목차

소개

시작하기 전에

표기 규칙

사전 요구 사항

사용되는 구성 요소

배경 이론

구성

네트워크 다이어그램

구성

다음을 확인합니다.

샘플 show 출력

문제 해결

문제 해결 명령

디버그 출력 샘플

관련 정보

소개

이 문서에서는 프레임 릴레이 연결이 끊길 경우 아날로그 POTS 회선을 사용하여 중앙 사이트에 전화를 걸도록 원격 라우터(Cisco 3640)를 구성하는 방법에 대해 설명합니다. Cisco 3640은 다이얼러 프로파일을 사용하여 프레임 릴레이 링크의 백업 인터페이스를 제공합니다. 또한 특정 비동기 인터페이스는 백업 다이얼아웃용으로 별도로 설정됩니다. 이 컨피그레이션을 확장하여 Multilink PPP를 포함할 수 있으므로 백업 연결에 사용할 수 있는 대역폭이 크게 증가합니다. 자세한 내용은 Multilink PPP for DDR - 기본 구성 및 확인 문서를 참조하십시오.

이 문서에서는 비동기 링크에서 실행 중인 라우팅 프로토콜로 백업 연결을 구성하는 방법을 보여 줍니다. 라우팅 프로토콜에서 사용하는 대역폭이 데이터 전송에 사용할 수 있는 대역폭을 줄일 수 있으므로 설계를 구현하기 전에 신중하게 고려해야 합니다. 스냅샷 라우팅 또는 고정 경로는 라우팅 프로토콜 대신 비동기 링크 전체에서 사용할 수 있습니다.

시작하기 전에

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

사전 요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 아래 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS Software 릴리스 12.0(7)T

- Cisco 3640

- Cisco AS5200 Network Access Server

- Cisco 7206

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

배경 이론

Dial-on-demand 회로를 사용하는 Frame Relay와 같은 WAN 연결에 대한 이중화 경로를 제공하는 것이 일반적입니다. 비동기 모뎀과 회선 교환 POTS(Plain Old Telephone Service) 회선은 정기적으로 WAN 인터페이스를 백업하는 데 사용됩니다. 다이얼 백업 시나리오를 설계할 때는 신중한 계획이 필요합니다. 백업 링크의 트래픽, 장애가 발생할 수 있는 링크 수, 백업 회로를 지원하기 위한 포트 용량 계획 등과 같은 요소를 고려해야 합니다.

WAN 링크에 대한 백업을 제공하는 데 사용할 수 있는 세 가지 일반적인 방법은 다음과 같습니다.

- 백업 인터페이스

- 다이얼러 감시

- 부동 고정 경로

백업 인터페이스는 기본 링크가 중단될 때까지 비활성 상태로 유지됩니다. 그런 다음 백업 링크가 활성화되어 두 사이트 간의 연결을 재설정합니다. Frame Relay 링크에 대한 백업 인터페이스를 구현하는 경우 기본 또는 다중 지점 인터페이스가 작동/작동 상태로 남아 있어 기본 PVC(가상 회로)가 다운되어 백업 인터페이스가 활성화되지 않을 수 있으므로 Frame Relay 링크의 포인트-투-포인트 하위 인터페이스가 유리합니다. Cisco IOS® Software 릴리스 12.05(T) 이상에 맞게 네트워크에서 프레임 릴레이 종단간 keepalive를 구성하는 것이 좋습니다. 자세한 내용은 프레임 릴레이 종단간 keepalive 문서를 참조하십시오.

Dialer Watch는 중앙 라우터에서 발신 통화를 트리거하기 위해 관심 있는 트래픽을 정의하는 것에만 의존하지 않고 안정적인 연결을 제공합니다. Dialer Watch는 특정 경로를 모니터링하고, 해당 네트워크에 연결할 수 없는 경우 Dialer Watch에서 보조 링크를 표시합니다. 다이얼러 감시에 대한 자세한 내용은 BRI를 사용하여 DDR 백업 구성 및 다이얼러 감시 문서를 참조하십시오.

부동 고정 경로는 관리 거리가 동적 경로의 관리 거리보다 큰 고정 경로입니다. 고정 경로가 동적 경로보다 덜 바람직하도록 고정 경로에서 관리 거리를 구성할 수 있습니다. 따라서 동적 경로를 사용할 수 있는 경우 고정 경로가 사용되지 않습니다. 그러나 동적 경로가 손실되면 고정 경로가 대체되고 이 대체 경로를 통해 트래픽을 전송할 수 있습니다. 부동 고정 경로를 사용하여 백업을 구성하는 방법에 대한 예는 Configuring ISDN Backup for Frame Relay 문서를 참조하십시오.

다이얼 백업 시나리오를 설계할 때는 백업 링크의 트래픽 패턴, 실패할 수 있는 링크 수, 최악의 경우 중앙 사이트에서 사용할 수 있는 포트 수 등의 요소를 고려해야 합니다.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

네트워크 다이어그램

이 문서에서는 아래 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성

이 문서에서는 아래 표시된 구성을 사용합니다.

참고: 이 문서의 구성은 Cisco 3640 및 AS5200 Network Access Server에서 실행되는 Cisco IOS Software Release 12.0(7)T를 기반으로 합니다. Cisco 3640에는 라우터가 외부 모뎀을 사용하지 않고 최대 8개의 발신 아날로그 통화를 발신할 수 있는 NM-8AM Analog Modem Network Modules Card가 있습니다.

AS5200은 ISDN 및 비동기 전화 접속 사용자 및 백업 연결을 모두 지원할 수 있는 일반 액세스 서버로 구성되었습니다.

maui-rtr-06(Cisco 7206)의 구성은 다이얼 백업 시나리오와 관련이 없습니다. Cisco 7206은 수신 WAN 링크를 종료하는 데만 사용됩니다. 비동기 백업을 시연하는 데 구성이 필요하지 않습니다.

- maui-nas-05(Cisco 3640)

- maui-nas-02(Cisco AS5200)

maui-nas-05(Cisco 3640)

Current configuration:

!

version 12.1

service timestamps debug datetime msec localtime show-timezone

service timestamps log datetime msec localtime show-timezone

service password-encryption

!

hostname maui-nas-05

!

enable secret <deleted>

!

username maui-nas-02 password <deleted>

!--- username and password of the remote router for !--- Challenge Handshake Authentication Protocol (CHAP) authenticationip subnet-zero

no ip domain-lookup

!

interface Loopback0

ip address 172.22.63.5 255.255.255.255

!

interface Loopback1

ip address 172.22.69.254 255.255.255.0

!

interface Ethernet0/0

no ip address

shutdown

!

interface Ethernet0/1

ip address 172.22.95.1 255.255.255.0

!

interface Serial3/0

!--- Frame Relay interface no ip address

encapsulation frame-relay frame-relay lmi-type cisco

!

interface Serial3/0.1 point-to-point

!--- Frame Relay subinterface backup delay 5 10 !--- Enable backup interface 5 seconds after subinterface is down !--- Disable dialer interface 10 seconds after subinterface comes back up

backup interface Dialer1

!--- Assigns dialer 1 as backup interface

ip address 192.168.10.1 255.255.255.252

frame-relay interface-dlci 46

!

interface Async33

!--- Async Interface set aside for dial backup

no ip address

encapsulation ppp

!--- Set PPP as encapsulation mechanism for interface

dialer in-band

!--- Enable DDR on interface

dialer pool-member 2

!--- Assign async interface to dialer pool 2

async default routing

!--- Allows interface to pass routing updates over an async line

no fair-queue

no cdp enable

!

interface Dialer1

ip unnumbered Loopback1

!--- Use IP address of Loopback 1 interface for Dialer Interface

encapsulation ppp

!--- Set PPP as encapsulation mechanism for interface

dialer pool 2

!--- Assign dialer interface to dialer pool 2

dialer idle-timeout 300

!--- Set idle time in seconds before call is disconnected

dialer string 10001

!--- Specify telephone number to be dialed (PRI on maui-nas-03)

dialer hold-queue 50

!--- Number of interesting packets to hold in queue until !--- modem connection is established

dialer-group 1

!--- Assign dialer interface to use dialer-list 1 to !--- determine interesting traffic

no peer default ip address

!--- Disable peer default IP address assignment to dialer interface

no cdp enable

ppp authentication chap

!--- Enforce CHAP authentication on dialer interface

ppp chap hostname maui-backup

!--- Use maui-backup for CHAP hostname instead of maui-nas-05 !--- This username and password must be configured on the AS5200

ppp chap password <deleted>

!--- Create CHAP password for user Maui-backup

!

router ospf 1

network 172.22.0.0 0.0.255.255 area 0

network 192.168.10.0 0.0.0.3 area 0

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

!--- Permit IP on dialer group 1 as interesting packets

!

line con 0

transport input none

line 33

!--- Physical interface to be used for dialing !--- Matches with interface Async 33 configured above

script dialer mica.*

!--- Assign default chat script for mica modems to line

modem InOut

transport input all

line 34 40

modem InOut

transport input all

line aux 0

line vty 0 4

login

!

end

maui-nas-02(Cisco AS5200)

Current configuration:

!

version 12.0

service timestamps debug datetime msec localtime show-timezone

service timestamps log datetime msec localtime show-timezone

service password-encryption

!

hostname maui-nas-02

!

no logging console guaranteed

enable secret <deleted>

!

username maui-backup password <password>

!--- username and password used by dialin client !--- (configured on interface dialer 1 on the Cisco 3640)spe 2/0 2/3

firmware location system:/ucode/mica_port_firmware

!

resource-pool disable

!

ip subnet-zero

no ip domain-lookup

!

isdn switch-type primary-ni

!

controller T1 0

!--- PRI used for dialin users

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

description "NAS Phone Number:10001"

!

controller T1 1

clock source line secondary

!

!

interface Loopback0

ip address 172.22.87.2 255.255.255.255

no ip directed-broadcast

!

interface Loopback1

!--- Loopback 1 summarizes addresses in the ip address pool !--- Note that Loopback 1 and the address pool are in the same subnet

ip address 172.22.83.254 255.255.255.0

no ip directed-broadcast

!

interface Ethernet0

ip address 172.22.80.2 255.255.255.0

no ip directed-broadcast

!

interface Serial0:23

!--- D channel for T1 0

no ip address

no ip directed-broadcast

isdn switch-type primary-ni

isdn incoming-voice modem

!--- This command is required to accept analog calls on the PRI

fair-queue 64 256 0

no cdp enable

!

interface Group-Async1

!--- Group-Async Interface for all dialin connections !--- Note that this interface does not distinguish between !--- a backup connection or a regular dialup connection

ip unnumbered Loopback1

!--- Use IP address of Loopback 1 interface for Dialer Interface

no ip directed-broadcast

encapsulation ppp

!--- Set PPP as encapsulation mechanism for interface

ip tcp header-compression passive

async default routing

!--- Allows interface to pass routing updates over an async line

async mode interactive

!--- Enable interactive mode on async interface

peer default ip address pool default

!--- Assign IP addresses for incoming calls from default address pool

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap

!--- Use CHAP authentication

group-range 1 24

!

router ospf 1

network 172.22.0.0 0.0.255.255 area 0

!

ip local pool default 172.22.83.2 172.22.83.254

!--- IP address pool for dialin connection

ip default-gateway 172.22.80.1

ip http server

ip classless

!

!

line con 0

transport input none

line 1 24

exec-timeout 0 0

autoselect during-login

autoselect ppp

absolute-timeout 240

refuse-message ^CCCCCCC!!! All lines are busy, try again later ###^C

modem InOut

international

transport preferred none

transport input telnet

transport output telnet

line aux 0

line vty 0 4

password <deleted>

login

!

ntp clock-period 17180069

ntp server 172.22.255.1

scheduler interval 3000

end

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

특정 show 명령은 show 명령 출력의 분석을 볼 수 있는 출력 인터프리터 도구에서 지원됩니다.

- show caller userid detailed - 자세한 LCP(Link Control Protocol) 협상 매개변수를 표시합니다.

참고: show caller 명령은 릴리스 11.3(5)AA에서 Cisco IOS Software에 추가되었습니다. 소프트웨어 버전이 show caller 명령을 지원하지 않는 경우 show user 명령을 사용합니다.

- show dialer - 실제 통화가 이루어졌는지 확인합니다.

- show ip route - 라우팅 테이블의 모든 경로를 표시합니다.

- show ip ospf database - 특정 디바이스에 대한 OSPF(Open Shortest Path First) 데이터베이스와 관련된 정보 목록을 표시합니다.

- show ip ospf interface [interface-name] - OSPF 관련 인터페이스 정보를 표시합니다. 자세한 내용은 show ip ospf interface Command Reveal(show ip ospf interface 명령이 무엇을 나타냅니까?)을 참조하십시오. 문서.

- show ip ospf neighbor [interface-name] [neighbor-id] detail - 인터페이스별로 OSPF 인접 디바이스 정보를 표시합니다. 자세한 내용은 show ip ospf neighbor 명령이 나타내는 항목을 참조하십시오. 문서.

- show ip protocols - 활성 라우팅 프로토콜 프로세스의 매개변수 및 현재 상태를 표시합니다. 자세한 내용은 IP Routing Protocol-Independent Commands 설명서의 show ip 프로토콜 정보를 참조하십시오.

샘플 show 출력

다음 출력은 Frame Relay Link가 작동 중인 동안 maui-nas-05의 라우팅 테이블을 보여줍니다. OSPF 경로는 Serial 하위 인터페이스에 표시됩니다.

maui-nas-05#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - ISIS level-1, L2 - ISIS level-2, ia - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

192.168.10.0/30 is subnetted, 1 subnets

C       192.168.10.0 is directly connected, Serial3/0.1

172.22.0.0/16 is variably subnetted, 7 subnets, 2 masks

O       172.22.83.254/32 [110/50] via 192.168.10.2, 00:04:40, Serial3/0.1

O       172.22.255.6/32 [110/49] via 192.168.10.2, 00:04:40, Serial3/0.1

C       172.22.63.5/32 is directly connected, Loopback0

C       172.22.95.0/24 is directly connected, Ethernet0/1

O       172.22.80.0/24 [110/49] via 192.168.10.2, 00:04:40, Serial3/0.1

O       172.22.87.2/32 [110/50] via 192.168.10.2, 00:04:42, Serial3/0.1

C       172.22.69.0/24 is directly connected, Loopback1

기본 링크에 장애가 발생하면 백업 링크가 나타나고 라우팅 테이블이 변환됩니다. OSPF 경로는 다이얼러 인터페이스에 있습니다.

maui-nas-05#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - ISIS level-1, L2 - ISIS level-2, IA - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

172.22.0.0/16 is variably subnetted, 7 subnets, 2 masks

C       172.22.83.254/32 is directly connected, Dialer1

O       172.22.255.6/32 [110/1796] via 172.22.83.254, 00:00:48, Dialer1

C       172.22.63.5/32 is directly connected, Loopback0

C       172.22.95.0/24 is directly connected, Ethernet0/1

O       172.22.80.0/24 [110/1795] via 172.22.83.254, 00:00:48, Dialer1

O       172.22.87.2/32 [110/1786] via 172.22.83.254, 00:00:48, Dialer1

C       172.22.69.0/24 is directly connected, Loopback1

다음 출력은 사용자 maui-nas-02(중앙 사이트 Access Server)에 대한 세부 정보를 보여줍니다.

maui-nas-05#show caller user maui-nas-02 detail

User: maui-nas-02, line tty 33, service Async

Idle time 00:00:09

Timeouts:            Absolute  Idle      Idle

Session   Exec

Limits:          -         -         00:10:00

Disconnect in:   -         -         -

TTY: Line 33, running PPP on As33

Location: PPP: 172.22.83.254

Line: Baud rate (TX/RX) is 9600/9600, no parity, 2 stopbits, 8 databits

Status: Ready, Active, No Exit Banner, Async Interface Active

HW PPP Support Active

Capabilities: Modem Callout, Modem RI is CD, Integrated Modem

Modem State: Ready

User: maui-nas-02, line As33, service PPP

Active time 00:00:35, Idle time 00:00:05

Timeouts:            Absolute  Idle

Limits:          -         00:05:00

Disconnect in:   -         00:04:54

PPP: LCP Open, CHAP (local <--> local), IPCP

LCP: -> peer, ACCM, AuthProto, MagicNumber, PCompression, ACCompression

<- peer, ACCM, AuthProto, MagicNumber, PCompression, ACCompression

!--- LCP Parameters negotiated

NCP: Open IPCP

IPCP: <- peer

-> peer, Address

!--- IPCP Parameters negotiated

Dialer: Connected 00:01:07 to 10001, outbound

Idle timer 300 secs, idle 7 secs

Type is IN-BAND ASYNC, group Dialer1

Cause: ip (s=172.22.63.5, d=224.0.0.5)

!--- Reason for Dialout

IP: Local 172.22.63.5, remote 172.22.83.254

Counts: 23 packets input, 1204 bytes, 0 no buffer

0 input errors, 0 CRC, 0 frame, 0 overrun

27 packets output, 1498 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

특정 show 명령은 show 명령 출력의 분석을 볼 수 있는 출력 인터프리터 도구에서 지원됩니다.

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug dialer events - 다이얼러 인터페이스에서 수신된 패킷에 대한 디버깅 정보를 표시합니다. 인터페이스에서 DDR(Dial on Demand Routing)을 활성화하면 통화 원인(전화 걸기 원인)에 대한 정보도 표시됩니다. 자세한 내용은 Debug 명령 설명서의 디버그 다이얼러 이벤트 정보를 참조하십시오.

- debug dialer packets - 다이얼러 인터페이스에서 수신된 패킷에 대한 디버깅 정보를 표시합니다. 이 명령의 no 형식은 디버깅 출력을 비활성화합니다. 자세한 내용은 Debug 명령 설명서의 디버그 다이얼러 패킷 정보를 참조하십시오.

- debug ppp - PPP를 구현하는 인터네트워크에서 트래픽 및 교환에 대한 정보를 표시합니다. 이 명령의 no 형식은 디버깅 출력을 비활성화합니다.

[아니요] 디버그 ppp {packet | 협상 | 오류 | 인증}

자세한 내용은 Debug Commands 설명서의 debug ppp 정보를 참조하십시오.

- debug isdn event - ISDN 인터페이스의 사용자 측(라우터에 있음)에서 발생하는 ISDN 이벤트를 표시합니다. Q.931 ISDN 이벤트가 표시됩니다(ISDN 네트워크 연결의 통화 설정 및 해제). 이 명령의 no 형식은 디버깅 출력을 비활성화합니다.

- debug isdn q931 - 로컬 라우터(사용자측)와 네트워크 간의 ISDN 네트워크 연결(레이어 3)의 통화 설정 및 해제 정보를 표시합니다. 이 명령의 no 형식은 디버깅 출력을 비활성화합니다. 자세한 내용은 디버그 명령 설명서의 debug isdn q931 정보를 참조하십시오.

디버그 출력 샘플

maui-nas-05#debug ppp negotiation

PPP protocol negotiation debugging is on

maui-nas-05#debug ppp chap

PPP authentication debugging is on

maui-nas-05#debug modem

Modem control/process activation debugging is on

maui-nas-05#debug backup

Backup events debugging is on

maui-nas-05#debug dialer

Dial on demand events debugging is on

maui-nas-05#show debug

General OS:

Modem control/process activation debugging is on

Dial on demand:

Dial on demand events debugging is on

Backup:

Backup events debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

maui-nas-05#

*Mar  1 00:03:49.927 UTC: BACKUP(Serial3/0.1): event = primary went down

*Mar  1 00:03:49.927 UTC: BACKUP(Serial3/0.1): changed state to "waiting to back up"

*Mar  1 00:03:51.859 UTC: %LINK-3-UPDOWN: Interface Serial3/0, changed state to down

*Mar  1 00:03:52.863 UTC: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial3/0, changed state to down

!--- Primary Link is down

*Mar  1 00:03:54.927 UTC: BACKUP(Serial3/0.1): event = timer expired

*Mar  1 00:03:54.927 UTC: BACKUP(Serial3/0.1): secondary interface (Dialer1) made active

*Mar  1 00:03:54.927 UTC: BACKUP(Serial3/0.1): changed state to "backup mode"

*Mar  1 00:03:55.663 UTC: As33 DDR: rotor dialout [priority]

*Mar  1 00:03:55.663 UTC: As33 DDR: Dialing cause ip (s=172.22.63.5, d=224.0.0.5)

!--- interesting traffic causes dialout

*Mar  1 00:03:55.663 UTC: As33 DDR: Attempting to dial 10001

!--- Number to be dialed (PRI on maui-nas-02)

*Mar  1 00:03:55.663 UTC: CHAT33: Attempting async line dialer script

*Mar  1 00:03:55.663 UTC: CHAT33: no matching chat script found for 10001

*Mar  1 00:03:55.663 UTC: CHAT33: Dialing using Modem script: d0efault-d0ials0cript & System script: none

!--- using default modem chat script

*Mar  1 00:03:55.663 UTC: CHAT33: process started

*Mar  1 00:03:55.663 UTC: CHAT33: Asserting DTR

*Mar  1 00:03:55.663 UTC: CHAT33: Chat script d0efault-d0ials0cript started

*Mar  1 00:03:56.927 UTC: %LINK-3-UPDOWN: Interface Dialer1, changed state to up

!--- Dialer interface is brought up

*Mar  1 00:03:56.927 UTC: Di1 LCP: Not allowed on a Dialer Profile

*Mar  1 00:03:56.927 UTC: BACKUP(Dialer1): event = primary came up

*Mar  1 00:03:57.271 UTC: Modem 1/0 Mcom: in modem state 'Dialing/Answering'

*Mar  1 00:04:06.671 UTC: Modem 1/0 Mcom: in modem state 'Waiting for Carrier'

*Mar  1 00:04:18.135 UTC: Modem 1/0 Mcom: in modem state 'Connected'

*Mar  1 00:04:18.543 UTC: Modem 1/0 Mcom: CONNECT at 31200/33600(Tx/Rx), V34, LAPM, V42bis, Originate

*Mar  1 00:04:18.599 UTC: CHAT33: Chat script d0efault-d0ials0cript finished, status = Success

*Mar  1 00:04:18.599 UTC: Modem 1/0 Mcom: switching to PPP mode

*Mar  1 00:04:18.599 UTC: TTY33: no timer type 1 to destroy

*Mar  1 00:04:18.599 UTC: TTY33: no timer type 0 to destroy

*Mar  1 00:04:20.599 UTC: %LINK-3-UPDOWN: Interface Async33, changed state to up Dialer statechange to up Async33

!--- Interface Async 33 is changed to state Up

*Mar  1 00:04:20.599 UTC: %DIALER-6-BIND: Interface As33 bound to profile Di1 Dialer call has been placed Async33

*Mar  1 00:04:20.599 UTC: As33 PPP: Treating connection as a callout

*Mar  1 00:04:20.599 UTC: As33 PPP: Phase is ESTABLISHING, Active Open

*Mar  1 00:04:20.599 UTC: Modem 1/0 Mcom: PPP escape map: TX map = FFFFFFFF, Rx map = 0

!--- LCP Negotiation begins

*Mar  1 00:04:20.599 UTC: As33 LCP: O CONFREQ [Closed] id 1 len 25

...

*Mar  1 00:04:22.599 UTC: As33 LCP: O CONFREQ [REQsent] id 2 Len 25

*...

*Mar  1 00:04:22.743 UTC: As33 LCP: I CONFACK [REQsent] id 2 Len 25

...

*Mar  1 00:04:24.599 UTC: As33 LCP: O CONFREQ [ACKrcvd] id 3 Len 25

...

*Mar  1 00:04:24.787 UTC: As33 LCP: I CONFACK [REQsent] id 3 Len 25

...

*Mar  1 00:04:24.795 UTC: As33 LCP: I CONFREQ [ACKrcvd] id 4 Len 25

...

*Mar  1 00:04:24.795 UTC: As33 LCP: O CONFACK [ACKrcvd] id 4 Len 25

...

*Mar  1 00:04:24.795 UTC: As33 LCP: State is Open

!--- LCP negotiation complete

*Mar  1 00:04:24.795 UTC: Modem 1/0 Mcom: PPP escape map: TX map = A0000, Rx map= 0

*Mar  1 00:04:24.799 UTC: As33 PPP: Phase is AUTHENTICATING, by both

*Mar  1 00:04:24.799 UTC: As33 CHAP: Using alternate hostname Maui-backup

*Mar  1 00:04:24.799 UTC: As33 CHAP: O CHALLENGE id 1 Len 32 from "Maui-backup"

*Mar  1 00:04:24.799 UTC: As33 AUTH: Started process 0 pid 51

*Mar  1 00:04:24.939 UTC: As33 CHAP: I CHALLENGE id 2 Len 32 from "maui-nas-02"

*Mar  1 00:04:24.939 UTC: As33 CHAP: Using alternate hostname Maui-backup

*Mar  1 00:04:24.939 UTC: As33 CHAP: O RESPONSE id 2 Len 32 from "Maui-backup"

*Mar  1 00:04:24.955 UTC: As33 CHAP: I RESPONSE id 1 Len 32 from "maui-nas-02"

*Mar  1 00:04:24.955 UTC: As33 CHAP: O SUCCESS id 1 Len 4

*Mar  1 00:04:25.079 UTC: As33 CHAP: I SUCCESS id 2 Len 4

!--- CHAP Authentication successful

*Mar  1 00:04:25.079 UTC: As33 PPP: Phase is UP

!--- IPCP negotiation begins

*Mar  1 00:04:25.079 UTC: As33 IPCP: O CONFREQ [Not negotiated] id 1 Len 10

*Mar  1 00:04:25.079 UTC: As33 IPCP:    Address 172.22.63.5 (0x0306AC163F05)

*Mar  1 00:04:25.087 UTC: As33 IPCP: I CONFREQ [REQsent] id 3 Len 16

*Mar  1 00:04:25.091 UTC: As33 IPCP:    CompressType VJ 15 slots (0x0206002D0F00)

*Mar  1 00:04:25.091 UTC: As33 IPCP:    Address 172.22.83.254 (0x0306AC1653FE)

*Mar  1 00:04:25.091 UTC: As33 IPCP: O CONFREJ [REQsent] id 3 Len 10

*Mar  1 00:04:25.091 UTC: As33 IPCP:    CompressType VJ 15 slots (0x0206002D0F00)

*Mar  1 00:04:25.215 UTC: As33 IPCP: I CONFNAK [REQsent] id 1 Len 10

*Mar  1 00:04:25.215 UTC: As33 IPCP:    Address 172.22.83.41 (0x0306AC165329)

!--- IP address assigned to the dialin client from the address pool

*Mar  1 00:04:25.215 UTC: As33 IPCP: O CONFREQ [REQsent] id 2 Len 4

*Mar  1 00:04:25.219 UTC: As33 IPCP: I CONFREQ [REQsent] id 4 Len 10

*Mar  1 00:04:25.219 UTC: As33 IPCP:    Address 172.22.83.254 (0x0306AC1653FE)

*Mar  1 00:04:25.219 UTC: As33 IPCP: O CONFACK [REQsent] id 4 Len 10

*Mar  1 00:04:25.223 UTC: As33 IPCP:    Address 172.22.83.254 (0x0306AC1653FE)

*Mar  1 00:04:25.331 UTC: As33 IPCP: I CONFACK [ACKsent] id 2 Len 4

*Mar  1 00:04:25.331 UTC: As33 IPCP: State is Open

*Mar  1 00:04:25.331 UTC: As33 DDR: dialer protocol up

*Mar  1 00:04:25.331 UTC: As33 DDR: Call connected, 3 packets unqueued, 3 transmitted, 0 discarded

*Mar  1 00:04:25.331 UTC: Di1 IPCP: Install route to 172.22.83.254

!--- Installing route to loopback address of maui-nas-02

*Mar  1 00:04:26.079 UTC: %LINEPROTO-5-UPDOWN: Line protocol on Interface Async33, changed state to up

!--- Async connection is up

관련 정보

- 기본 다이얼 액세스를 위한 NAS 구성

- 운영

- OSPF 명령

- OSPF 구성

- Technical Support - Cisco Systems