内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

設定

ネットワーク図

設定

確認

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

環境によっては、複数のシリアル リンクを集束して、集約帯域幅の単一リンクとして機能させることが必要になる場合があります。この文書では、バーチャル テンプレート インターフェイスを使用して Cisco 4500 ルータを設定し、4 つのシリアル インターフェイスを束ねる方法を説明します。

この設定は、専用線を介して接続されるルータにも、チャネル サービス ユニット/データ サービス ユニット（CSU/DSU）を備えたルータにも適用できます。 必要に応じて、この設定に機能を追加できます。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- ラボ環境にあり、初期設定の Cisco 4500 ルータ。

- 両方のルータで動作する Cisco IOS® バージョン 12.2(10b)

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

関連製品

この設定は、次のバージョンのハードウェアとソフトウェアにも使用できます。

- それぞれが 4 つのシリアル インターフェイスを備えた任意の 2 つのルータ。

- WIC-1T および WIC-2T シリアル インターフェイスが使用できる。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

設定

この設定は、4500 シリーズのルータで Cisco IOS ソフトウェア リリース 12.2(10b) を使用してテストされています。この設定概念は、この例と同様のルータ トポロジまたは Cisco IOS のその他のリリースにも適用されます。

このドキュメントでは、次に示す設定を使用しています。

RouterA

version 12.2

!

hostname RouterA

!

!

username RouterB password xxx

ip subnet-zero

multilink virtual-template 1

!

interface loopback 0

ip address 192.168.1.1 255.255.255.0

!

interface Virtual-Template1

ip unnumbered loopback0

ppp authentication chap

ppp multilink

!

interface Serial0

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial1

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial2

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial3

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface FastEthernet0

ip address 10.17.1.254 255.255.255.0

!

router rip

network 10.0.0.0

network 192.168.1.0

!

end

RouterB

version 12.2

!

hostname RouterB

!

username RouterA password xxx

ip subnet-zero

multilink virtual-template 1

!

interface loopback 0

ip address 192.168.1.2 255.255.255.0

!

!

interface Virtual-Template1

ip unnumbered loopback0

ppp authentication chap

ppp multilink

!

interface Serial0

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial1

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial2

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Serial3

no ip address

encapsulation ppp

no fair-queue

ppp multilink

pulse-time 3

!

interface Ethernet0

ip address 172.16.1.1 255.255.0.0

!

router rip

network 172.16.0.0

network 192.168.1.0

!

end

上記の設定を実装するため、以下を設定します。

- マルチリンク バーチャルテンプレート

- インターフェイス バーチャルテンプレート

- バンドルが行われる各シリアル インターフェイスにおける PPP マルチリンク

- IP ルーティング プロトコルとしての RIP

Interface loopback 0 は障害が起きないように設定されています。ip unnumbered loopback 0 は同じ IP アドレスでの 5 つより多いシリアル インターフェイスのバンドルを強化します。

すべてのシリアル インターフェイスがアップ状態で、ユーザ トラフィックを送信できる状態では、マルチリンク PPP によりバーチャル アクセス インターフェイスが作成され、PPP ネゴシエーションが行われます。このバーチャル アクセス インターフェイスの設定は、バーチャル テンプレートから複製されます。複数のアップ状態のシリアル インターフェイスがこのバーチャル アクセス インターフェイス内でバンドルされ、集約帯域幅が作成されます。

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show ip route

- show ip rip database

- show ppp multilink

- show interface virtual-access 1

RouterA#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

R  172.16.0.0/16 [120/1] via 192.168.1.2, 00:00:19, Virtual-Access1

10.0.0.0/24 is subnetted, 1 subnets

C  10.17.1.0 is directly connected, FastEthernet0

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C  192.168.1.0/24 is directly connected, Loopback0

C  192.168.1.2/32 is directly connected, Virtual-Access1

RouterA#show ip route connected

10.0.0.0/24 is subnetted, 1 subnets

C       10.17.1.0 is directly connected, FastEthernet0

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C       192.168.1.0/24 is directly connected, Loopback0

C       192.168.1.2/32 is directly connected, Virtual-Access1

RouterB#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C  172.16.0.0/16 is directly connected, Ethernet0

R  10.0.0.0/8 [120/1] via 192.168.1.1, 00:00:18, Virtual-Access1

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C  192.168.1.1/32 is directly connected, Virtual-Access1

C  192.168.1.0/24 is directly connected, Loopback0

RouterB#show ip route connected

C    172.16.0.0/16 is directly connected, Ethernet0

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C       192.168.1.1/32 is directly connected, Virtual-Access1

C       192.168.1.0/24 is directly connected, Loopback0

RouterA#show ip rip database

10.0.0.0/8    auto-summary

10.17.1.0/24    directly connected, FastEthernet0

172.16.0.0/16    auto-summary

172.16.0.0/16

[1] via 192.168.1.2, 00:00:34, Virtual-Access1

192.168.1.0/24    auto-summary

192.168.1.0/24    directly connected, Loopback0

192.168.1.2/32    directly connected, Virtual-Access1

RouterB#show ip rip database

10.0.0.0/8    auto-summary

10.0.0.0/8

[1] via 192.168.1.1, 00:00:13, Virtual-Access

1172.16.0.0/16    auto-summary

172.16.0.0/16    directly connected, Ethernet0

192.168.1.0/24    auto-summary

192.168.1.0/24    directly connected, Loopback0

192.168.1.1/32    directly connected, Virtual-Access1

RouterA#show ppp multilink

Virtual-Access1, bundle name is RouterB

Bundle up for 17:01:59

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0xD3C received sequence, 0x1180 sent sequence

Member links: 4 (max not set, min not set)

Serial0, since 17:01:59, last rcvd seq 000D38

Serial1, since 17:01:50, last rcvd seq 000D39

Serial2, since 17:01:46, last rcvd seq 000D3A

Serial3, since 17:01:41, last rcvd seq 000D3B

RouterB#show ppp multilink

Virtual-Access1, bundle name is RouterA

Bundle up for 12:47:33

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x1186 received sequence, 0xD40 sent sequence

Member links: 4 (max not set, min not set)

Serial0, since 12:47:33, last rcvd seq 001184

Serial1, since 12:47:27, last rcvd seq 001185

Serial2, since 12:47:23, last rcvd seq 001182

Serial3, since 12:47:20, last rcvd seq 001183

RouterA#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (192.168.1.1)

MTU 1500 bytes, BW 6176 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: IPCP

Last input 00:00:00, output never, output hang never

Last clearing of "show interface" counters 17:05:41

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

1711 packets input, 163898 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

2256 packets output, 211897 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

RouterB#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (192.168.1.2)

MTU 1500 bytes, BW 6176 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: IPCP

Last input 00:00:20, output never, output hang never

Last clearing of "show interface" counters 12:54:17

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2256 packets input, 216460 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1714 packets output, 160624 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug ppp negotiation：クライアントが PPP ネゴシエーションを渡しているどうかを確認するためのものです。このコマンドは、アドレス ネゴシエーションをチェックするために使用されます。

- debug ppp authentication - クライアントが認証を渡しているかどうかを確認するためのものです。11.2 より前の Cisco IOS ソフトウェア リリースを使用している場合は、代わりに debug ppp chap コマンドを使用します。

- debug ppp error - PPP の接続ネゴシエーションや動作に関連するプロトコル エラーおよびエラーの統計を表示します。

- debug vtemplate：バーチャル アクセス インターフェイスを形成するために複製されるバーチャル テンプレートを表示するためのものです。

- debug ppp multilink events：PPP マルチリンク イベントのデバッグを表示するためのものです。マルチリンク グループに影響するイベントに関する情報を表示します。

- show ppp multilink：マルチリンク バンドルのメンバーを表示するためのものです。

次の出力は Cisco 4500 ルータから取得したものです。ルータがマルチリンク PPP 接続を確立するところを示しています。

RouterA#debug vtemplate

Virtual Template debugging is on

*Dec  1 17:24:16.519: Vi1 VTEMPLATE: Reuse Vi1, recycle queue size 0

*Dec  1 17:24:16.519: Vi1 VTEMPLATE: Set default settings with ip unnumbered

*Dec  1 17:24:16.539: Vi1 VTEMPLATE: Hardware address 00d0.bbfa.f579

*Dec  1 17:24:16.543: Vi1 VTEMPLATE: Has a new cloneblk vtemplate,

now it has vtemplate

*Dec  1 17:24:16.543: Vi1 VTEMPLATE: ********** CLONE VACCESS1 ***********

*Dec  1 17:24:16.543: Vi1 VTEMPLATE: Clone from Virtual-Template1

interface Virtual-Access1

default ip address

no ip address

encap ppp

ip unnumbered loopback0

end

*Dec 1 17:24:16.595: %LINK-3-UPDOWN:

Interface Virtual-Access1, changed state to up

*Dec 1 17:24:17.515: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Serial0, changed state to up

*Dec 1 17:24:17.595: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Virtual-Access1, changed state to up

RouterA#debug ppp negotiation

PPP protocol negotiation debugging is on

Dec 11 19:39:14.523: %LINK-5-CHANGED: Interface Serial0, changed state to reset

Dec 11 19:39:14.523: Se0 LCP: State is Closed

Dec 11 19:39:14.627: %SYS-5-CONFIG_I: Configured from console by console

Dec 11 19:39:16.523: %LINK-3-UPDOWN: Interface Serial0, changed state to up

Dec 11 19:39:16.523: Se0 PPP: Treating connection as a dedicated line

Dec 11 19:39:16.523: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

Dec 11 19:39:16.523: Se0 LCP: O CONFREQ [Closed] id 25 len 24

Dec 11 19:39:16.523: Se0 LCP:    MagicNumber 0xD4CBA693 (0x0506D4CBA693)

Dec 11 19:39:16.523: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:39:16.523: Se0 LCP:    EndpointDisc 1 RouterA (0x130A01506F6D65726F6C)

Dec 11 19:39:16.535: Se0 LCP: I CONFREQ [REQsent] id 33 len 25

Dec 11 19:39:16.535: Se0 LCP:    MagicNumber 0x03200E36 (0x050603200E36)

Dec 11 19:39:16.535: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:39:16.539: Se0 LCP:    EndpointDisc 1 RouterB (0x130B0150756C6C69676E79)

Dec 11 19:39:16.539: Se0 LCP: O CONFACK [REQsent] id 33 len 25

Dec 11 19:39:16.539: Se0 LCP:    MagicNumber 0x03200E36 (0x050603200E36)

Dec 11 19:39:16.539: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:39:16.539: Se0 LCP:    EndpointDisc 1 RouterB (0x130B0150756C6C69676E79)

Dec 11 19:39:16.539: Se0 LCP: I CONFACK [ACKsent] id 25 len 24

Dec 11 19:39:16.539: Se0 LCP:    MagicNumber 0xD4CBA693 (0x0506D4CBA693)

Dec 11 19:39:16.539: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:39:16.543: Se0 LCP:    EndpointDisc 1 RouterA (0x130A01506F6D65726F6C)

Dec 11 19:39:16.543: Se0 LCP: State is Open

Dec 11 19:39:16.543: Se0 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

Dec 11 19:39:16.555: Vi1 PPP: Phase is DOWN, Setup [0 sess, 1 load]

Dec 11 19:39:16.587: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

Dec 11 19:39:16.587: Vi1 PPP: Treating connection as a dedicated line

Dec 11 19:39:16.587: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

Dec 11 19:39:16.587: Vi1 LCP: O CONFREQ [Closed] id 1 len 29

Dec 11 19:39:16.587: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 11 19:39:16.587: Vi1 LCP:    MagicNumber 0xD4CBA6D4 (0x0506D4CBA6D4)

Dec 11 19:39:16.587: Vi1 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:39:16.587: Vi1 LCP:    EndpointDisc 1 RouterA (0x130A01506F6D65726F6C)

Dec 11 19:39:16.587: Vi1 PPP: Phase is UP [0 sess, 1 load]

Dec 11 19:39:16.591: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 11 19:39:16.591: Vi1 IPCP:    Address 192.168.1.1 (0x0306C0A80101)

Dec 11 19:39:16.591: Vi1 MLP: Added first link Se0 to bundle RouterB

Dec 11 19:39:16.623: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

Dec 11 19:39:16.623: Vi1 IPCP:    Address 192.168.1.2 (0x0306C0A80102)

Dec 11 19:39:16.623: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

Dec 11 19:39:16.623: Vi1 IPCP:    Address 192.168.1.2 (0x0306C0A80102)

Dec 11 19:39:16.623: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

Dec 11 19:39:16.627: Vi1 IPCP:    Address 192.168.1.1 (0x0306C0A80101)

Dec 11 19:39:16.627: Vi1 IPCP: State is Open

Dec 11 19:39:16.627: Vi1 IPCP: Install route to 192.168.1.2

Dec 11 19:39:17.543: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Dec 11 19:39:17.587: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Virtual-Access1, changed state to up

RouterB#debug ppp negotiation

PPP protocol negotiation debugging is on

Dec 11 19:38:08.975: Se0 LCP: I CONFREQ [Closed] id 25 len 24

Dec 11 19:38:08.975: Se0 LCP:    MagicNumber 0xD4CBA693 (0x0506D4CBA693)

Dec 11 19:38:08.975: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:38:08.975: Se0 LCP:    EndpointDisc 1 RouterA (0x130A01506F6D65726F6C)

Dec 11 19:38:08.975: Se0 LCP: Lower layer not up, Fast Starting

Dec 11 19:38:08.975: Se0 PPP: Treating connection as a dedicated line

Dec 11 19:38:08.979: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

Dec 11 19:38:08.979: Se0 LCP: O CONFREQ [Closed] id 33 len 25

Dec 11 19:38:08.979: Se0 LCP:    MagicNumber 0x03200E36 (0x050603200E36)

Dec 11 19:38:08.979: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:38:08.979: Se0 LCP:    EndpointDisc 1 RouterB (0x130B0150756C6C69676E79)

Dec 11 19:38:08.979: Se0 LCP: O CONFACK [REQsent] id 25 len 24

Dec 11 19:38:08.979: Se0 LCP:    MagicNumber 0xD4CBA693 (0x0506D4CBA693)

Dec 11 19:38:08.979: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:38:08.979: Se0 LCP:    EndpointDisc 1 RouterA (0x130A01506F6D65726F6C)

Dec 11 19:38:08.979: %LINK-3-UPDOWN: Interface Serial0, changed state to up

Dec 11 19:38:08.987: Se0 LCP: I CONFACK [ACKsent] id 33 len 25

Dec 11 19:38:08.987: Se0 LCP:    MagicNumber 0x03200E36 (0x050603200E36)

Dec 11 19:38:08.987: Se0 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:38:08.987: Se0 LCP:    EndpointDisc 1 RouterB (0x130B0150756C6C69676E79)

Dec 11 19:38:08.987: Se0 LCP: State is Open

Dec 11 19:38:08.987: Se0 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

Dec 11 19:38:08.999: Vi1 PPP: Phase is DOWN, Setup [0 sess, 1 load]

Dec 11 19:38:09.039: Se0 IPCP: Packet buffered while building MLP bundle interface

Dec 11 19:38:09.043: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

Dec 11 19:38:09.043: Vi1 PPP: Treating connection as a dedicated line

Dec 11 19:38:09.043: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

Dec 11 19:38:09.043: Vi1 LCP: O CONFREQ [Closed] id 1 len 30

Dec 11 19:38:09.043: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 11 19:38:09.043: Vi1 LCP:    MagicNumber 0x03200E78 (0x050603200E78)

Dec 11 19:38:09.043: Vi1 LCP:    MRRU 1524 (0x110405F4)

Dec 11 19:38:09.043: Vi1 LCP:    EndpointDisc 1 RouterB (0x130B0150756C6C69676E79)

Dec 11 19:38:09.043: Vi1 PPP: Phase is UP [0 sess, 1 load]

Dec 11 19:38:09.043: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 11 19:38:09.043: Vi1 IPCP:    Address 192.168.1.2 (0x0306C0A80102)

Dec 11 19:38:09.047: Vi1 MLP: Added first link Se0 to bundle RouterA

Dec 11 19:38:09.047: Vi1 PPP: Pending ncpQ size is 1

Dec 11 19:38:09.047: Se0 IPCP: Redirect packet to Vi1

Dec 11 19:38:09.047: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

Dec 11 19:38:09.047: Vi1 IPCP:    Address 192.168.1.1 (0x0306C0A80101)

Dec 11 19:38:09.047: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

Dec 11 19:38:09.047: Vi1 IPCP:    Address 192.168.1.1 (0x0306C0A80101)

Dec 11 19:38:09.051: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

Dec 11 19:38:09.051: Vi1 IPCP:    Address 192.168.1.2 (0x0306C0A80102)

Dec 11 19:38:09.051: Vi1 IPCP: State is Open

Dec 11 19:38:09.051: Vi1 IPCP: Install route to 192.168.1.1

Dec 11 19:38:09.987: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Dec 11 19:38:10.043: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Virtual-Access1, changed state to up

RouterB#debug ppp multilink events

Multilink events debugging is on

Dec 11 19:41:30.239: %LINK-3-UPDOWN: Interface Serial0, changed state to up

Dec 11 19:41:30.243: Se0 MLP: Request add link to bundle

Dec 11 19:41:30.243: Se0 MLP: Adding link to bundle

Dec 11 19:41:30.255: Vi1 MLP: VP: Clone from Vtemplate 1 block=1

Dec 11 19:41:30.299: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

Dec 11 19:41:30.299: Vi1 MLP: Added first link Se0 to bundle RouterA

Dec 11 19:41:31.243: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Dec 11 19:41:31.243: Se0 MLP: cdp packet forwarded to wrong interface

Dec 11 19:41:31.299: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Virtual-Access1, changed state to up

関連情報

- 呼び出し統計情報の表示

- マルチリンク PPP RFC 1717

- ダイヤラ プロファイルを使用したピア ツー ピア DDR の設定

- テクニカル ティップス：WAN

- テクニカルサポート - Cisco Systems