内容

概要

前提条件

要件

使用するコンポーネント

表記法

PRE のブート シーケンス

RF ライン カードのブート シーケンス

LAN または WAN カードのブート シーケンス

TCC+ カードのブート シーケンス

関連情報

概要

このドキュメントでは、無線周波数（RF）、LAN、WAN、および Timing, Communications, and Control Plus（TCC+）カードへのパフォーマンス ルーティング エンジン（PRE）からの Cisco uBR10000 シリーズ ユニバーサル ブロードバンド ルータのブート シーケンスを示します。

前提条件

要件

このドキュメントの読者は次のトピックについての専門知識を有している必要があります。

- 基本的な Cisco ルータのアーキテクチャ

- Cisco IOS® ソフトウェアのコマンドライン インターフェイス

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco uBR10012 ユニバーサル ブロードバンド ルータ

- uBR10000 シリーズ（UBR10K-P6-M）の Cisco IOS ソフトウェア

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

PRE のブート シーケンス

PRE のブート シーケンスには、次の手順があります。

1. ブート ヘルパーをロードします。

c10k-eboot-mz.120-16.6.ST1

これは、ライン カードをサポートしません。PRE のファスト イーサネット（FE）インターフェイスだけが使用可能です。

2. メイン イメージをロードします。

ubr10k-p6-mz.122-1.XF

ubr10k-k8p6-mz.122-1.XF

次の各タイプのライン カードがファームウェアのために PRE をポーリングします。

- ケーブル ライン カード

- TCC+

- トースター

- ギガビット イーサネット

- オプティカル キャリア 12（OC-12）パワーオン サービシング（PoS）

次の出力は、実際に使用しているブート シーケンスおよびそのログ メッセージを示しています。

System Bootstrap, Version 12.0(9r)SL2, RELEASE SOFTWARE (fc1)

!--- Bootstrap version.

Copyright (c) 2000 by cisco Systems, Inc.

Reset Reason Register = RESET_REASON_RESET_REG (0x76)

!--- Reason for reload: RESET.

C10000 platform with 524288 Kbytes of main memory

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

#####

[OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) 10000 Software (UBR10K-P6-M), Version 12.2(1)XF, EARLY

DEPLOYMENT RELEASE SOFTWARE (fc1)

!--- Main image.

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 18-May-01 16:15 by ccai

Image text-base: 0x60008960, data-base: 0x612E0000

cisco uBR10000 (PRE-RP) processor with 393215K/131072K bytes of memory.

!--- Processor type.

Processor board ID TBA05100542

R7000 CPU at 262Mhz, Implementation 39, Rev 2.1, 256KB L2, 2048KB L3 Cache

Backplane version 1.0, 8 slot

Last reset from register reset

Toaster processor tmc0 is running.

Toaster processor tmc1 is running.

1 Ethernet/IEEE 802.3 interface(s)

1 FastEthernet/IEEE 802.3 interface(s)

509K bytes of non-volatile configuration memory.

46976K bytes of ATA PCMCIA card at slot 0 (Sector size 512 bytes).

32768K bytes of Flash internal SIMM (Sector size 256KB).

00:00:15: Downloading Microcode: file=system:pxf/c10k102-3.ucode,

version=102.3(40.4),

description=Experimental Software created Wed 31-Jan-01 16:22 by clauer

in view clauer-omega_dev

!--- Microcode for Parallel eXpress Forwarding (PXF) engine.

00:00:16: %SYS-7-NV_BLOCK_INIT: Initalized the geometry of nvram

00:00:22: %LINK-3-UPDOWN: Interface Ethernet0/0/0, changed state to up

!--- 10Base2 interface.

00:00:22: %LINK-5-CHANGED: Interface FastEthernet0/0/0, changed state to reset

!--- Management FE interface. !--- Each of these lines of output appear on one line:

00:00:23: %UBR10000-5-USFREQCHG: Interface Cable6/1/0 Port U0,

frequency changed to 34.992 MHz

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U0,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U1,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U2,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U3,

changed state to down

00:00:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0/0,

changed state to up

00:00:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0/0,

changed state to down

00:00:25: %LINK-5-CHANGED: Interface POS2/0/0,

changed state to administratively down

00:00:25: %LINK-5-CHANGED: Interface GigabitEthernet4/0/0,

changed state to administratively down

00:00:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface POS2/0/0,

changed state to down

00:00:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet4/0/0,

changed state to down

00:00:29: !!pxf clients started, forwarding code operational!!

!--- The PFX engine microcode is decompressed and executed.

00:00:30: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) 10000 Software (UBR10K-P6-M), Version 12.2(1)XF, EARLY

DEPLOYMENT RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 18-May-01 16:15 by ccai

00:00:30: %SYS-6-BOOTTIME: Time taken to reboot after reload = 349 seconds

!--- The time taken to boot after the reload initiated.

00:00:31: %LINK-3-UPDOWN: Interface FastEthernet0/0/0,

changed state to up

00:00:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0/0,

changed state to up

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254)

in slot 6/1

!--- RF card registration request received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254)

in slot 7/0

!--- RF card registration request received.

00:00:34: %IPCOIR-5-CARD_LOADING: Loading card in slot 6/1

!--- TFTP is used to transfer the RF card microcode.

00:00:34: %IPCOIR-5-CARD_LOADING: Loading card in slot 7/0

!--- TFTP is used to transfer the RF card microcode.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF)

in slot 1/1

!--- TCC+ registration request received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 1oc12pos-1 (0x164)

in slot 2/0

!--- LAN to WAN registration received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 1gigethernet-1 (0x166)

in slot 4/0

!--- LAN to WAN registration received.

00:00:34: %IPCOIR-2-CARD_UP_DOWN: Card in slot 1/1 is up.

Notifying 2cable-tccplus driver.

00:00:34: %IPCOIR-2-CARD_UP_DOWN: Card in slot 2/0 is up.

Notifying 1oc12pos-1 driver.

00:00:34: %UBR10KTCC-2-ACTIVE_TCC: TCCplus card 1/1 is active

with Local oscillator as clock reference

00:00:35: %IPCOIR-2-CARD_UP_DOWN: Card in slot 4/0 is up.

Notifying 1gigethernet-1 driver.

00:00:35: %C10KGE-6-GBIC_OK: Interface GigabitEthernet4/0/0,

1000BASE-SX Gigabit Interface Converter (GBIC) inserted

RF ライン カードのブート シーケンス

RF ラインカードのブート シーケンスには、次の手順があります。

1. ROM モニタ（ROMmon）がライン カードにブート ヘルパーをロードします。

2. ブート ヘルパーは、ソフトウェア バージョン番号およびカード タイプを送信します。

3. PRE はカード タイプに対応するイメージをダウンロードします。

4. Cisco IOS ソフトウェア イメージが復元され、実行されます。

5. データを PRE に転送できるように、Barium インターフェイスが設定されます。

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 05:12:10.596: IPC: Registration request for seat 'clc_6_1'

!--- The RF line card requests registration with the software version !--- number and the line card type.

*Aug  1 05:12:10.604: IPC: Got an open port request for port 0x10008

*Aug  1 05:12:10.604: IPC: Got an open port request for port 0x10009

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254) in slot 6/1

!--- The card type is detected.

1w1d: %IPCOIR-2-CARD_UP_DOWN: Card in slot 6/1 is up.

Notifying 2cable-mc28 driver.

!--- Microcode for the RF line card.

SLOT 6/1: 00:00:16: %IPCGRP-6-UCODEVER: Reported microcode version, 990227862.

SLOT 6/1: 00:00:16: %IPCGRP-6-INTENBDISAB: Interface disabled

<REMOVED>

!--- The main image is downloaded, decompressed, and executed.

SLOT 6/1: 00:00:19: %IPCGRP-6-BARENBDISAB: Barium interface enabled

!--- Enable Barium interface.

1w1d: %LINK-3-UPDOWN: Interface Cable6/1/1, changed state to up

SLOT 6/1: 00:00:20: %LINK-3-UPDOWN: Interface Cable6/1/1, changed state to up

SLOT 6/1: 00:00:20: %LINK-3-UPDOWN: Interface Barium3/0, changed state to up

!--- The Barium interface is set to up.

1w1d: %LINEPROTO-5-UPDOWN: Line protocol on Interface Cable6/1/1,

changed state to up

1w1d: %LINEPROTO-5-UPDOWN: Line protocol on Interface Cable6/1/0,

changed state to up

SLOT 6/1: 00:00:21: %LINEPROTO-5-UPDOWN: Line protocol on Interface Barium3/0,

changed state to up

!--- The Barium line protocol is up and can now pass data to the PRE.

ブート ヘルパーはキープアライブとしてソフトウェア バージョン番号およびカード タイプを送信し続けます。PRE でマイクロコードがアップグレードされた場合、新しいマイクロコードがダウンロードされ、アップグレードが自動的に行われます。

LAN または WAN カードのブート シーケンス

LAN または WAN カードのブート シーケンスは、次の 3 つの手順に分かれます。

1. ラインカードは、ソフトウェア バージョン番号およびカード タイプを使用して登録を要求します。

2. PRE はカード タイプに対応するイメージをダウンロードします。

3. Cisco IOS ソフトウェア イメージが復元され、実行されます。

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 05:08:01.496: IPC: Registration request for seat

'C10K Line Card slot 2/0'

!--- The LAN or WAN card requests registration with the software !--- version and the card type.

*Aug  1 05:08:01.500: IPC: Got an open port request for port 0x10008

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 1oc12pos-1 (0x164) in slot 2/0

!--- The card type is detected.

1w1d: %IPCOIR-5-CARD_LOADING: Loading card in slot 2/0

!--- TFTP is used to transfer the microcode to the line card.

1w1d: %C10K-5-LC_NOTICE: Slot[2/0] 1oc12pos-1 Image

Downloaded...Booting...

!--- The image is decompressed and the code is executed.

TCC+ カードのブート シーケンス

TCC+ カードのブート シーケンスには、次の手順があります：

1. TCC+ カードでは、ソフトウェア バージョン番号およびカード タイプを使用して登録を要求します。

2. PRE はカード タイプに対応するイメージをダウンロードします。

3. Cisco IOS ソフトウェア イメージが復元され、実行されます

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 07:00:40.751: IPC: Registration request for seat

'C10K Line Card slot 1/1'

!--- The TCC+ card requests registration.

*Aug  1 07:00:40.755: IPC: Got an open port request for port 0x10008

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF) in slot 1/1

!--- The card type is detected.

1w1d: %IPCOIR-5-CARD_LOADING: Loading card in slot 1/1

!--- TFTP is used to transfer the microcode to the TCC+ card.

1w1d: %C10K-5-LC_NOTICE: Slot[1/1] utility-card Image

Downloaded...Booting...

!--- The image is decompressed and the code is executed.

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF) in slot 1/1

1w1d: %IPCOIR-2-CARD_UP_DOWN: Card in slot 1/1 is up.

Notifying 2cable-tccplus driver.

1w1d: %UBR10KTCC-2-ACTIVE_TCC: TCCplus card 1/1 is active

with Local oscillator as clock reference

!--- The card is active and reports its clock source.

関連情報

- ブロードバンド ケーブルに関するサポート ページ

- Cisco uBR10012 ユニバーサル ブロードバンド ルータ

- Cisco uBR10000 シリーズ ユニバーサル ブロードバンド ルータのリリース ノート

- テクニカルサポート - Cisco Systems