内容

概要

前提条件

要件

使用するコンポーネント

表記法

ネットワーク図

全般設定タスク

VLAN 間ルーティングの設定

全般的な問題：VLANインターフェイスがdown/downと表示される

設定を検証する

付録

スーパーバイザエンジンモジュールの設定

RSMの設定

関連情報

概要

このドキュメントでは、内部ルータ（レイヤ 3（L3）カード/モジュール）を使用して、Catalyst スイッチ（Catalyst OS（CatOS）システム ソフトウェアが動作）上で VLAN 間ルーティングを設定する方法に関する基本情報を提供します。 ターム内部ルータは、Catalyst 5500/5000 と 6500/6000 スイッチ上で次の L3 カード/モジュールを参照します。

- Catalyst 6500/6000シリーズスイッチのマルチレイヤスイッチフィーチャカード(MSFC)

- Catalyst 6500/6000シリーズスイッチのMSFC2

- Catalyst 5500/5000シリーズスイッチのルートスイッチフィーチャカード(RSFC)

- Catalyst 5500/5000シリーズスイッチのルートスイッチモジュール(RSM)

このドキュメントでは、サポートされているL3カードを搭載したCatOSが稼働するCatalyst 5500/5000またはCatalyst 6500/6000シリーズスイッチを使用して、同じ結果を得ることができます。

前提条件

要件

このドキュメントの読者は次のトピックについての専門知識を有している必要があります。

注：このドキュメントでは、L3サービスモジュール(WS-X4232-L3)を使用してCatalyst 4500/4000スイッチでインターVLANルーティングを設定する方法については説明しません。 詳細については、次のドキュメントを参照してください。

- 『Catalyst 4000レイヤ3サービスモジュールのインストールと設定ノート』の「インターVLANルーティング用モジュールの設定」セクション

- Catalyst 4000 ファミリ用ルータ モジュール（WS-X4232-L3）の設定と概要

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- RSMを搭載したCatalyst 5500スイッチ

- CatOS 6.1(1)ソフトウェアが稼働するスーパーバイザエンジンモジュール(WS-X5530)

- Cisco IOS®ソフトウェアリリース12.0(5)W5(12)が稼働するRSM(WS-X5302)

各デバイスがデフォルト設定になっていることを保証するため、すべてのデバイスで clear config all コマンドと write erase コマンドを発行して設定をクリアしてあります。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

ネットワーク図

注：このドキュメントで要求されない限り、workstation1とworkstation2を接続しないでください。このドキュメントでは、ルータモジュールでVLAN間ルーティングまたは複数のVLANインターフェイスを設定するときに報告される一般的な問題について説明します。一般的な問題を参照してください。VLANインターフェイスのダウン/ダウンセクションを参照してください。

全般設定タスク

このセクションでは、このドキュメントで実行される主な設定作業の概要を示します。

- 管理用スイッチの設定

- スイッチでのVLANの作成

- 設定されたVLANへのポートの追加

- 管理用に内部ルータを設定する

- VLAN 間ルーティングの設定

- 設定を検証する

VLAN 間ルーティングの設定

CatalystスイッチでインターVLANルーティングを設定するには、次の手順を実行します。

1. スーパーバイザエンジンのコンソールポートにアクセスします。

コンソールへのアクセスが困難な場合は、次のドキュメントを参照してください。

- Catalyst 5500/5000シリーズスイッチの場合：Catalystスイッチのコンソールポートへの端末の接続。

- Catalyst 6500/6000シリーズスイッチの場合：Catalystスイッチのコンソールポートに端末を接続する方法とCatalystスイッチのコンソールポートにモデムを接続する方法の項

2. ステップ 2 基本的な管理用のスイッチを設定してください。

Catalystスイッチを管理用に設定するには、次のコマンドセットを使用します。

Console> enable) set system name Cat5500

!--- Configure the system name.

System name set.

Cat5500> (enable) set interface sc0 172.16.80.40 255.255.255.0

!--- Configure the IP address.

Interface sc0 IP address and netmask set.

Cat5500> (enable) set ip route 0.0.0.0 172.16.80.1

!--- Configure the default gateway.

注：ルータの反対側にあるスイッチを管理する場合は、スイッチのデフォルトゲートウェイを設定する必要があります。これは、スイッチがIPルーティングに参加しておらず、ネットワークのL3トポロジを認識していないためです。また、 set ip route 0.0.0.0 172.16.80.1 コマンドを使用する代わりに、デフォルトのゲートウェイを設定するために set ip route default 172.16.80.1 コマンドを使用することができます。

3. スイッチで必要な数のVLANを設定します。

「ネットワーク図」に従って、スイッチに2つの新しいVLAN（VLAN 10およびVLAN 20）を設定する必要があります。

新しいVLANを作成する前に、スイッチをVLAN Trunk Protocol(VTP)サーバモードまたはVTPトランスペアレントモードにする必要があります。スイッチが VTP サーバの場合は、VLAN を追加する前に VTP ドメイン名を定義する必要があります。これは、ネットワーク内のスイッチの数（1つまたは複数）に関係なく、また、VTPを使用してネットワーク内の他のスイッチにVLANを伝播しているかどうかに関係なく定義する必要があります。VTPの詳細については、次のドキュメントを参照してください。

- VLAN トランク プロトコル（VTP）の説明と設定

スイッチのデフォルトのVTP設定は次のとおりです。

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           server      -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

set vtp コマンドを使用して、ドメイン名とモードを設定します。

Cat5500> (enable) set vtp domain mode transparent

VTP domain  modified

!--- Set the VTP mode.

Cat5500> (enable) set vtp domain cisco

VTP domain cisco modified

!--- Set the VTP domain name.

注：  この例では、VTPモードは透過に設定されています。ネットワークに応じて、VTP モードを設定してください。トランスペアレントモードは、他のスイッチによる影響を避け、ラボ内の他のスイッチへの影響を避けるために選択されました。

4. ステップ 4 show vtp domain コマンドを発行して VTP 設定を確認します。

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

cisco                            1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

5. スイッチにVLANを作成します。

デフォルトでは、スイッチ上には、VLAN 1 という名前の VLAN が１つしかありません。また VLAN 1 はデフォルト VLAN と呼ばれます。デフォルトではすべてのポートがこの VLAN に属します。この VLAN を改名または削除することはできません。

VLAN を作成するために、set vlan コマンドを使用します。

Cat5500> (enable) set vlan

Usage: set vlan  <mod/port>

(An example of mod/port is 1/1,2/1-12,3/1-2,4/1-12)

set vlan  [name ] [type ] [state ]

[said ] [mtu ] [ring ]

[decring ]

[bridge ] [parent ]

[mode ] [stp ]

[translation ] [backupcrf <off/on>

[aremaxhop ] [stemaxhop ]

(name = 1..32 characters, state = (active, suspend)

type = (ethernet, fddi, fddinet, trcrf, trbrf)

said = 1..4294967294, mtu = 576..18190

hex_ring_number = 0x1..0xfff, decimal_ring_number = 1..4095

bridge_number = 0x1..0xf, parent = 2..1005, mode = (srt, srb)

stp = (ieee, ibm, auto), translation = 1..1005

hopcount = 1..13)

Set vlan commands:

----------------------------------------------------------------------------

set vlan                     Set vlan information

set vlan mapping             Map an 802.1Q vlan to an Ethernet vlan

set vlan                     Vlan number(s)

Cat5500> (enable) set vlan 10

!--- Create VLAN 10.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 10 configuration successful

Cat5500> (enable) set vlan 20

!--- Create VLAN 20.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 20 configuration successful

Cat5500> (enable) set vlan 10 4/1-12

!--- Add ports to VLAN 10.

VLAN 10 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

10    4/1-12

Cat5500> (enable) set vlan 20 4/13-20

!--- Add ports to VLAN 20.

VLAN 20 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

20    4/13-20

Cat5500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    443     1/1-2

3/1-3

4/21-24

11/1-48

12/1-2

10   VLAN0010                         active    448     4/1-12

20   VLAN0020                         active    449     4/13-20

1002 fddi-default                     active    444

1003 token-ring-default               active    447

1004 fddinet-default                  active    445

1005 trnet-default                    active    446

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1    enet  100001     1500  -      -      -      -    -        0      0

10   enet  100010     1500  -      -      -      -    -        0      0

20   enet  100020     1500  -      -      -      -    -        0      0

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

1004 fdnet 101004     1500  -      -      -      -    -        0      0

1005 trbrf 101005     1500  -      -      -      ibm  -        0      0

!--- Output suppressed.

6. ワークステーションまたはサーバに接続するポートにスパニングツリープロトコル(STP)PortFastを設定します。

次のコマンドを発行して、STP ポートファスト機能を有効にします。

Cat5500> (enable) set spantree portfast 4/1-20 enable

Warning: Spantree port fast start should only be enabled on ports connected to a

single host. Connecting

hubs, concentrators, switches, bridges, etc. to a fast start port can cause

temporary spanning tree loops.

Use with caution.

Spantree ports 4/1-20 fast start enabled.

注：この手順はオプションですが、通常のワークステーションまたはサーバに接続するポートでSTP PortFastを有効にすることをお勧めします。PortFastを有効にする理由の詳細については、次のドキュメントを参照してください。

- PortFast と他のコマンドを使用したワークステーションの接続始動遅延の修復

7. トラフィックをルーティングするVLANごとに、ルータモジュールにVLANインターフェイスを設定します。

session module#コマンドを発行してルータモジュールにアクセスします。ここで、module#はルータモジュールが配置されているスロットです。この例では、次に示すように、RSMはスロット7にあります。

Cat5500> (enable) show module 7

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

7   7    1     Route Switch              WS-X5302            no  ok

Mod Module-Name         Serial-Num

--- ------------------- --------------------

7                       00006591991

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

7   00-e0-1e-91-b5-08 to 00-e0-1e-91-b5-09 4.5    20.20      12.0(5)W5(12)

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

Router>

8. ステップ 8 ルータ モジュールの enable と Telnet のためのパスワードを設定します。

ここでも、この手順はオプションですが、スーパーバイザエンジンを経由せずにTelnetを使用してルータモジュールに直接アクセスする場合は、Telnetパスワードが必要です。ルータモジュールのパスワードを設定するには、次の一連のコマンドを使用します。

Router> enable

Router# configure terminal

!--- Enter the global configuration mode.

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)# enable password cisco

!--- Set enable password.

Router(config)# line vty 0 4

Router(config-line)# login

Router(config-line)# password cisco

!--- Set Telnet password.

Router(config-line)# end

Router#

05:22:40: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router#

9. 2つのVLANインターフェイスを作成し、それらのVLANインターフェイスにIPアドレスを割り当て、モジュールでルーティングを有効にします。

注：この手順は、VLAN間ルーティングを設定する上で重要です。

注：ルータモジュールでは、VLANインターフェイスは仮想インターフェイスですが、物理インターフェイスとして設定されています。

特権EXECモードから次のコマンドセットを発行します。

Router# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

!--- Configure interface VLAN 1 and assign it an IP address. !--- An interface VLAN 1 is configured for management purposes only !--- so that you can establish a Telnet session or ping the switch !--- from the workstation.

Router(config)# interface vlan 1

Router(config-if)# no shutdown

Router(config-if)# ip address 172.16.80.79 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 10 and assign it an IP address.

Router(config)# interface vlan 10

Router(config-if)# no shutdown

Router(config-if)# ip address 10.10.10.1 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 20 and assign it an IP address.

Router(config)# interface vlan 20

Router(config-if)# ip address 10.10.11.1 255.255.255.0

Router(config-if)# no shutdown

Router(config)# ip routing

!--- Enable routing protocol on the module. !--- The following two commands are optional; !--- they are only used if you have multiple routers in your network. !--- Depending on your network, you may want to use a different routing protocol.

Router(config)# router rip

Router(config-router)# network 10.0.0.0

Router(config-router)# network 172.16.0.0

Router(config-router)# Ctrl-Z

Router#

07:05:17: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router# write memory

!--- Save the configuration.

Building configuration...

Router#

この時点で、「ネットワーク図」に従って、VLAN間の設定が完了します。

10. Router#プロンプトでexitコマンドを発行して、スーパバイザーエンジンモジュールに戻ります。

Router# exit

Cat5500> (enable

全般的な問題：VLANインターフェイスがdown/downと表示される

このセクションでは、Catalyst 5500/5000またはCatalyst 6500/6000シリーズルータモジュール(RSM、MSFC、RSFC)でVLANインターフェイスを設定しようとすると発生する一般的な問題について説明します。

ルータモジュール上の設定されたVLANインターフェイスの一部またはすべてをpingできないという報告があります。また、show interface vlan vlan#コマンドを発行しても、ステータスはup/upと表示されません。これらのインターフェイスにno shutdownが設定されていることを確認しています。up/upと表示されるVLANインターフェイスはVLAN 1だけです。

この状況では、VLANインターフェイスの一部またはすべてがup/upと表示されない場合、最初に確認する必要があるのは、対象のVLANのスイッチにアクティブなポートがないかどうかです。

特記事項：ルータモジュールのVLANインターフェイスは、スイッチ上のVLANに割り当てられたポートが1つ以上あり（ルータインターフェイス以外）、そのポートが接続されている場合にのみup/upになります。トランクとして設定されたポートも、このVLAN up/up要件を満たしています。この条件が満たされない場合、ルータインターフェイスは起動しません。

「ネットワーク図」セクションでは、ワークステーションをCatalyst 5500スイッチに接続しないように警告されています。この時点で、この一連のコマンドを発行すると、インターフェイスVLAN 1だけがup/upと表示され、他の2つがdownであることがわかります。

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual down                  down

Vlan20                     10.10.11.1      YES manual down                  down

Router# show interface vlan 1

Vlan1 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 172.16.80.79/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 10

Vlan10 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:25:48, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:01:04, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 2 packets/sec

5 minute output rate 1000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router#

インターフェイスVLAN 1はup/upですが、スイッチ上ではVLAN 1に接続ポートとアクティブポートはありません。VLAN 1にはアクティブポート/インターフェイス、スーパーバイザモジュールにはsc0インターフェイスがあります。デフォルトでは、sc0インターフェイスはVLAN 1のメンバです。スイッチ（スーパーバイザエンジン）で次のコマンドを発行して、sc0インターフェイス設定を確認します。

Cat5500> (enable) show interface

sl0: flags=51 <UP ,POINTOPOINT ,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63 <UP ,BROADCAST ,RUNNING>

vlan 1 inet 172.16.80.40 netmask 255.255.255.0 broadcast 172.16.80.255

Cat5500> (enable)

この時点で、ポート4/1のworkstation1とポート4/13のworkstation2を接続します。スイッチでshow port 4/1コマンドとshow port 4/13コマンドを発行して、これらのポートのステータスがconnectedであることを確認します。

Cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  10         normal a-half  a-10 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable) show port 4/13

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/13                    connected  20         normal a-full a-100 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable)

次に、ルータモジュールにログインし、インターフェイスVLAN 10とVLAN 20のステータスを確認します。これらはup/upと表示されるはずです。ルータモジュールのVLANインターフェイスのステータスを確認するには、次のコマンドセットを発行します。

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

User Access Verification

Password:

!--- Enter the password; in this case, it is cisco.

Router> enable

Password:

!--- Enter the password; in this case, it is cisco.

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual up                    up

Vlan20                     10.10.11.1      YES manual up                    up

Router# show interface vlan 10

Vlan10 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:46:14, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:56, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 5 packets/sec

5 minute output rate 2000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router# exit

Cat5500> (enable)

設定を検証する

この文書で説明される設定を確認するために、いくつかの PING テストを実行できます。このセクションでは、workstation2を使用してworkstation1、スイッチのsc0インターフェイス、およびルータモジュールのVLANインターフェイスにpingを実行します。

注：ワークステーションのデフォルトゲートウェイがルータモジュールのVLANインターフェイスになるように設定されていることを確認してください。ネットワーク図によると、workstation1のデフォルトゲートウェイは10.10.10.1に、workstation2の場合は10.10.11.1に設定されます。

テスト 1：Workstation2からWorkstation1にpingします

C:\> ipconfig

!--- This command is used to check the IP configuration on the !--- Windows 2000 workstation. Use the appropriate commands on the workstations !--- that you use.

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Connection-specific DNS Suffix  . :

IP Address. . . . . . . . . . . . : 10.10.11.254

Subnet Mask . . . . . . . . . . . : 255.255.255.0

Default Gateway . . . . . . . . . : 10.10.11.1

C:\> ping 10.10.10.254

Pinging 10.10.10.254 with 32 bytes of data:

Reply from 10.10.10.254: bytes=32 time=10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Ping statistics for 10.10.10.254:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  10ms, Average =  2ms

テスト 2：Workstation2からスーパーバイザエンジンのsc0インターフェイスにpingします。

C:\> ping 172.16.80.40

Pinging 172.16.80.40 with 32 bytes of data:

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Ping statistics for 172.16.80.40:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

テスト 3：ワークステーション2からルータモジュールのインターフェイスVLAN 1にpingを実行します。

C:\> ping 172.16.80.79

Pinging 172.16.80.79 with 32 bytes of data:

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Ping statistics for 172.16.80.79:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

テスト 4：Workstation2からルータモジュールのインターフェイスVLAN 10にpingを実行します

C:\> ping 10.10.10.1

Pinging 10.10.10.1 with 32 bytes of data:

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.10.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

テスト 5：Workstation2からルータモジュールのインターフェイスVLAN 20にpingを実行します

C:\> ping 10.10.11.1

Pinging 10.10.11.1 with 32 bytes of data:

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.11.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

付録

スーパーバイザエンジンモジュールの設定

Cat5500> (enable) show config

This command shows non-default configurations only.

Use show config all to show both default and non-default configurations.

...

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Tue Apr 10 2001, 09:09:54

!

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$lx7B$WipkVnLnbYIfrBSqD2SN9.

set enablepass $2$6/eK$I3lDb2nnP7Fc9JKF3XwRW/

set prompt Cat5500>

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  Cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

set vtp domain cisco

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 10,20

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

set interface sc0 1 172.16.80.40/255.255.255.0 172.16.80.255

set ip route 0.0.0.0/0.0.0.0         172.16.80.79

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 : 4-port 10/100BaseTX Supervisor

!

#module 3 : 3-port 1000BaseX Ethernet

!

#module 4 : 24-port 10/100BaseTX Ethernet

set vlan 10   4/1-12

set vlan 20   4/13-20

set spantree portfast    4/1-20 enable

!

#module 5 : 2-port MM OC-3 Dual-Phy ATM

!

#module 6 empty

!

#module 7 : 1-port Route Switch

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 : 48-port 10BaseT Ethernet

!

#module 12 : 2-port MM MIC FDDI

!

#module 13 empty

end

Cat5500> (enable)

RSMの設定

Router# show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

enable password cisco

!

ip subnet-zero

ip cef

!

!

process-max-time 200

!

interface Vlan1

ip address 172.16.80.79 255.255.255.0

no ip directed-broadcast

!

interface Vlan10

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

interface Vlan20

ip address 10.10.11.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

Router#

関連情報

- Catalyst 4000 ファミリ用ルータ モジュール（WS-X4232-L3）の設定と概要

- PortFast と他のコマンドを使用したワークステーションの接続始動遅延の修復

- LAN 製品に関するサポート ページ

- LAN スイッチングに関するサポート ページ

- テクニカルサポート - Cisco Systems