목차

소개

시작하기 전에

표기 규칙

사전 요구 사항

사용되는 구성 요소

BPDU 형식

관련 정보

소개

이 문서에서는 DEC 및 IEEE 802.1d Bridge Protocol Data Unit(BPDU) 형식에 대해 설명합니다.

시작하기 전에

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

사전 요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

BPDU 형식

DEC Bpdu의 형식은 다음과 같습니다.

DEC code:     E1

bpdu type:    19 hello, 02 topology change notice

version:      01

bit field:    1 byte

1 : topology change notice

2 : topology change notice ack

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : use short timers

root priority:   2 bytes

root id:         6 bytes

root path cost:  2 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         1 byte

message age:     1 byte

hello time:      1 byte

max age:         1 byte

forward delay:   1 byte

IEEE 802.1d Bpdu의 형식은 다음과 같습니다.

protocol id:   0000 IEEE 802.1d

version id:    00

bpdu type:     00 config bpdu, 80 tcn bpdu

bit field:     1 byte

1 : topology change flag

2 : unused    0

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : topology change ack

root priority    2 bytes

root id:         6 bytes

root path cost:  4 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         2 bytes

message age:     2 bytes in 1/256 secs

max age:         2 bytes in 1/256 secs

hello time:      2 bytes in 1/256 secs

forward delay:   2 bytes in 1/256 secs

관련 정보

- Technical Support - Cisco Systems