内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景理論

設定

ネットワーク図

設定

確認

Catalyst 2948G での show コマンド

Catalyst 2948G-L3 での show コマンド

トラブルシュート

関連情報

概要

このドキュメントでは、Cisco IOS® ソフトウェアが稼働する Catalyst 2948G-L3 スイッチと、CatalystOS が稼働するスイッチ（Catalyst 4000、5000、6000 シリーズ スイッチを含む全モデル）との間での Fast EtherChannel（FEC）と 802.1Q トランキングについて説明し、設定例も紹介しています。

前提条件

要件

802.1Q および ISL によるトランキング カプセル化をサポートする Catalyst スイッチの一覧については、『トランキングを実装するためのシステム要件』を参照してください。

EtherChannel およびトランキングの設定に関しては、いくつかのガイドラインがあります。使用しているスイッチ ソフトウェアのマニュアルを参照してください。たとえば、Catalyst 6500/6000 で CatalystOS（CatOS）ソフトウェア リリース 8.2.x が稼働している場合は、『Catalyst 6500 シリーズ スイッチ ソフトウェア コンフィギュレーション ガイド 8.2』を参照し、「イーサネット VLAN トランクの設定」および「EtherChannel の設定」のセクションにある設定ガイドラインおよび制限事項をすべて確認してください。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- CatOS 7.1.2 がインストールされている Catalyst 2948G（802.1Q のみ）

- Cisco IOS ソフトウェア リリース 12.0(14)W5(20) がインストールされている Catalyst 2948G-L3

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景理論

EtherChannel を使用すると、帯域幅と冗長性が向上します。EtherChannel は、設計が複雑化することなく帯域幅を拡大できる便利な機能です。スパニングツリーは、EtherChannel バンドルをシングル リンクとして扱うため、ループは発生しません。また、ルーティング プロトコルも EtherChannel を共通の IP アドレスを備えたシングルのルーテッド インターフェイスとして扱います。EtherChannel のバンドルにより、最大 1600 Mbps の全二重 FEC（Fast EtherChannel）、または 16 Gbps の Gigabit EtherChannel（GEC）が実現します。 トランキングにより、複数の VLAN からのトラフィックが、2 台のデバイス間のポイントツーポイント リンク上で伝送されます。トランキングには、Inter-Switch Link（ISL; スイッチ間リンク）プロトコル（Cisco 独自のプロトコル）または 802.1Q（IEEE 標準）の 2 つの方法があります。 このドキュメントでは、特に 802.1Q トランキングを取り上げています。

設定

このセクションでは、2948G-L3 と CatOS スイッチ間における 4 ポートの FEC と 802.1Q トランクの設定例を示します。

注：このドキュメントのコマンドに関する詳細については、Command Lookup Tool(登録ユーザ専用)を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- Catalyst 2948G

- Catalyst 2948G-L3

Catalyst 2948G

CatOS (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default

configurations.

............

.......................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Nov 21 2002, 15:24:27

!

#version 7.1(2)

!

!

#system web interface version(s)

set prompt CatOS

!

#test

!

#frame distribution method

set port channel all distribution mac both

!

#ip

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

set interface sl0 down

set interface me1 down

set ip alias default         0.0.0.0

set ip alias cat             10.10.10.2

!

#spantree

#vlan                         <VlanID>

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

!--- Ports 2/1 to 2/4 are assigned to a port channel.

#port channel

set port channel 2/1-4 29

!

#multicast filter

set igmp filter disable

!

#module 1 : 0-port Switching Supervisor

!

!--- The trunking mode is specified as 802.1Q, because it !--- is the only encapsulation that is supported on the !--- 2948G. The mode is set to nonegotiate, because the !--- 2948G-L3 does not support Dynamic Trunking Protocol (DTP).

#module 2 : 50-port 10/100/1000 Ethernet

set trunk 2/1  nonegotiate 802.1Q 1-1005

set trunk 2/2  nonegotiate 802.1Q 1-1005

set trunk 2/3  nonegotiate 802.1Q 1-1005

set trunk 2/4  nonegotiate 802.1Q 1-1005

!--- The channel mode is set to on, because 2948G-L3 !--- does not support Port Aggregation Protocol (PAgP).

set port channel 2/1-4 mode on

end

Catalyst 2948G-L3

2948G-L3# show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

enable secret 5 $1$bNvR$33puy1WCyrdKMvlnj61Js.

!

ip subnet-zero

!

!

!--- The logical port-channel interface must be created !--- before you put the physical interfaces into the !--- channel group.interface port-channel1.

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Specify the native VLAN: VLAN 1 in this example, !--- which is the default. For performance and security !--- reasons, it is recommended that you keep the user !--- traffic off of the native or management VLAN.

interface Port-channel1.1

encapsulation 802.1Q 1 native

ip address 10.10.10.2 255.255.255.0

no ip redirects

no ip directed-broadcast

!

interface Port-channel1.2

encapsulation 802.1Q 2

ip address 10.10.11.2 255.255.255.0

no ip directed-broadcast

!

!--- Specify all of the physical ports that are part !--- of the logical port channel interface.

interface FastEthernet1

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet4

no ip address

no ip directed-broadcast

channel-group 1

!

!--- Output suppressed.

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

確認

このセクションでは、設定が正常に動作しているかどうかを確認するための情報について説明します。

Catalyst 2948G での show コマンド

- show port channel：EtherChannel 情報を表示します。また、ロード バランシングまたはフレーム分配方式、ポート、およびポートチャネル情報も表示します。

!--- Verify that the port channel is UP (connected, on) and that !--- all the physical ports are members (channel ID).

CatOS (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      29   801

2/2  connected  on                      29   801

2/3  connected  on                      29   801

2/4  connected  on                      29   801

Port  Device-ID                       Port-ID                Platform

----- ------------------------------- ---------------------- --------------

2/1  2948G-L3                        FastEthernet1          cisco Cat2948G

2/2   Not directly connected to switch

2/3  2948G-L3                        FastEthernet3          cisco Cat2948G

2/4  2948G-L3                        FastEthernet4          cisco Cat2948G

注：ポート2/2がスイッチに直接接続されていない場合は、通常の動作です。ルータに接続されているスイッチでの show port channel コマンドの出力は、通常はこの例のようになります。ルータは PAgP（チャネルのネゴシエーションに使用）に参加せず、チャネリングが on であるため、このポートでは Cisco Discovery Protocol（CDP）データを使用して FEC ネイバー情報が表示されます。Cisco IOS ソフトウェアにより、CDP パケットがチャネル インターフェイスと物理インターフェイスの両方で送出されます。Catalyst ポートのいずれかが複数の CDP 近隣ルータを検出し、not directly connected to switch を報告します。これは外観上の問題です。詳細は、Cisco Bug ID CSCdp04017（登録ユーザ専用）を参照してください。一部ツールについては、ゲスト登録のお客様にはアクセスできない場合がありますことを、ご了承ください。

- show port channel statistics：ポート チャネルの管理グループを表示し、PAgP がポート チャネルで使用されているかどうかを表示します。

これらのリンクで PAgP が使用されていないことを確認します。

CatOS (enable) show port channel status

Port  Admin   PAgP Pkts   PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts

Group   Transmitted Received  InFlush   RetnFlush OutFlush  InError

----- ------- ----------- --------- --------- --------- --------- ---------

2/1       29           0         0         0         0         0         0

2/2       29           0         0         0         0         0         0

2/3       29           0         0         0         0         0         0

2/4       29           0         0         0         0         0         0

- show trunk：トランキング モード、カプセル化、およびネイティブ VLAN を表示します。

物理インターフェイスとポート チャネル インターフェイスでトランキングが有効であることを確認します。また、トランキング モードが nonegotiate に正しく設定されていることを確認します。

注：802.1Qトランクでは、ネイティブVLANが両側で一致している必要があります。

CatOS (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      nonegotiate  802.1Q          trunking      1

2/2      nonegotiate  802.1Q          trunking      1

2/3      nonegotiate  802.1Q          trunking      1

2/4      nonegotiate  802.1Q          trunking      1

Port      Vlans allowed on trunk

--------  -----------------------------------------------------------------

2/1      1-1005

2/2      1-1005

2/3      1-1005

2/4      1-1005

Port      Vlans allowed and active in management domain

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Catalyst 2948G-L3 での show コマンド

- show interfaces port-channel 1：ポート チャネルの状態と、ポート チャネル グループのメンバになっているポートを表示します。

EtherChannel の一部になっているすべての物理インターフェイスがメンバとして表示されることを確認します。

2948G-L3# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0008.a308.1c07 (bia 0000.0000.0000)

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 4

Member 0 : FastEthernet2

Member 1 : FastEthernet1

Member 2 : FastEthernet4

Member 3 : FastEthernet3

Last input 00:00:00, output 00:00:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596128 packets input, 50714549 bytes, 0 no buffer

Received 7 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

44294 packets output, 17498215 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

- show cdp neighbor：CDP で検出された、直接接続されている Cisco デバイスをすべて表示します。

反対側にあるスイッチをすべての物理ポートから確認できることを確かめます。

2948G-L3# show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

JAB032400H2      Port-channel1.1    126         T S       WS-C2948  2/3

JAB032400H2      Port-channel1.1    124         T S       WS-C2948  2/4

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/1

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/2

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- CatOS スイッチと外部ルータ間の ISL および 802.1q トランキングの設定（インター VLAN ルーティング）

- Catalyst 2948G-L3 設定例：単一 VLAN、複数 VLAN、およびネットワーク コアに接続する複数 VLAN ディストリビューション レイヤ

- Catalyst 2948G-L3/4908G-L3 シリーズ スイッチのハードウェア トラブルシューティング

- LAN 製品に関するサポート ページ

- LAN スイッチング テクノロジーに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems