목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

네트워크 다이어그램

표기 규칙

Neighbor 문이 잘못되었습니다.

솔루션

네이버 주소에 대한 경로가 없거나 피어에 도달하는 데 기본 경로가 사용됩니다.

솔루션

BGP에 update-source 명령이 없습니다.

솔루션

관련 정보

소개

BGP 라우터는 라우팅 정보 간에 피어 연결을 설정하는 경우에만 라우팅 정보를 교환할 수 있습니다. BGP 피어 설정은 디바이스 간 TCP 연결을 생성하는 것으로 시작합니다. TCP 연결이 설정된 후 BGP 디바이스는 BGP Open 메시지의 교환으로 BGP 세션을 생성하려고 시도합니다. 이 경우 BGP 버전, AS 번호, 보류 시간 및 BGP 식별자를 교환합니다.

BGP 피어 설정 프로세스에서 BGP 인접 디바이스가 올바르게 설정되지 않도록 할 수 있는 몇 가지 사항이 있습니다. 이 문서에서는 이 문제의 가능한 몇 가지 이유에 대해 설명합니다.

- neighbor 문이 잘못되었습니다.

- 네이버 주소에 대한 경로가 없거나 피어에 도달하는 데 기본 경로(0.0.0.0/0)이 사용되고 있습니다.

- BGP에 update-source 명령이 없습니다.

- 입력 오류로 인해 neighbor 문의 IP 주소가 잘못되었거나 자율 시스템 번호가 잘못되었습니다. 구성을 확인해야 합니다.

- 유니캐스트는 다음과 같은 이유 중 하나로 인해 손상되었습니다.

- 고도로 이중화된 네트워크의 ATM(Asynchronous Transfer Mode) 또는 프레임 릴레이 환경에서 잘못된 VC(Virtual Circuit) 매핑

- 액세스 목록에서 유니캐스트 또는 TCP 패킷을 차단하고 있습니다.

- NAT(Network Address Translation)가 라우터에서 실행되고 있으며 유니캐스트 패킷을 변환하고 있습니다.

- 레이어 2가 다운되었습니다.

- ebgp-multihop 명령의 부재는 피어가 나타나지 않도록 하는 일반적인 실수입니다. 이 문제는 두 번째 예에 설명되어 있습니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

네트워크 다이어그램

이 네트워크 다이어그램을 처음 세 가지 원인에 대한 예로 사용하십시오.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

Neighbor 문이 잘못되었습니다.

Router R1-AGS의 show ip bgp summary 명령은 세션이 활성 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.10.10.2      4   400       0       0        0    0    0 never    Active

구성은 다음과 같습니다.

R1-AGS

R6-2500

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface Serial1

ip address 10.10.10.1 255.255.255.0

!

router bgp 400

neighbor 10.10.10.2 remote-as 400

neighbor 10.10.10.2 update-source Loopback0

!

ip route 1.1.1.1 255.255.255.255 10.10.10.2

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

interface Serial0

ip address 10.10.10.2 255.255.255.0

!

router bgp 400

neighbor 10.10.10.1 remote-as 400

neighbor 10.10.10.1 update-source Loopback0

!

ip route 2.2.2.2 255.255.255.255 10.10.10.1

debug ip bgp 및 debug ip tcp 트랜잭션 명령은 TCP 연결 실패를 표시합니다.

라우터 R1-AGS의 디버그:

BGP: 10.10.10.2 open active, local address 2.2.2.2

TCB00135978 created

TCB00135978 setting property 0 16ABEA

TCB00135978 bound to 2.2.2.2.11039

TCP: sending SYN, seq 3797113156, ack 0

TCP0: Connection to 10.10.10.2:179, advertising MSS 1460

TCP0: state was CLOSED -> SYNSENT [11039 -> 10.10.10.2(179)]

TCP0: state was SYNSENT -> CLOSED [11039 -> 10.10.10.2(179)]

TCP0: bad seg from 10.10.10.2 -- closing connection: seq 0 ack 3797113157 rcvnxt 0 rcvwnd 0

TCP0: connection closed - remote sent RST

TCB00135978 destroyed

BGP: 10.10.10.2 open failed: Connection refused by remote host

TCP: sending RST, seq 0, ack 1965664223

TCP: sent RST to 1.1.1.1:11016 from 10.10.10.1:179

라우터 R6-2500의 디버그:

TCP: sending RST, seq 0, ack 3797113157

TCP: sent RST to 2.2.2.2:11039 from 10.10.10.2:179

BGP: 10.10.10.1 open active, local address 1.1.1.1

TCB001E030C created

TCB001E030C setting property TCP_WINDOW_SIZE (0) 194F7A

TCB001E030C setting property TCP_TOS (11) 194F79

TCB001E030C bound to 1.1.1.1.11016

TCP: sending SYN, seq 1965664222, ack 0

TCP0: Connection to 10.10.10.1:179, advertising MSS 1460

TCP0: state was CLOSED -> SYNSENT [11016 -> 10.10.10.1(179)]

TCP0: state was SYNSENT -> CLOSED [11016 -> 10.10.10.1(179)]

TCP0: bad seg from 10.10.10.1 -- closing connection: seq 0 ack 1965664223 rcvnxt 0 rcvwnd 0

TCP0: connection closed - remote sent RST

TCB 0x1E030C destroyed

BGP: 10.10.10.1 open failed: Connection refused by remote host

솔루션

이 상황을 해결하려면 neighbor 문의 루프백 주소를 수정하거나 컨피그레이션에서 update-source 명령을 제거하십시오.

이 예에서는 주소가 수정됩니다.

R1-AGS

R6-2500

router bgp 400

neighbor 1.1.1.1 remote-as 400

neighbor 1.1.1.1 update-source Loopback0

!

ip route 1.1.1.1 255.255.255.255 10.10.10.2

router bgp 400

neighbor 2.2.2.2 remote-as 400

neighbor 2.2.2.2 update-source Loopback0

!

ip route 2.2.2.2 255.255.255.255 10.10.10.1

show ip bgp summary 명령을 보면 라우터 R1-AGS가 설정된 상태에 있음을 알 수 있습니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1.1.1.1         4   400       3       3        1    0    0 00:00:26        0

참고: 라우터를 다시 로드한 후 BGP 세션이 설정되지 않은 경우 소프트 리셋을 위해 BGP 아래에 neighbor soft-reconfiguration 문을 구성합니다.

네이버 주소에 대한 경로가 없거나 피어에 도달하는 데 기본 경로가 사용됩니다.

Router R1-AGS의 show ip bgp summary 명령은 세션이 현재 활성 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1.1.1.1         4   400       0       0        0    0    0 never    Active

구성은 다음과 같습니다.

R1-AGS

R6-2500

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface Serial1

ip address 10.10.10.1 255.255.255.0

!

router bgp 300

neighbor 1.1.1.1 remote-as 400

neighbor 1.1.1.1 ebgp-multihop 2

neighbor 1.1.1.1 update-source Loopback0

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

interface Serial0

ip address 10.10.10.2 255.255.255.0

!

router bgp 400

neighbor 2.2.2.2 remote-as 300

neighbor 2.2.2.2 ebgp-multihop 2

neighbor 2.2.2.2 update-source Loopback0

debug 명령을 실행하면 네이버에 대한 경로가 없음을 표시합니다.

라우터 R1-AGS의 디버그:

BGP: 1.1.1.1 open active, delay 9568ms

BGP: 1.1.1.1 multihop open delayed 19872ms (no route)

BGP: 1.1.1.1 multihop open delayed 12784ms (no route)

라우터 R6-2500의 디버그:

BGP: 2.2.2.2 open active, delay 6531ms

BGP: 2.2.2.2 multihop open delayed 14112ms (no route)

BGP: 2.2.2.2 multihop open delayed 15408ms (no route)

솔루션

해결책은 BGP 인접 디바이스 문에 다음 홉에 대한 경로를 포함하는 것입니다. 상황에 따라 정적 또는 동적 경로를 사용할 수 있습니다. 더 많은 제어 권한이 있는 내부 BGP(BGP) 환경에서 라우팅 프로토콜을 사용하여 경로를 동적으로 전파할 수 있습니다. 외부 BGP(eBGP) 상황에서는 다음 홉에 도달하기 위해 고정 경로를 구성하는 것이 좋습니다.

eBGP 피어에서 피어링하는 IP 주소가 직접 연결되지 않은 경우에만 neighbor ebgp-multihop 명령을 사용합니다.

이 예에서는 고정 경로가 사용되었습니다.

R1-AGS

R6-2500

router bgp 300

neighbor 1.1.1.1 remote-as 400

neighbor 1.1.1.1 ebgp-multihop 2

neighbor 1.1.1.1 update-source Loopback0

!

ip route 1.1.1.1 255.255.255.255 10.10.10.2

router bgp 400

neighbor 2.2.2.2 remote-as 300

neighbor 2.2.2.2 ebgp-multihop 2

neighbor 2.2.2.2 update-source Loopback0

!

ip route 2.2.2.2 255.255.255.255 10.10.10.1

show ip bgp summary 명령은 라우터 R1-AGS가 설정된 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1.1.1.1         4   400       3       3        1    0    0 00:00:26        0

참고: 기본 경로는 BGP 세션(iBGP/eBGP)을 설정하는 데 사용되지 않으며, BGP 인접 디바이스를 ping할 수 있지만 디버그에 동일한(경로 없음) 출력이 표시됩니다. BGP 네이버에 경로를 다시 추가하는 것이 해결 방법입니다.

BGP에 update-source 명령이 없습니다.

Router R1-AGS의 show ip bgp summary 명령은 세션이 활성 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1.1.1.1         4   400       0       0        0    0    0 never    Active

구성은 다음과 같습니다.

R1-AGS

R6-2500

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface Serial1

ip address 10.10.10.1 255.255.255.0

!

router bgp 400

neighbor 1.1.1.1 remote-as 400

!

ip route 1.1.1.1 255.255.255.255 10.10.10.2

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

interface Serial0

ip address 10.10.10.2 255.255.255.0

!

router bgp 400

neighbor 2.2.2.2 remote-as 400

!

ip route 2.2.2.2 255.255.255.255 10.10.10.1

debug 명령을 실행하면 TCP 연결 실패가 표시됩니다.

라우터 R1-AGS의 디버그:

TCP: sending RST, seq 0, ack 2248020754

TCP: sent RST to 10.10.10.2:11018 from 2.2.2.2:179

BGP: 1.1.1.1 open active, local address 10.10.10.1

TCB0016B06C created

TCB0016B06C setting property 0 16ADEA

TCB0016B06C bound to 10.10.10.1.11042

TCP: sending SYN, seq 4099938541, ack 0

TCP0: Connection to 1.1.1.1:179, advertising MSS 536

TCP0: state was CLOSED -> SYNSENT [11042 -> 1.1.1.1(179)]

TCP0: state was SYNSENT -> CLOSED [11042 -> 1.1.1.1(179)]

TCP0: bad seg from 1.1.1.1 -- closing connection: seq 0 ack 4099938542 rcvnxt 0 rcvwnd 0

TCP0: connection closed - remote sent RST

TCB0016B06C destroyed

BGP: 1.1.1.1 open failed: Connection refused by remote host

라우터 R6-2500의 디버그:

BGP: 2.2.2.2 open active, local address 10.10.10.2

TCB00194800 created

TCB00194800 setting property TCP_WINDOW_SIZE (0) E6572

TCB00194800 setting property TCP_TOS (11) E6571

TCB00194800 bound to 10.10.10.2.11018

TCP: sending SYN, seq 2248020753, ack 0

TCP0: Connection to 2.2.2.2:179, advertising MSS 556

TCP0: state was CLOSED -> SYNSENT [11018 -> 2.2.2.2(179)]

TCP0: state was SYNSENT -> CLOSED [11018 -> 2.2.2.2(179)]

TCP0: bad seg from 2.2.2.2 -- closing connection: seq 0 ack 2248020754 rcvnxt 0 rcvwnd 0

TCP0: connection closed - remote sent RST

TCB 0x194800 destroyed

BGP: 2.2.2.2 open failed: Connection refused by remote host

TCP: sending RST, seq 0, ack 4099938542

TCP: sent RST to 10.10.10.1:11042 from 1.1.1.1:179

솔루션

이 문제를 해결하려면 두 라우터에서 update-source 명령을 구성하거나, update-source 명령을 제거하고 두 라우터에서 neighbor 문을 변경하십시오. 이 두 솔루션의 예는 다음과 같습니다.

여기에서는 update-source 명령이 두 라우터에서 구성됩니다.

R1-AGS

R6-2500

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface Serial1

ip address 10.10.10.1 255.255.255.0

!

router bgp 400

neighbor 1.1.1.1 remote-as 400

neighbor 1.1.1.1 update-source Loopback0

!

ip route 1.1.1.1 255.255.255.255 10.10.10.2

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

interface Serial0

ip address 10.10.10.2 255.255.255.0

!

router bgp 400

neighbor 2.2.2.2 remote-as 400

neighbor 2.2.2.2 update-source Loopback0

!

ip route 2.2.2.2 255.255.255.255 10.10.10.1

show ip bgp summary 명령은 라우터 R1-AGS가 설정된 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

2.2.2.2         4   400       3       3        1    0    0 00:00:26        0

다른 사용자가 루프백 주소를 피어링하는 경우 update-source 명령만 사용해야 합니다. 이는 iBGP 피어 및 eBGP 피어에 적용됩니다.

여기서 update-source 명령이 제거되고 두 라우터에서 neighbor 문이 변경됩니다.

R1-AGS

R6-2500

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface Serial1

ip address 10.10.10.1 255.255.255.0

!

router bgp 400

neighbor 10.10.10.2 remote-as 400

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

interface Serial0

ip address 10.10.10.2 255.255.255.0

!

router bgp 400

neighbor 10.10.10.1 remote-as 400

show ip bgp summary 명령은 라우터 R1-AGS가 설정된 상태임을 보여줍니다.

R1-AGS(9)#

show ip bgp summary

BGP table version is 1, main routing table version 1

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.10.10.2      4   400       3       3        1    0    0 00:00:26        0

관련 정보

- BGP 지원 페이지

- 기술 지원 및 문서 − Cisco Systems