内容

概要

ポストプロセス手順

概要

このドキュメントでは、オペレーティングシステム(OS)を別のセットアップツール(YaST)でアップグレードするか、または新しいイーサネットネットワークインターフェイスコントローラ(ENIC)/ファブリックネットワークをインストールする場合に、SAP High Performance Analytic Appliance(HANA)ノードを再起動する前にPreboot Execution Environment(PXE)ブート設定をををを変更するする方法についてを説明しますインターフェイスコントローラ(FNIC)ドライバ。パッチ/ドライバのインストールは、各SAP HANAノードで行う必要があります。

ポストプロセス手順

YaSTでOSを更新する場合は、次の手順を使用します。

1. YaSTまたはENIC/FNICドライバのインストールでSUSEのアップデートを実行します。
注：SP2からSP3へのアップグレード方法の詳細については、「SLES/SLED 11 SP3 へのアップグレード方法」のMicro Focusドキュメントを参照してください。

2. SAP HANAノードの1つから更新されたカーネルをmgmtsrvにコピーします。

server01 # cd /boot

# Prepare initrd for the PXEBoot and include the nfs packages/drivers

mkinitrd -f nfs -D eth0

# Copy the initrd and vmlinuz to the tftpboot directory of the mgmtsrv

server01 # scp initrd-3.0.101-0.31-default mgmtsrv01:/tftpboot

server01 # scp vmlinuz-3.0.101-0.31-default mgmtsrv01:/tftpboot

3. mgmtsrv01にログオンし、PXEブート用の初期RAMディスク(initrd)を準備し、ネットワークファイルシステム(NFS)パッケージ/ドライバを含めます。

# Check the new run_all.sh script is available (attached to this article as well)

ll /tftboot/tmp/run_all.sh

# Change the initrd

cd /tftpboot

mkdir /tftpboot/tmp2

cp initrd-3.0.101-0.31-default  /tftpboot/tmp2/

cd /tftpboot/tmp2

mv initrd-3.0.101-0.31-default  initrd-3.0.101-0.31-default.gz

gunzip initrd-3.0.101-0.31-default.gz

# Now the initrd is in a CPIO format

cpio -idumf < initrd-3.0.101-0.31-default

rm initrd-3.0.101-0.31-default

# Udev files needs to be empty to avoid issues running different nodes with

that initrd

# During the kernel creation it captures all MAC addresses and align them to

the addresses in the UDEV rules file, so we empty the file before.

# During restart every server will create its own persistent-net rules again.

echo > etc/udev/rules.d/70-persistent-net.rules

# Copy the run_all script generic to all versions of the kernel

cp ../tmp/run_all.sh .

find . | cpio --create --format="newc" > ../initrd-3.0.101-0.31-default

cd ..

gzip -9 initrd-3.0.101-0.31-default

mv initrd-3.0.101-0.31-default.gz initrd-3.0.101-0.31-default

# For simplification …

ln -s ./initrd-3.0.101-0.31-default initrd_3.0.101

ln -s ./vmlinuz-3.0.101-0.31-default kernel_3.0.101

# Now prepare the PXE boot configuration

cd /tftpboot/pxelinux.cfg

vi <hostname|IP address>

# If there is no link available you can check with the command "gethostip

server01"

copy the current SLES11_SP2 (or Default) section and adapt the values for default

and LABEL as well as the kernel and initrd links

# SAP UCS PXE Boot Definition

display ../boot.msg

default SLES11_SP3_101

prompt 1

timeout 10

LABEL SLES11_SP3_101

KERNEL kernel_3.0.101

APPEND initrd=initrd_3.0.101 rw rootdev=192.168.xx.xx:/FS_OS_01/SLES11SP3

intel_idle.max_cstate=0 processor.max_cstate=0 ip=dhcp

OS_VOLUME="FS_OS_01/SLES4SAPSP3" MAC="00:25:B5:12:00:FF" OS_SERVER="192.168.127.11"

4. 最初のSAP HANAノードで、SAP HANAが<SID>ADMとして停止していることを確認します。

(sapcontrol -nr <InstanceNumber> -function StopSystem)

5. すべてのSAP HANAノードを新しいカーネルにリブートします。

このソリューションに追加のSAP HANAノードがある場合は、そのノード上のYaSTを介してアップデートを実行し、その後で正しいカーネル/initrdをポイントするようにPXEブート設定を調整する必要があります。