sec

Port                     Vlan Port-State    Cost  Priority Portfast   Channel_id

------------------------ ---- ------------- ----- -------- ---------- ----------

2/1-2                   1    not-connected    19       32 disabled   0

3/1                     1    not-connected   100       32 disabled   0

3/2                     1    not-connected   100       32 disabled   0

3/3                     1    not-connected   100       32 disabled   0

3/4                     1    not-connected   100       32 disabled   0

3/5                     1    not-connected   100       32 disabled   0

3/6                     1    not-connected   100       32 disabled   0

3/7                     1    not-connected   100       32 disabled   0

3/8                     1    not-connected   100       32 disabled   0

3/9                     1    not-connected   100       32 disabled   0

3/10                    1    not-connected   100       32 disabled   0

3/11                    1    not-connected   100       32 disabled   0

3/12                    1    not-connected   100       32 disabled   0

3/13                    1    not-connected   100       32 disabled   0

3/14                    1    not-connected   100       32 disabled   0

3/15                    1    not-connected   100       32 disabled   0

3/16                    1    not-connected   100       32 disabled   0

3/17                    1    not-connected   100       32 disabled   0

3/18                    1    not-connected   100       32 disabled   0

3/19                    1    not-connected   100       32 disabled   0

3/20                    1    not-connected   100       32 disabled   0

3/21                    1    not-connected   100       32 disabled   0

3/22                    1    not-connected   100       32 disabled   0

3/23                    1    not-connected   100       32 disabled   0

3/24                    1    not-connected   100       32 disabled   0

4/1-2                   1    forwarding       12       32 disabled   865

4/3                     1    forwarding       19       32 disabled   0

4/4                     1    forwarding       19       32 disabled   0

4/5                     1    not-connected   100       32 disabled   0

4/6                     1    not-connected   100       32 disabled   0

4/7                     1    not-connected   100       32 disabled   0

4/8                     1    not-connected   100       32 disabled   0

4/9                     1    not-connected   100       32 disabled   0

4/10                    1    not-connected   100       32 disabled   0

4/11                    1    not-connected   100       32 disabled   0

4/12                    1    not-connected   100       32 disabled   0

cat5500 (enable)

- spantree 모듈/포트 표시

cat5500 (enable) show spantree 4/1

Port                     Vlan Port-State    Cost  Priority Portfast   Channel_id

------------------------ ---- ------------- ----- -------- ---------- ----------

4/1-2                    1    forwarding       12       32 disabled   865

cat5500 (enable) show spantree 4/2

Port                     Vlan Port-State    Cost  Priority Portfast   Channel_id

------------------------ ---- ------------- ----- -------- ---------- ----------

4/1-2                    1    forwarding       12       32 disabled   865

cat5500 (enable)

참고: 포트 4/1 및 4/2에 대한 show spantree module/port의 출력에는 동일한 결과가 표시됩니다.채널 ID가 865인 하나의 채널로 그룹화되기 때문입니다.

Catalyst 6500 스위치

- 인터페이스 기능 표시

이 명령은 모듈이 채널링할 수 있는지 확인합니다.

Cat6509# show interfaces capabilities module 6

FastEthernet6/1

Model:                 WS-X6348-RJ-45

Type:                  10/100BaseTX

Speed:                 10,100,auto

Duplex:                half,full

Trunk encap. type:     802.1Q,ISL

Trunk mode:            on,off,desirable,nonegotiate

Channel:               yes

Broadcast suppression: percentage(0-100)

Flowcontrol:           rx-(off,on),tx-(none)

Membership:            static

Fast Start:            yes

QOS scheduling:        rx-(1q4t), tx-(2q2t)

CoS rewrite:           yes

ToS rewrite:           yes

Inline power:          yes

SPAN:                  source/destination

UDLD                   yes

Link Debounce:         yes

Link Debounce Time:    no

FastEthernet6/2

Model:                 WS-X6348-RJ-45

Type:                  10/100BaseTX

Speed:                 10,100,auto

Duplex:                half,full

Trunk encap. type:     802.1Q,ISL

Trunk mode:            on,off,desirable,nonegotiate

Channel:               yes

Broadcast suppression: percentage(0-100)

Flowcontrol:           rx-(off,on),tx-(none)

Membership:            static

Fast Start:            yes

QOS scheduling:        rx-(1q4t), tx-(2q2t)

CoS rewrite:           yes

ToS rewrite:           yes

Inline power:          yes

SPAN:                  source/destination

UDLD                   yes

Link Debounce:         yes

Link Debounce Time:    no

- show interfaces port-channel port-channel interface number

이 명령은 포트 채널의 상태를 확인합니다.또한 이 채널을 형성하는 포트를 알려줍니다.

Cat6509# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0009.1267.27d9 (bia 0009.1267.27d9)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s

input flow-control is off, output flow-control is off

Members in this channel: Fa6/1 Fa6/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/2000/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

126880 packets input, 10173099 bytes, 0 no buffer

Received 126758 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

6101 packets output, 1175124 bytes, 0 underruns

0 output errors, 0 collisions, 2 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Cat6509#

- etherchannel 요약 표시

이 명령은 채널 그룹당 한 줄 요약을 표시합니다.이 샘플 출력에서는 포트 Fa6/1 및 Fa6/2가 있는 플래그 P를 볼 수 있습니다.이는 이러한 포트가 포트 채널을 형성함을 의미합니다.

Cat6509# show etherchannel summary

Flags: D - down P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3 S - Layer2

U - in use f - failed to allocate aggregator

u - unsuitable for bundling

Number of channel-groups in use: 1

Number of aggregators: 1

Group Port-channel Protocol Ports

--------- +-----------------------+ ----------------+ ---------------

1 Po1(SU) PAgP Fa6/1(P) Fa6/2(P)

- show etherchannel port-channel

이 명령은 포트 채널 정보를 표시합니다.

Cat6509# show etherchannel port-channel

Channel-group listing:

-----------------------

Group: 1

----------

Port-channels in the group:

----------------------

Port-channel: Po1

------------

Age of the Port-channel = 00d:00h:02m:25s

Logical slot/port = 14/1 Number of ports = 2

GC = 0x00010001 HotStandBy port = null

Port state = Port-channel Ag-Inuse

Protocol = PAgP

Ports in the Port-channel:

Index Load Port EC state No of bits

------+------+------+------------------+-----------

1 55 Fa6/1 Desirable-Sl 4

0 AA Fa6/2 Desirable-Sl 4

Time since last port bundled: 00d:00h:01m:03s Fa6/1

Time since last port Un-bundled: 00d:00h:01m:05s Fa6/1

- 스패닝 트리 세부 정보 표시

이 명령은 채널이 특정 VLAN의 전달 상태에 있는지 확인합니다.

Cat6509# show spanning-tree detail

VLAN1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.029a.8001

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0030.40a7.a400

Root port is 833 (Port-channel1), cost of root path is 12

Topology change flag not set, detected flag not set

Number of topology changes 0 last change occurred 00:23:59 ago

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 833 (Port-channel1) of VLAN1 is forwarding

Port path cost 12, Port priority 128, Port Identifier 131.65.

Designated root has priority 32768, address 0030.40a7.a400

Designated bridge has priority 32768, address 0030.40a7.a400

Designated port id is 131.97, designated path cost 0

Timers: message age 2, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 1, received 718

- spanning-tree vlan vlan 번호 표시

이 명령은 VLAN1에 대한 스패닝 트리 정보를 표시합니다.

Cat6509# show spanning-tree vlan 1

VLAN0001

Spanning tree enabled protocol ieee

Root ID Priority 32768

Address 0030.40a7.a400

Cost 12

Port 833 (Port-channel1)

Hello Time 2 sec Max Age 20 sec Forward Delay 15 sec

Bridge ID Priority 32768

Address 00d0.029a.8001

Hello Time 2 sec Max Age 20 sec Forward Delay 15 sec

Aging Time 300

Interface Role Sts Cost Prio.Nbr Type

---------------- ---- --- --------- -------- --------------------------------

Po1 Root FWD 12 128.833 P2p

채널 모드에서 무조건 사용에 대한 특별한 고려 사항

Cisco에서는 이 문서에 설명된 대로 포트 채널 컨피그레이션에 PAgP를 사용하는 것이 좋습니다.어떤 이유로든 채널 모드를 사용하여 EtherChannel을 조건으로 구성할 경우 포트 채널을 생성해야 합니다.이 섹션에서는 절차에 대해 설명합니다.포트 채널을 생성하는 경우 컨피그레이션 프로세스 중에 STP에 발생할 수 있는 문제를 방지할 수 있습니다.한 면을 채널로 구성한 경우 다른 쪽이 채널로 되기 전에 STP 루프 탐지가 포트를 비활성화할 수 있습니다.

1. CatOS 스위치에서 포트 채널링의 포트를 비활성화 모드로 설정하려면 set port disable module/port 명령을 실행합니다.

2. Cisco IOS 스위치에서 포트 채널(포트 그룹)을 생성하고 채널 모드를 on으로 설정합니다.

3. CatOS 스위치에서 포트 채널을 만들고 채널 모드를 on으로 설정합니다.

4. 첫 번째 CatOS 스위치에서 이전에 비활성화한 포트를 다시 활성화하려면 set port enable module/port 명령을 실행합니다.

문제 해결

EtherChannel의 성능 문제

EtherChannel의 성능 문제는 몇 가지 조건에 의해 발생합니다.일반적인 원인으로는 부정확한 로드 밸런싱 알고리즘과 포트별 물리적 레이어 문제가 있습니다.

로드 밸런싱 알고리즘을 더 잘 이해하고 구성하려면 다음 문서를 참조하십시오.

- Catalyst 6500 Series 소프트웨어 컨피그레이션 가이드, 8.6의 Understanding How EtherChannel Frame Distribution Works(EtherChannel 프레임 배포 작동 방식 이해).

- Catalyst 6500 Series Cisco IOS Software 컨피그레이션 가이드, 12.2SX의 로드 밸런싱 이해 섹션.

물리적 레이어 문제를 해결하는 방법에 대한 자세한 내용은 스위치 포트 및 인터페이스 문제 해결을 참조하십시오.

관련 정보

- CatOS 시스템 소프트웨어를 실행하는 Catalyst 4500/4000, 5500/5000 및 6500/6000 스위치 간 EtherChannel 구성

- Catalyst 6500/6000과 Catalyst 4500/4000 간 LACP(802.3ad) 구성

- Catalyst 스위치에서 EtherChannel을 구현하기 위한 시스템 요구 사항

- Catalyst 6500 Series 스위치 컨피그레이션 가이드

- Catalyst 5000 제품군 소프트웨어 구성 가이드(6.3 및 6.4)

- Catalyst 4000 Series 스위치 컨피그레이션 가이드

- Catalyst 5500 Series 스위치 기술 지원

- Catalyst 6500 Series 스위치 기술 지원

- EtherChannel 기술 지원 페이지

- LAN 제품 지원

- LAN 스위칭 기술 지원

- Technical Support - Cisco Systems