内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

移行プロセス

ハードウェアおよびソフトウェアのサポート

移行パス

移行の概要

移行プロセス手順

関連情報

概要

このドキュメントでは、スタンドアロン Cisco Catalyst 6500 シリーズ スイッチの Cisco Catalyst 6500 Virtual Switching System への移行のための手順に関する情報を提供します。

注：このドキュメントでは、移行に必要な一般的な手順について説明します。厳密な手順は現状のスイッチ設定に基づくため、説明されている手順とは若干異なる可能性があります。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Virtual Switching System（VSS）の概念に関する知識。詳細は、『Virtual Switching System について』を参照してください。

使用するコンポーネント

このドキュメントの情報は、Cisco IOS® ソフトウェア リリース 12.2(33)SXH1 以降が稼働する Supervisor VS-S720-10G-3C/XL が搭載された Cisco Catalyst 6500 シリーズ スイッチに基づくものです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

Virtual Switching System（VSS）は、単一の論理エンティティへの 2 台の物理的なシャーシのクラスタ処理を効果的に実現する、Cisco Catalyst 6500 シリーズ スイッチの革新的な新機能です。このテクノロジーによって、ハイ アベイラビリティ、スケーラビリティまたはパフォーマンス、管理、および保守など、企業キャンパスとデータセンター展開の全領域における新たな拡張が可能になります。

VSS の現行の実装を使用すると、2 台の物理的な Cisco Catalyst 6500 シリーズ スイッチを、論理的に管理された単一のエンティティへ統合することができます。次の図は、VSS が有効になると、2 台の 6509 シャーシを単一の 18 スロット シャーシとして管理することが可能になる場合の概念を図示しています。

移行プロセス

ハードウェアおよびソフトウェアのサポート

VSS は Cisco Catalyst 6500 シリーズ スイッチでのみ使用可能なソフトウェア機能です。この機能をイネーブルにして設定するには、次が必要です。

ハードウェア

VS-S720-10G-3C/XL

[ソフトウェア（Software）]

Cisco IOS ソフトウェア リリース 12.2(33)SXH1 以降

Cisco Virtual Switching System でサポートされるシャーシ

モデル番号

説明

WS-C6503-E

E シリーズ 3 スロット シャーシ

WS-C6504-E

E シリーズ 4 スロット シャーシ

WS-C6506

6 スロット シャーシ

WS-C6506-E

E シリーズ 6 スロット シャーシ

WS-C6509

9 スロット シャーシ

WS-C6509-E

E シリーズ 9 スロット シャーシ

WS-C6509-NEB-A

9 スロット縦型 Network Equipment Building Standards（NEBS）シャーシ

WS-C6509-V-E

E シリーズ 9 スロット縦型シャーシ

WS-C6513

13 スロット シャーシ

この表に、Cisco Virtual Switching System の初期リリースでサポートされるシャーシの全リストを示します。詳細については、『Cisco Catalyst 6500 Series Virtual Switching System（VSS）1440』を参照してください。

移行パス

この表では、可能な VSS への移行パスの一部を説明しています。このリストは提案に過ぎず、すべてを網羅しているわけではありません。

初期設定

アップグレードが必要

最終設定

WS-SUP720-3B スーパーバイザ搭載の 2 台の Cisco Catalyst 6500 シリーズ スイッチ

ハードウェア アップグレード - スーパーバイザ VS-S720-10G-3C/XL ソフトウェア アップグレード - Cisco IOS 12.2(33)SXH1 以降

VSS

VS-S720-10G-3C/XL スーパーバイザ搭載の 2 台の Cisco Catalyst 6500 シリーズ スイッチ

ソフトウェア アップグレード：Cisco IOS 12.2(33)SXH1 以降

VSS

移行の概要

スタンドアロン環境での一般的な構成

レイヤ 3（L3）コアと L2/L3 ディストリビューションの間で実行される機能またはプロトコル：

- IP ルーティング プロトコル

- L3 ポート チャネルまたは IP ルーティングの等コスト マルチパス機能

L2/L3 ディストリビューションとアクセス レイヤの間で実行される機能またはプロトコル：

- スパニング ツリー プロトコル

- First Hop Routing Protocol（FHRP）

- ポリシー:QoS、ACL

- L2 トランク、VLAN、ポート チャネル

VSS への移行

これは段階的なプロセスで、このセクションでは各段階について説明しています。

コアとディストリビューション レイヤの間の移行手順：

- MultiChassis EtherChannel（MEC）の設定

- IP ルーティング設定の修正と不要になったコマンドの削除

ディストリビューションとアクセス レイヤの間の移行手順：

- MEC の設定

- スパニング ツリー プロトコルのイネーブル状態の維持

- FHRP コマンドの修正

- QoS と ACL のポリシーの MEC への移行（必要な場合）

- L2 トランク設定の MEC への移行

移行プロセス手順

次のステップを実行します。

1. 初期スタンドアロン設定では、一般的には、VLAN ロード シェアリングと HSRP 設定を使用して、トラフィックがディストリビューション スイッチ間でロード バランスされています。

2. HSRP と STP の設定を修正し、Distribution-1 がすべてのフローに対してアクティブで、隣接デバイスによってこの変更が検出され、すべてのトラフィックが Distribution-1 に送信されるようにします。

3. Distribution-2 の物理インターフェイスをシャットダウンして、ネットワークから切り離します。

.

Distribution-2 が完全にネットワークから削除されたら、本稼働トラフィックを中断することなく VSS モードへ変換することができます。

4. またインストールしていない場合は、新しいスーパーバイザ（VS-SUP720-10G）をインストールして、ステータスを確認します。

Distribution-2#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

5    5  Supervisor Engine 720 10GE (Active)    VS-S720-10G        SAD104707BB

9   48  CEF 720 48 port 10/100/1000mb Ethernet WS-X6748-GE-TX     SAL1020NGY3

5. VSS 互換の Cisco IOS ソフトウェアを sup-bootdisk: にコピーします。

Distribution-2#copy ftp: sup-bootdisk:

Address or name of remote host []? 172.16.85.150

Source filename []? s72033-ipservices_wan_vz.122-33.SXH1.bin

Destination filename [s72033-ipservices_wan_vz.122-33.SXH1.bin]?

Accessing ftp://172.16.85.150/s72033-ipservices_wan_vz.122-33.SXH1.bin...

6. bootvar を更新して、sup-bootdisk: にコピーされた Cisco IOS ソフトウェアをロードします。

Distribution-2(config)#boot system flash sup-bootdisk:s72033-ipservices_wan_vz.122-33.SXH1.bin

7. Distribution-2 スイッチを VSS モードで稼働させるには、Virtual Switch Link（VSL）が必要です。VSL を形成するには、Distribution-1 と Distribution-2 の間の現行のポート チャネル リンクを使用できます。

8. 仮想スイッチのアトリビュートを次のように設定します。

1. Virtual Switch Domain Number（ネットワーク内部で一意）

2. Virtual Switch Number（ドメイン内部で一意）

3. 仮想スイッチリンク（VSL）

Distribution-2(config)#hostname VSS

VSS(config)#switch virtual domain 100

VSS(config-vs-domain)#switch 1

!--- After conversion Distribution-2 will be noted !--- as Switch 1 in VSS mode.

VSS(config-vs-domain)# exit

VSS(config)#interface port-channel 1

VSS(config-if)#switch virtual link 1

VSS(config-if)#interface TenG 5/4

VSS(config-if)#channel-group 1 mode on

VSS(config-if)#interface TenG 5/5

VSS(config-if)#channel-group 1 mode on

VSS(config-if)# ^Z

VSS#

9. Distribution-2 スイッチを VSS モードに変換します。

注：スイッチのコンソールから次のコマンドを発行します。

VSS#switch convert mode virtual

This command will convert all interface

names to naming convention "interface-type

switch-number/slot/port",

save the running config to startup-config and

reload the switch.

Do you want to proceed? [yes/no]: yes

Converting interface names

Building configuration...

!--- At this point the switch will reboot

!--- snippet of the console output

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 1/5/4 is member of

PortChannel 1

Interface TenGigabitEthernet 1/5/5 is member of

PortChannel 1

!--- snippet of the console output

00:00:23: %PFREDUN-6-ACTIVE: Initializing as ACTIVE

processor for this switch

!--- snippet of the console output

00:00:28: %VSL_BRINGUP-6-MODULE_UP: VSL module in slot 5

switch 1 brought up

Initializing as Virtual Switch Active

10. Distribution-2 スイッチの VSS モードへの変換を確認します。

VSS#show switch virtual role

Switch  Switch Status  Preempt    Priority   Role     Session ID

Number         Oper(Conf) Oper(Conf)          Local  Remote

-------------------------------------------------------------------

LOCAL    1     UP      FALSE(N)    110(110)  ACTIVE    0      0

In dual-active recovery mode: No

Distribution-2 スイッチが正常に変換され、VSS モードで動作しています。Distribution-1 の変換後、事前設定された手順も実行できます。ただし、事前設定は移行中のパケット損失量の削減に役立ちます。

11. 次の手順を実行して、VSS Switch 1 を事前設定します。

1. Switch-1 のローカル インターフェイスを使用して MEC を設定します。Switch-2（現在の Distribution-1）のインターフェイスを VSS モードへの変換後に MEC に追加できます。

- MEC を設定します。

- インターフェイス設定を MEC へ移行します。

- QoS と ACL のポリシーを MEC へ移行します。

初期設定

interface TenGigabitEthernet1/2/1

ip address 192.168.4.2 255.255.255.0

interface GigabitEthernet1/1/2

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 10,20

設定の変更

!--- MEC to Core layer

VSS(config)# int ten 1/2/1

VSS(config-if)# no ip address

VSS(config-if)# interface po20

VSS(config-if)# ip address 192.168.4.2 255.255.255.0

VSS(config-if)# no shut

VSS(config-if)# interface ten1/2/1

VSS(config-if)# channel-group 20 mode desirable

!--- MEC to Access layer

VSS(config-if)# interface po10

VSS(config-if)# switchport

VSS(config-if)# switchport trunk encapsulation dot1q

VSS(config-if)# switchport trunk allowed vlan 10,20

VSS(config-if)# no shut

VSS(config-if)# interface gig1/1/2

VSS(config-if)# switchport

VSS(config-if)# channel-group 10 mode desirable

ポート チャネルに対応するための隣接デバイスの設定

VSS Switch-1 とその隣接デバイスの間の接続は、この時点でダウンしています。したがって、ポート チャネルは Distribution-1 を通過するトラフィック フローに干渉せずに設定されます。

!--- In Core layer devices

Core(config)# int gig 1/1

Core(config-if)# no ip address

Core(config-if)# int po20

Core(config-if)# ip address 192.168.4.1 255.255.255.0

Core(config-if)# no shut

Core(config-if)# int gig 1/1

Core(config-if)# channel-group 20 mode desirable

!--- In Access layer devices

Access(config)# int po10

Access(config-if)# switchport

Access(config-if)# switchport trunk encapsulation dot1q

Access(config-if)# switchport trunk

Access(config-if)# no shut

Access(config-if)# int gig 1/1

Access(config-if)# channel-group 10 mode desirable

2. VSS では、アクティブ側とスタンバイ側のどちらのシャーシによっても、アクティブ側のシャーシに焼き付けられた MAC アドレスと VLAN IP アドレスが使用されます。HSRP は不要になります。

- HSRP 仮想 IP アドレスを VLAN インターフェイスに移行します。

- VLAN インターフェイスから HSRP 設定を削除します。

初期設定

interface Vlan10

ip address 10.1.1.2 255.255.255.0

standby 10 ip 10.1.1.1

standby 10 priority 110

!

interface Vlan20

ip address 20.1.1.2 255.255.255.0

standby 20 ip 20.1.1.1

standby 20 priority 110

!

設定の変更

VSS(config)# interface Vlan10

VSS(config-if)# no standby 10 ip 10.1.1.1

VSS(config-if)# no standby 10 priority 110

VSS(config-if)# ip address 10.1.1.1 255.255.255.0

VSS(config-if)# interface Vlan20

VSS(config-if)# no standby 20 ip 20.1.1.1

VSS(config-if)# no standby 20 priority 110

VSS(config-if)# ip address 20.1.1.1 255.255.255.0

注：エンドデバイスは、引き続きARPエントリを初期HSRP MACアドレスにポイントします。これらのエントリにタイム アウトが発生するか、別の ARP がキャッシュをアップデートするために送信されるまで、接続の一部が失われます。

3. 使用される IP ルーティング プロトコルに NSF-SSO 機能をイネーブルにします。VSS ではルーティング設定が簡素化されるため、一部の network 設定文が不要になります。したがって、これらを削除できます。

VSS Switch-1

VSS#show running-config | begin ospf

router ospf 1

log-adjacency-changes

network 10.1.1.0 0.0.0.255 area 0

network 20.1.1.0 0.0.0.255 area 0

network 192.168.4.0 0.0.0.255 area 0

network 192.168.5.0 0.0.0.255 area 0

!--- rest of output elided

!--- Previous L3 interfaces are merged as MEC, hence some routing statements are no longer required.

VSS(config)# router ospf 1

VSS(config-router)# nsf

VSS(config-router)# no network 192.168.5.0 0.0.0.255 area 0

コア

Core#show running-config | begin ospf

router ospf 1

log-adjacency-changes

network 192.168.4.0 0.0.0.255 area 0

network 192.168.5.0 0.0.0.255 area 0

!--- rest of output elided

!--- Previous L3 interfaces are merged as MEC, hence some routing statements are no longer required.

Core(config)# router ospf 1

Core(config-router)# nsf

Core(config-router)# no network 192.168.5.0 0.0.0.255 area 0

4. STP 設定を修正して、VSS Switch-1 がすべての VLAN のルート(root)になるようにします。

12. VSS Switch-1 設定と接続を確認します。

- VSS Switch-1 インターフェイスをイネーブルにします。

- アクセス レイヤ デバイスへの L2 接続を確認します。

- コア レイヤ デバイスへの L3 接続を確認します。

13. VSS Switch-1 接続の確認後、Distribution-1 のインターフェイスをシャットダウンし、トラフィックを VSS にスイッチングします。

14. Distribution-1 スイッチ上で変換手順を繰り返し、優先する VSS スタンバイ モードにします。

Distribution-1(config)#hostname VSS

VSS(config)#switch virtual domain 100

VSS(config-vs-domain)#switch 2

!--- After conversion Distribution-1 will be noted !--- as Switch 2 in VSS mode.

VSS(config-vs-domain)# exit

VSS(config)#interface port-channel 2

VSS(config-if)#switch virtual link 2

VSS(config-if)#interface TenG 5/4

VSS(config-if)#channel-group 2 mode on

VSS(config-if)#interface TenG 5/5

VSS(config-if)#channel-group 2 mode on

VSS(config-if)# ^Z

VSS#

VSS#switch convert mode virtual

This command will convert all interface

names to naming convention "interface-type

switch-number/slot/port",

save the running config to startup-config and

reload the switch.

Do you want to proceed? [yes/no]: yes

Converting interface names

Building configuration...

!--- At this point the switch will reboot

!--- snippet of the console output

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 2/5/4 is member of

PortChannel 2

Interface TenGigabitEthernet 2/5/5 is member of

PortChannel 2

!--- snippet of the console output

00:00:23: %PFREDUN-6-ACTIVE: Initializing as ACTIVE

processor for this switch

!--- snippet of the console output

00:00:28: %VSL_BRINGUP-6-MODULE_UP: VSL module in slot 5

switch 2 brought up

Initializing as Virtual Switch Standby

15. VSS スタンバイ スイッチのブートアップ後、VSS アクティブ設定が自動的に VSS スタンバイへ同期されます。ブートアップ時、VSS スタンバイ（Switch-2）のインターフェイスはシャットダウン状態になります。

16. 仮想スイッチの設定を完了します。

注：この最後の重要な手順は、初回の変換にのみ適用されます。スイッチの変換を行った後や、すでに部分的な変換を行った後には、このコマンドは使用できません。スイッチが変換または部分的に変換された場合は、エラー メッセージが生成されます。

11:27:30: %PM-SP-4-ERR_DISABLE: channel-misconfig error detected

on Po110, putting Gi9/2 in err-disable state

このコマンドを発行して、アクティブ仮想スイッチ上で自動的にスタンバイ仮想スイッチ設定を構成することができます。

VSS#switch accept mode virtual

This command will bring in all VSL configurations from the standby

switch and populate it into the running configuration.

In addition the startup configurations will be updated with the

new merged configurations.

Do you want proceed? [yes/no]: yes

Merging the standby VSL configuration. . .

Building configuration...

注：設定が自動的にマージされると、Cisco IOSソフトウェアリリース12.2 SXIではswitch accept mode virtualコマンドは不要になります。

17. Switch-2 インターフェイスを MEC へ追加します。

- VSS

!--- To Core layer

VSS(config)# interface range tengig 1/2/1, tengig2/2/1

VSS(config-if-range)# channel-group 20 mode desirable

VSS(config-if-range)# no shut

!--- To Access layer

VSS(config)# interface range gig 1/1/2, gig 2/1/2

VSS(config-if-range)# switchport

VSS(config-if-range)# channel-group 10 mode desirable

VSS(config-if-range)# no shut

- VSS ネイバー：コア
Core(config)# interface range gig 1/1, gig 1/2

Core(config-if-range)# channel-group 20 mode desirable

Core(config-if-range)# no shut

- VSS ネイバー：アクセス
Access(config)# interface range gig 1/1, gig 1/2

Access(config-if-range)# channel-group 10 mode desirable

Access(config-if-range)# no shut

VSS への移行が完了しました。この時点で、VSS のどちらのスイッチも稼働し、トラフィックはすべてのアップリンク インターフェイスでロード バランスされています。

関連情報

- Virtual Switching System の設定

- Cisco IOS 仮想スイッチ コマンド リファレンス

- Cisco Catalyst 6500 Virtual Switching System 1440 製品に関するサポート ページ

- スイッチ製品に関するサポート ページ

- LAN スイッチング テクノロジーに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems