목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 이론

구성

네트워크 다이어그램

구성

다음을 확인합니다.

show 명령

샘플 show 명령 출력

Catalyst 5500 스위치

Catalyst 6500 스위치

채널 모드에서 무조건을 사용한 특별 고려 사항

관련 정보

소개

이 문서에서는 Catalyst OS(CatOS)를 실행하는 Cisco Catalyst 5500 스위치와 Catalyst 6500 스위치 간의 EtherChannel 설정에 대해 설명합니다. CatOS를 실행하는 Catalyst 4500/4000, 5500/5000 또는 6500/6000 시리즈 스위치는 이 시나리오에서 동일한 결과를 얻을 수 있었습니다.EtherChannel을 구성하는 데 사용되는 인터페이스 또는 포트의 속도에 따라 Fast EtherChannel(FEC) 또는 Gigabit EtherChannel(GEC)이라고 할 수 있습니다.

이 예에서는 각 스위치의 FE(Fast Ethernet) 포트 2개가 FEC에 번들로 포함되었습니다.이 문서에서 "Fast EtherChannel", "Gigabit EtherChannel", "port channel", "channel" 및 "port group"이라는 용어는 모두 EtherChannel을 의미합니다.

이 문서에는 스위치의 컨피그레이션 파일과 관련 샘플 show 명령의 출력만 포함됩니다.Catalyst 스위치 간에 EtherChannel을 구성하는 방법에 대한 자세한 내용은 다음 문서를 참조하십시오.

- CatOS를 실행하는 Catalyst 4000, 5000 및 6000 스위치 간 EtherChannel 구성

이 문서에서는 LACP(Link Aggregation Control Protocol)를 사용하는 구성을 제공하지 않습니다. LACP 구성에 대한 자세한 내용은 다음 문서를 참조하십시오.

- Catalyst 6000과 Catalyst 4000 간 LACP(802.3ad) 구성

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- CatOS 6.3(7) 소프트웨어를 실행하는 Catalyst 5500 스위치

- CatOS 7.2(2) 소프트웨어를 실행하는 Catalyst 6500 스위치

참고: CatOS 스위치 간에 채널을 구성하기 전에 다음 문서를 참조하십시오.

- Catalyst 스위치에서 EtherChannel을 구현하기 위한 시스템 요구 사항

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 이론

EtherChannel은 조건 없이(채널 모드 사용) 구성할 수 있으며, 또는 PAgP(Port Aggregation Protocol)를 사용하여 채널이 원엔드(채널 모드 권장)으로 협상하도록 구성하여 구성할 수도 있습니다.

참고: CatOS를 실행하는 Catalyst 스위치는 PAgP를 지원하므로 이러한 디바이스 간에 EtherChannel을 설정하는 것이 좋습니다.PAgP는 두 디바이스 간의 잘못된 컨피그레이션을 방지합니다.의 채널 모드는 원엔드 디바이스가 PAgP를 지원하지 않고 채널을 무조건 설정해야 하는 경우에 유용합니다.무음 또는 무음 키워드는 자동 및 바람직한 채널 모드에서 사용할 수 있습니다.silent 키워드는 Catalyst 4500/4000 또는 6500/6000의 모든 포트 및 Catalyst 5500/5000 시리즈 스위치의 구리 포트에서 기본적으로 활성화됩니다.비무음 키워드는 Catalyst 5500/5000 시리즈 스위치의 모든 파이버 포트(FE 및 기가비트 이더넷[GE])에서 기본적으로 활성화되어 있습니다.Cisco 스위치 간에 연결할 때는 default silent 또는 non-silent 키워드를 사용하는 것이 좋습니다.

PAgP 및 EtherChannel에 대한 자세한 내용은 Cisco 스위치 제품 페이지에 있는 CatOS 소프트웨어 릴리스에 대한 기술 문서를 참조하십시오.Fast EtherChannel 및 Gigabit EtherChannel 구성 또는 EtherChannel 구성 섹션을 참조하십시오.브라우저 찾기 기능을 사용하여 이러한 섹션을 찾을 수 있습니다.

또 다른 좋은 참조는 다음 문서의 EtherChannel/Port Aggregation Protocol 섹션입니다.

- Catalyst 4000, 5000 및 6000 Series 스위치 구성 및 관리를 위한 모범 사례

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구 (등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- Catalyst 5500 스위치

- Catalyst 6500 스위치

참고: 이 문서에 나열된 컨피그레이션은 권장 모드를 통해 PAgP 협상을 사용하여 EtherChannel을 구성하여 구현되었습니다.

Catalyst 5500 스위치

#version 6.3(7)

!

set option fddi-user-pri enabled

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat5000-sup3.6-3-7.bin

!

#port channel

!--- Ports are assigned to admin group 50. This admin group is assigned !--- automatically when the port channel is configured, or it can be assigned manually. !--- If the admin group does not need to be assigned manually, this command should not be !--- manually set either. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for port channel even though only !--- 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 can !--- be used for any other purpose.

set port channel 4/1-4 50

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 empty

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 : 12-port 10/100BaseTX Ethernet

!

#module 6 empty

!

#module 7 : 2-port MM OC-3 Dual-Phy ATM

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 6500 스위치

#version 7.2(2)

!

!

#system

set system name  cat6500

!

#!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-supk8.7-2-2.bin

!

#igmp

set igmp leave-query-type mac-gen-query

!

#port channel

!--- The ports are assigned to admin group 63. This admin group is assigned !--- automatically when the port channel is configured or it can be assigned manually. !--- If admin group does not need to be assigned manually, this command should not be !--- manually set. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for the port channel even though !--- only 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 !--- can be used for any other purpose.

set port channel 4/1-4 63

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 empty

!

#module 4 : 48-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 : 1-port Multilayer Switch Feature Card

end

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

show 명령

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

CatOS 스위치에서 포트 채널을 확인하려면 다음 명령을 실행합니다.

- show port capabilities module

- 포트 채널 표시

- show port channel module/port

- 포트 채널 정보 표시

CatOS 스위치에서 STP(Spanning Tree Protocol) 상태를 확인하려면 다음 명령을 실행합니다.

- 공백 표시

- spantree vlan 표시

- spantree 모듈/포트 표시

샘플 show 명령 출력

Catalyst 5500 스위치

show port capabilities module

이 명령은 모듈이 채널링할 수 있는지 확인하는 데 사용됩니다.또한 이 포트로 채널을 구성할 수 있는 다른 포트도 표시됩니다.

cat5500> (enable) show port capabilities 4

Model                    WS-X5225R

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

Model                    WS-X5225R

Port                     4/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

!--- Output suppressed.

포트 채널 표시

이 명령은 show port channel info 명령과 함께 포트 채널의 상태를 확인하는 데 사용됩니다.

cat5500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        50   865

4/2  connected  desirable silent        50   865

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  TBA04380080(cat6500)            4/1                       WS-C6506

4/2  TBA04380080(cat6500)            4/2                       WS-C6506

----- ------------------------------- ------------------------- ----------------

참고: 포트 4/3 및 4/4는 연결되지 않음 상태인 경우 위의 출력에 표시됩니다.

Cisco 디바이스에서 show port channel 명령의 출력이 있는 경우 Output Interpreter Tool (등록된 고객만 해당)을 사용하여 잠재적인 문제 및 수정 사항을 표시할 수 있습니다.

spantree 모듈/포트 표시

cat5500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat5500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

참고: 포트 4/1 및 4/2에 대한 show spantree module/port 명령의 출력은 채널 ID가 865인 하나의 채널로 그룹화되므로 동일합니다.

Catalyst 6500 스위치

show port capabilities module

이 명령은 모듈이 채널링할 수 있는지 확인하는 데 사용됩니다.또한 이 포트로 채널을 구성할 수 있는 다른 포트도 표시됩니다.

cat6500> (enable) show port capabilities 4/1

Model                    WS-X6248-RJ-45

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    no

Flow control             receive-(off,on),send-(off)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          4/1-48

Link debounce timer      yes

포트 채널 표시

이 명령은 show port channel info 명령과 함께 포트 채널의 상태를 확인하는 데 사용됩니다.

cat6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        63   865

4/2  connected  desirable silent        63   865

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

참고: 포트 4/3 및 4/4는 연결되지 않음 상태인 경우 위의 출력에 표시됩니다.

Cisco 디바이스에서 show port channel 명령의 출력이 있는 경우 Output Interpreter Tool (등록된 고객만 해당)을 사용하여 잠재적인 문제 및 수정 사항을 표시할 수 있습니다.

포트 채널 정보 표시

cat6500> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

4/1  connected  desirable silent        63     865 a-100 a-full    1

4/2  connected  desirable silent        63     865 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

4/1  215            241 1          ip both

4/2  215            241 1          ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

!--- Output suppressed.

spantree vlan 표시

show spantree 명령은 채널 내의 모든 포트가 그룹화되고 포워딩 상태에 있는지 확인하는 데 사용됩니다.

cat6500> (enable) show spantree 1

VLAN 1

Spanning tree mode          PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-6d-82-88-00

Designated Root Priority    0

Designated Root Cost        38

Designated Root Port        4/25

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-03-a0-e9-0c-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

1/1                     1    not-connected         4   32 disabled 0

1/2                     1    not-connected         4   32 disabled 0

2/1                     1    not-connected         4   32 disabled 0

2/2                     1    not-connected         4   32 disabled 0

4/1-2                    1    forwarding           12   32 disabled 865

4/3                     1    forwarding           19   32 disabled 0

4/4                     1    forwarding           19   32 disabled 0

4/5                     1    not-connected       100   32 disabled 0

4/6                     1    not-connected       100   32 disabled 0

4/7                     1    not-connected       100   32 disabled 0

4/8                     1    not-connected       100   32 disabled 0

4/9                     1    not-connected       100   32 disabled 0

4/10                    1    not-connected       100   32 disabled 0

4/11                    1    not-connected       100   32 disabled 0

4/12                    1    not-connected       100   32 disabled 0

4/13                    1    not-connected       100   32 disabled 0

4/14                    1    not-connected       100   32 disable

!--- Output suppressed.

Cisco 디바이스에서 show spantree 명령의 출력이 있는 경우 Output Interpreter Tool (등록된 고객만 해당)을 사용하여 잠재적인 문제 및 수정 사항을 표시할 수 있습니다.

spantree 모듈/포트 표시

cat6500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat6500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

참고: 포트 3/1 및 3/2에 대한 show spantree module/port 명령의 출력은 채널 ID가 865인 하나의 채널로 그룹화되므로 동일합니다.

채널 모드에서 무조건을 사용한 특별 고려 사항

Cisco는 위의 배경 이론에 설명된 대로 포트 채널 컨피그레이션에 PAgP를 사용할 것을 권장합니다.어떤 이유로든 EtherChannel을 조건 없이 구성(채널 모드 사용)하는 경우 아래 단계에 따라 포트 채널을 생성하는 것이 좋습니다.이렇게 하면 컨피그레이션 프로세스 중에 STP에서 발생할 수 있는 문제를 방지할 수 있습니다.한 면이 채널로 구성된 경우 STP 루프 탐지가 포트를 비활성화할 수 있으며, 다른 쪽이 채널로 구성될 수 있습니다.

1. set port disable module/port 명령을 실행하여 포트 채널링에 사용할 포트를 첫 번째 스위치에서 비활성화 모드로 설정합니다.

2. 첫 번째 스위치에 포트 채널(포트 그룹)을 생성하고 채널 모드를 on으로 설정합니다.

3. 두 번째 스위치에서 포트 채널을 생성하고 채널 모드를 on으로 설정합니다.

4. set port enable module/port 명령을 실행하여 첫 번째 스위치에서 이전에 비활성화된 포트를 다시 활성화합니다.

관련 정보

- CatOS를 실행하는 Catalyst 4000, 5000 및 6000 스위치 간 EtherChannel 구성

- Catalyst 스위치에서 EtherChannel을 구현하기 위한 시스템 요구 사항

- LAN 제품 지원 페이지

- LAN 스위칭 지원 페이지

- Technical Support - Cisco Systems