目次

質問：

質問：

彼らに DNS 失敗がある場合のサーチ エンジンにユーザをリダイレクトする方法か。

Vladimir Sousa およびジェフ リッチモンドによって貢献される、Cisco TAC エンジニア。

環境： WSA

症状： ユーザ入力が非存在 URL （解決可能なない DNS）デフォルトで WSA 次と同じような通知ページを戻す時:

This Page Cannot Be Displayed

------------------------------------------------------------------------------------------------

The host name resolution (DNS lookup) for this host name ( temple.edu ) has failed. The Internet

address may be misspelled or obsolete, the host ( temple.edu ) may be temporarily unavailable,

or the DNS server may be unresponsive.

Please check the spelling of the Internet address entered. If it is correct, try this request later.

If you have questions, or if this condition persists, please contact your corporate network

administrator and provide the codes shown below.

------------------------------------------------------------------------------------------------

Notification codes: (1, DNS_FAIL, temple.edu)

何人かの顧客はサーチ エンジンにユーザを代りにリダイレクトできることを望みます。 これは実行されたものがに Windows ライブ検索によって類似したです。

に類似した何かへデフォルト通知ページを変更することによって非存在 URL に Users 要求をリダイレクトすることは可能性のあるです:

Windows 検索はに関しては住んでいます:

<html>

<head>

<title> Notification Page </title>

<meta name="author" content="Cisco systems">

<meta name="description" content="Notification Page">

<meta http-equiv="refresh" content="0;url=http://search.live.com/results.aspx?FORM=DNSAS&q=%H">

</head>

<body>

<p>

</body>

</html>

Google に関しては:

<html>

<head>

<title> Notification Page </title>

<meta name="author" content="Cisco systems">

<meta name="description" content="Notification Page">

<meta http-equiv="refresh" content="0;url=http://www.google.com/search?hl=en&q=%H">

</head>

<body>

<p>

</body>

</html>

DNS_FAIL HTML ファイルを修正するためのステップは下記のようにあります:

1. WSA への FTP - ftp admin@<WSA_host_name_or_IP>

2. 設定/eun/en に参照して下さい。

3. ERR_DNS_FAIL ページをダウンロードして編集するか、新しい ERR_DNS_FAIL ページを作成します。

4. 設定/eun/en フォルダに編集された ERR_DNS_FAIL ページをアップロードして下さい。

5. アップロードの後で、CLIインターフェイスにログインして下さい。 それから「使用カスタム EUN ページ」オプションを使用して下さい; このオプションが既に有効に なって いる場合、アップロードされたカスタマイズされた EUN ページを有効にさせるのに「リフレッシュ EUN ページ」コマンドを使用して下さい。 このオプションは CLI コマンドの下で利用できます --> advancedproxyconfig > EUN。