内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

設定

ネットワーク図

設定

確認

show のサンプル出力

トラブルシュート

トラブルシューティングのリソース

トラブルシューティングのためのコマンド

デバッグの出力例

関連情報

概要

マルチリンク PPP（MLP）は、ISDN、同期インターフェイス、非同期インターフェイスなどのダイヤラ インターフェイスに対してロード バランシングを行います。MLP はパケットを分割し、パラレル回線上にフラグメントを送信します。このようにして、MLP はスループットを改善し、システム間の遅延を低減します。MLP は、複数の論理データリンクにわたってデータグラムを分割、再結合、および順序付けする手段を提供します。MLP ではパケットのフラグメント化が可能で、これらのフラグメントは、複数のポイントツーポイント リンクを経由して同じリモート アドレスに同時に送信できます。

このドキュメントでは、バーチャルテンプレート設定を介したシリアルインターフェイス間のマルチリンク接続について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS(R) Software Release 11.2 以上

- 2台のCisco 2503ルータ。それぞれが2つのWANシリアルインターフェイスを備えています。これらのルータは、Cisco IOSソフトウェアリリース12.2(7b)を実行します。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

関連製品

この設定は、次のハードウェアおよびソフトウェアのバージョンでも使用できます。

- 2つのWANシリアルインターフェイスを持つ2つのルータ。WIC-1T、WIC-2T、および固定WANシリアルインターフェイスを使用できます。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

ルータMontecitoとGoletaは、インターフェイスSerial0とSerial1を介してバックツーバックで接続されます。この設定では、両側のバーチャルテンプレート、マルチリンクポイントツーポイントプロトコル(PPP)、およびルータ間のIPとIPXをブリッジおよびルーティングします。

設定

このドキュメントでは、次の構成を使用します。

- モンテシト

- ゴレタ

モンテシト

Montecito#write terminal

Building configuration...

Current configuration : 945 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Montecito

!

boot system flash c2500-d-l.122-7b.bin

no logging buffered

!

ip subnet-zero

no ip domain-lookup

!

!

multilink virtual-template 1

!--- Applies the virtual interface template to the multilink bundle. !--- All multilink calls have virtual-access interfaces cloned !--- from virtual-template 1.

!

ipx routing 0000.0c31.aac2

!

interface Loopback0

ip address 10.1.1.1 255.0.0.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!

!--- Virtual-template is a logical interface that creates virtual access !--- interfaces dynamically, and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

ppp multilink

!--- Enables Multilink PPP on the interface.

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

no ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

login

!

end

ゴレタ

Goleta#write terminal

Building configuration...

Current configuration : 960 bytes

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Goleta

!

!

ip subnet-zero

no ip domain-lookup

!

!

!--- Applies the virtual interface template to the multilink bundle. !--- Skip this step for ISDN or dialer interfaces.

multilink virtual-template 1

ipx routing 0000.0c47.4e9a

!

!

!

interface Loopback0

ip address 192.168.10.2 255.255.255.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!--- Virtual-template is a logical interface that Creates virtual access !--- interfaces dynamically and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

!

!--- Enables Multilink PPP on the interface.

ppp multilink

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

!

end

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

- show ppp multilink：アクティブなマルチリンク バンドルに関する情報を表示します。このコマンドを使用して、マルチリンク接続を検証します。

- show interface virtual-access：特定の仮想アクセスインターフェイスのステータス、トラフィックデータ、および設定情報を表示します。

- show interface serial：シリアルインターフェイスに関する問題をトラブルシューティングできます

show のサンプル出力

接続後のMontecitoでのshowコマンド

Montecito#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (10.1.1.1)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:00, output never, output hang never

Last clearing of "show interface" counters 00:02:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

22 packets input, 743 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

8 packets output, 124 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Montecito#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:06, output hang never

Last clearing of "show interface" counters 02:04:30

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107170 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1483 packets output, 24622 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:04:32

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107161 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1482 packets output, 24646 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show ppp multilink

Virtual-Access1, bundle name is Goleta

Bundle up for 00:01:39

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x3D received sequence, 0xB sent sequence

Member links: 2 (max not set, min not set)

Serial1, since 00:01:40, last rcvd seq 00003C

Serial0, since 00:01:39, last rcvd seq 00003B

Montecito#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

Montecito#

接続後のGoletaでのshowコマンド

Goleta#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (192.168.10.2)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:10, output never, output hang never

Last clearing of "show interface" counters 00:02:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

4 packets input, 52 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

28 packets output, 892 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Goleta#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:28, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2364 packets input, 41972 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4465 packets output, 134689 bytes, 0 underruns

0 output errors, 0 collisions, 148 interface resets

0 output buffer failures, 0 output buffers swapped out

294 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:38, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2366 packets input, 42030 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4472 packets output, 134930 bytes, 0 underruns

0 output errors, 0 collisions, 147 interface resets

0 output buffer failures, 0 output buffers swapped out

289 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#sh ppp multilink

Virtual-Access1, bundle name is Montecito

Bundle up for 00:01:35

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0xB received sequence, 0x3B sent sequence

Member links: 2 (max not set, min not set)

Serial0, since 00:01:36, last rcvd seq 00000A

Serial1, since 00:01:35, last rcvd seq 000009

Goleta#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

トラブルシュート

このセクションは、設定のトラブルシューティングを行う際に参照してください。

トラブルシューティングのリソース

必要に応じて、これらのトラブルシューティング情報を使用してください。

- シリアル回線の問題に関するトラブルシューティング

- HDLC バックツーバック接続

- 専用回線のトラブルシューティング

トラブルシューティングのためのコマンド

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

注：debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

- debug ppp negotiation：クライアントがPPPネゴシエーションを通過するかどうかを示します。また、アドレスネゴシエーションもチェックします。

- debug ppp authentication：クライアントが認証を渡すかどうかを示します。Cisco IOSソフトウェアリリース11.2以降のバージョンを使用する場合は、このコマンドを使用します。

- debug ppp chap：クライアントが認証を通過するかどうかを示します。リリース11.2より前のCisco IOSソフトウェアリリースを使用する場合は、このコマンドを使用します。

- debug ppp error ：PPP 接続のネゴシエーションと操作に関するプロトコル エラーとエラー統計情報を表示します。

- debug vtemplate：使用されている仮想テンプレート設定を確認できます。

- debug vprofile：仮想アクセスインターフェイスに適用される設定オプションを表示できます。

デバッグの出力例

次に、成功したコールに対するデバッグ出力を示します。太字フォントのセクションに注意を払います。次に示す結果と、取得した出力を比較します。

Montecito 側の PPP デバッグ

Montecito#debug ppp negotiation

PPP protocol negotiation debugging is on

Montecito#

00:07:30: %LINK-3-UPDOWN: Interface Serial1, changed state to up

00:07:30: Se1 PPP: Treating connection as a dedicated line

00:07:30: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 2 load]

00:07:30: Se1 LCP: O CONFREQ [Closed] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: O CONFACK [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: State is Open

00:07:30: Se1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

00:07:31: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

00:07:31: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

00:07:31: %LINK-3-UPDOWN: Interface Serial0, changed state to up

00:07:31: Se0 PPP: Treating connection as a dedicated line

00:07:31: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

00:07:31: Se0 LCP: O CONFREQ [Closed] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

00:07:31: Vi1 PPP: Treating connection as a dedicated line

00:07:31: Vi1 LCP: O CONFREQ [Closed] id 1 len 26

00:07:31: Vi1 LCP:    MagicNumber 0x6063D8F9 (0x05066063D8F9)

00:07:31: Vi1 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Vi1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Vi1 PPP: Phase is UP [0 sess, 0 load]

00:07:31: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

00:07:31: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 MLP: Added first link Se1 to bundle Goleta

00:07:31: Se0 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se0 LCP: O CONFACK [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se1 BNCP: MLP bundle interface is built, process packets now

00:07:31: Se1 BNCP: Redirect packet to Vi1

00:07:31: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

00:07:31: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

00:07:31: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

00:07:31: Se0 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Se0 LCP: State is Open

00:07:31: Se0 PPP: Phase is VIRTUALIZED [0 sess, 2 load]

00:07:31: Vi1 MLP: Added link Se0 to bundle Goleta

00:07:31: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

00:07:31: Vi1 BNCP: State is Open

00:07:31: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPCP: State is Open

00:07:31: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 IPXCP: State is Open

00:07:31: Vi1 IPCP: Install route to 192.168.10.2

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Montecito#

Montecito#ping  192.168.10.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/9/12 ms

Montecito#ping ipx

Target IPX address: BEEF.0000.0c47.4e9a

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c47.4e9a,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Montecito#

Goleta 側の PPP デバッグ

Goleta#debug ppp negotiation

PPP protocol negotiation debugging is on

Goleta#

01:00:26: Se0 PPP: Treating connection as a dedicated line

01:00:26: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:26: Se0 LCP: O CONFREQ [Closed] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: O CONFACK [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: State is Open

01:00:26: Se0 PPP: Phase is VIRTUALIZED [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

01:00:27: %LINK-3-UPDOWN: Interface Serial1, changed state to up

01:00:27: Se1 PPP: Treating connection as a dedicated line

01:00:27: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:27: Se1 LCP: O CONFREQ [Closed] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:00:27: Vi1 PPP: Treating connection as a dedicated line

01:00:27: Vi1 LCP: O CONFREQ [Closed] id 1 len 23

01:00:27: Vi1 LCP: MagicNumber 0x60944F10 (0x050660944F10)

01:00:27: Vi1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Vi1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:00:27: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

01:00:27: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 MLP: Added first link Se0 to bundle Montecito

01:00:27: Se1 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se1 LCP: O CONFACK [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se0 BNCP: MLP bundle interface is built, process packets now

01:00:27: Se0 BNCP: Redirect packet to Vi1

01:00:27: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

01:00:27: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

01:00:27: Se0 IPCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPCP: Redirect packet to Vi1

01:00:27: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Se0 IPXCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPXCP: Redirect packet to Vi1

01:00:27: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

01:00:27: Se1 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Se1 LCP: State is Open

01:00:27: Se1 PPP: Phase is VIRTUALIZED [0 sess, 4 load]

01:00:27: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

01:00:27: Vi1 BNCP: State is Open

01:00:27: Vi1 MLP: Added link Se1 to bundle Montecito

01:00:27: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPCP: State is Open

01:00:27: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 IPXCP: State is Open

01:00:27: Vi1 IPCP: Install route to 10.1.1.1

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

Goleta#

Goleta#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Goleta#ping ipx

Target IPX address: BEEF.0000.0c31.aac2

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c31.aac2,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

関連情報

- アクセス テクノロジーのサポート

- テクニカル サポートとドキュメント – Cisco Systems