목차

소개

사전 요구 사항

하드웨어 및 소프트웨어 버전

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

명령 표시

관련 정보

소개

이 문서에서는 EIGRPv6과 IPv6 BGP 간의 상호 재배포를 사용하여 EIGRPv6(Enhanced Interior Gateway Routing Protocol)에 IPv6 BGP(Border Gateway Protocol) 기본 경로를 재배포하는 방법에 대한 샘플 컨피그레이션을 제공합니다.

사전 요구 사항

이 구성을 시도하기 전에 다음 요구 사항을 충족해야 합니다.

- EIGRPv6에 대한 기본적인 지식 보유

- IPv6 BGP에 대한 기본적인 지식 보유

- IPv6 주소 지정에 대한 기본적인 지식 보유

하드웨어 및 소프트웨어 버전

이 문서의 컨피그레이션은 Cisco 7200 Series Router with Cisco IOS® Software Release 15.0(1)을 기반으로 합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

구성

이 예에서는 라우터 R2와 R1이 IPv6 eBGP를 사용하여 서로 통신합니다. 라우터 R1 및 R3은 EIGRPv6을 사용합니다. 기본 경로는 neighbor default-originate 명령을 실행하여 라우터 R2에서 생성됩니다. 에서 IPv6 eBGP 경로를 EIGRPv6로 상호 재배포하려면 EIGRP 메트릭과 함께 redistribute bgp 명령을 사용합니다. 마찬가지로, 에서 EIGRPv6 경로를 IPv6BGP에 재배포하려면 address-family 컨피그레이션 모드에서 redistribute eigrp AS number 명령을 사용합니다.

참고: 이 문서에 사용된 명령에 대한 자세한 내용을 보려면 명령 조회 도구(등록된 고객만 해당)를 사용하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- 라우터 R1

- 라우터 R2

- 라우터 R3

라우터 R1

R1#show run

Building configuration...

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address BB10::10/128

!

interface Loopback20

no ip address

ipv6 address BB20::20/128

!

interface Loopback30

no ip address

ipv6 address BB30::30/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::11/64

serial restart-delay 0

!

interface Serial1/1

no ip address

ipv6 address 4040:1:1:1::10/64

ipv6 eigrp 1

serial restart-delay 0

!

!

router bgp 505

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 500

no auto-summary

!

address-family ipv6

redistribute eigrp 1

!--- EIGRP is redistributed in to BGP.

no synchronization

network BB10::10/128

network BB20::20/128

neighbor 3030:1:1:1::10 activate

exit-address-family

!

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

redistribute bgp 505 metric 100 1 255 1 1500

!--- EIGRP for IPv6 has a shutdown feature. !--- Make sure that the routing process is in "no shut" mode !--- in order to start running the protocol.

!--- BGP is redistributed with EIGRP default metrics.

!

end

라우터 R2

R2#show run

Building configuration...

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address AB10::10/128

!

interface Loopback20

no ip address

ipv6 address AB20::20/128

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::10/64

serial restart-delay 0

!

router bgp 500

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 505

neighbor 3030:1:1:1::11 default-originate

no auto-summary

!

address-family ipv6

no synchronization

network AB10::10/128

network AB20::20/128

neighbor 3030:1:1:1::11 activate

neighbor 3030:1:1:1::11 default-originate

exit-address-family

!

end

!--- Originates default route to the !--- neighbor 3030:1:1:1::11.

라우터 R3

R3#show run

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Loopback10

no ip address

ipv6 address CC10::10/128

ipv6 eigrp 1

!

interface Loopback20

no ip address

ipv6 address CC20::20/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 4040:1:1:1::11/64

ipv6 eigrp 1

serial restart-delay 0

!

!

ipv6 router eigrp 1

eigrp router-id 3.3.3.3

!

end

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. show 명령 출력의 분석을 보려면 OIT를 사용합니다.

명령 표시

라우터 R3이 재배포된 IPv6 BGP 기본 경로를 수신하는지 확인하려면 라우터 R3에서 show ipv6 route eigrp 명령을 사용합니다.

show ipv6 route eigrp

라우터 R3
R3#show ipv6 route eigrp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

EX  ::/0 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB10::10/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB20::20/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

D   BB30::30/128 [90/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the default route !--- is redistributed in EIGRP. EX indicates EIGRP external routes.

EIGRPv6 경로가 라우터 R2에서 올바르게 재배포되었는지 확인하려면 라우터 R2에서 show ipv6 route bgp 명령을 사용합니다.

show ipv6 route bgp

라우터 R2에서
R2#show ipv6 route bgp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

B   BB10::10/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   BB20::20/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC10::10/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC20::20/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the eigrp routes !--- are redistributed in to BGP.

ping 명령을 사용하여 라우터 R2와 R3 간의 연결성을 확인합니다.

ping

라우터 R2에서:

R2#ping  CC10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/40/96 ms

R2#ping CC20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/44/100 ms

라우터 R3에서:

R3#ping AA10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

R3#ping AA20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

!--- The above ping responses shows that R1 and R3 are able !--- to communicate with each other.

관련 정보

- BGP 지원 페이지

- IPv6 지원 페이지

- Cisco IOS IPv6 명령 참조

- BGP 사례 연구

- EIGRP 지원 페이지

- 기술 지원 및 문서 − Cisco Systems