목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 IPv6(HSRPv2) 그룹을 HSRP(Standby Hot Standby Router Protocol)로 구성하여 개체를 추적하고 개체 상태를 기준으로 HSRP 우선순위를 변경하는 방법에 대해 설명합니다.

추적된 각 객체에는 추적 CLI(command-line interface)에 지정된 고유한 번호가 있습니다. HSRPv2는 이 번호를 사용하여 특정 개체를 추적합니다. 추적 프로세스에서는 정기적으로 추적된 객체에 값 변경 사항을 폴링하고 변경 사항(up 또는 down 값)을 HSRPv2에 즉시 또는 지정된 지연 후에 보냅니다. 이 문서에서는 추적할 인터페이스를 구성하기 위해 track interface 명령을 사용합니다.

사전 요구 사항

요구 사항

이 구성을 시도하기 전에 다음 요구 사항을 충족해야 합니다.

- HSRP 구성 지식 자세한 내용은 HSRP 구성을 참조하십시오.

- IPv6 주소 지정 및 기본 연결 구현에 대한 기본 지식 자세한 내용은 IPv6 주소 지정 및 기본 연결 구현을 참조하십시오.

- 향상된 개체 추적에 대한 기본 지식

- HSRP IPv6를 구성하려면 인터페이스에서 HSRPv2를 활성화해야 합니다.

- HSRP IPv6를 구성하려면 디바이스에서 IPv6 유니캐스트 라우팅을 활성화해야 합니다.

사용되는 구성 요소

이 문서의 컨피그레이션은 Cisco IOS® Software Release 15.0(1)을 실행하는 Cisco7200 Series 라우터를 기반으로 합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 규칙을 참조하십시오.

구성

R2 및 R3 라우터는 직렬 인터페이스를 통해 R1에 연결됩니다. R2 및 R3의 고속 이더넷 인터페이스는 R2가 활성 라우터 역할을 하고 R3이 대기 라우터의 역할을 하도록 HSRP IPv6로 구성됩니다. 라우터 R2에서 추적 프로세스는 직렬 인터페이스 1/0의 인터페이스 회선 프로토콜의 상태를 추적하도록 구성됩니다. R2의 직렬 인터페이스 S1/0이 다운되면 R3 라우터의 상태가 Standby에서 Active로 변경됩니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 문서에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- 라우터 R1 컨피그레이션

- 라우터 R2 컨피그레이션

- 라우터 R3 컨피그레이션

라우터 R1 컨피그레이션

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::1/64

serial restart-delay 0

!

!

interface Serial1/1

no ip address

ipv6 address 2011:11:11:11::1/64

serial restart-delay 0

!

end

라우터 R2 컨피그레이션

!

version 15.0

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

track 1 interface Serial1/0 line-protocol

!--- Tracking process 1 is configured in the router !--- to track state of the interface line protocol !--- of serial interface 1/0

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::2/64

serial restart-delay 0

!

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::10/64

standby version 2

standby 10 ipv6 autoconfig

!--- Assigns a standby group and standby IP address.

standby 10 preempt delay minimum 45

!--- The preempt command allows the router to become the !--- active router when it has the priority higher than all the other !--- HSRP-configured routers. Without this command, even if a router has higher !--- priority value, it will not become an active router. !--- The delay minimum value causes the local router to postpone !--- taking over the active role for a minimum of 45 seconds.

standby 10 track 1 decrement 10

!--- Configures HSRP to track an object and change the Hot Standby !--- priority on the basis of the state of the object.

!--- In this example,the HSRP tracks the interface s1/0 mentioned !--- in the track process 1.

!--- Decrement value specified the amount by which the Hot Standby !--- priority for the router is decremented (or incremented) when the tracked object !--- goes down (or comes back up). The range is from 1 to 255. The default is 10.

!

end

라우터 R3 컨피그레이션

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Serial1/0

no ip address

ipv6 address 2011:11:11:11::2/64

serial restart-delay 0

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::11/64

standby version 2

standby 10 ipv6 autoconfig

standby 10 priority 95

standby 10 preempt delay minimum 45

!

end

다음을 확인합니다.

컨피그레이션을 확인하려면 R2 및 R3 라우터에서 show standby 명령을 사용합니다.

라우터 R2

R2#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:26:03

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 1.872 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C802:AFF:FE10:38, priority 95 (expires in 8.048 sec)

Priority 100 (default 100)

Track object 1 state Up decrement 10

Group name is "hsrp-Fa2/0-10" (default)

라우터 R3

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Standby

4 state changes, last state change 00:26:25

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.176 secs

Preemption enabled, delay min 45 secs

Active router is FE80::C801:14FF:FEF4:38, priority 100 (expires in 9.888 sec)

MAC address is ca01.14f4.0038

Standby router is local

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

추적 정보를 표시하려면 라우터 R2에서 show track 명령을 사용합니다.

라우터 R2

R2#show track 1

Track 1

Interface Serial1/0 line-protocol

Line protocol is Up

3 changes, last change 00:28:39

Tracked by:

HSRP FastEthernet2/0 10

!--- Displays the information about the objects that !--- are tracked by tracking process 1.

R2#show track int brief

Track   Object                           Parameter        Value Last Change

1       interface   Serial1/0            line-protocol    Up    00:31:19

!--- Displays the information about the tracked interface.

활성 라우터(이 예에서는 R2)가 다운되면 대기 라우터는 다음 표에 표시된 대로 즉시 상태를 Active로 변경합니다.

활성 라우터(R2)가 다운되면...

라우터 R2
R2(config)#interface s1/0

R2(config-if)#shut

R2(config-if)#

*May 21 20:56:54.223: %TRACKING-5-STATE: 1 interface Se1/0 line-protocol Up->Down

R2(config-if)#

*May 21 20:56:56.203: %LINK-5-CHANGED: Interface Serial1/0, changed state to administratively down

*May 21 20:56:57.203: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0, changed state to down

R2(config-if)#

*May 21 20:57:43.087: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Active -> Speak

R2(config-if)#

*May 21 20:57:54.479: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Speak -> Standby

!--- When the interface goes down, the active router changes !--- its state to Standby.

라우터 R3

R3#

*May 21 20:56:53.419: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Standby-> Active

!--- The standby router is now the active router.

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:02:32

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.080 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C801:14FF:FEF4:38, priority 90 (expires in 9.664 sec)

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- IPv6 기술 지원

- IPv6에서 First Hop Redundancy 프로토콜 구성

- HSRP(Hot Standby Router Protocol): 자주 묻는 질문(FAQ)

- RFC 2281 - Cisco HSRP(Hot Standby Router Protocol)

- 기술 지원 및 문서 − Cisco Systems