内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

Cisco VPN 3000 Client 2.5.x または Cisco VPN Client 3.0

Windows 2000 または Win 98 PPTP クライアントのセットアップ

確認

トラブルシュート

トラブルシューティングのためのコマンド

Microsoft関連の問題

関連情報

概要

この設定例では、Cisco Secure PIX Firewall をトンネル エンドポイントとして、次の 4 種類のクライアントが接続とトラフィックの暗号化を行っています。

- Microsoft Windows 95/98/NTでCisco Secure VPN Client 1.1を実行するユーザ

- Windows 95/98/NTでCisco Secure VPN 3000 Client 2.5.xを実行するユーザ

- ネイティブWindows 98/2000/XP Point-to-Point Tunneling Protocol(PPTP)クライアントを実行するユーザ

- Windows 95/98/NT/2000/XPでCisco VPN Client 3.x/4.xを実行するユーザ

この例では、IPsecとPPTPの単一プールが設定されています。ただし、プールを分離することもできます。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- PIX ソフトウェア リリース 6.1.1

- Cisco Secure VPN Client 1.1

- Cisco VPN 3000 Client バージョン 2.5

- Cisco VPN Client 3.x and 4.x

- Microsoft Windows 2000 および Windows 98 クライアント

注：これはPIXソフトウェアリリース6.3.3でテストされましたが、リリース5.2.xおよび5.3.1で動作する必要があります。Cisco VPN Client 3.xおよび4.xにはPIXソフトウェアリリース6.xが必要です。(Cisco VPN 3000 Client 2.5のサポートは、PIXソフトウェアリリース5.2.xで追加されました。この設定は、Cisco VPN 3000 Clientの部分を除き、PIXソフトウェアリリース5.1.xでも動作します)。 IPSec と PPTP/Microsoft Point-to-Point Encryption（MPPE）は、最初に個別に動作するよう準備する必要があります。別々に作業しないと、一緒に作業できません。

注：PIX 7.0では、inspect rpcコマンドを使用してRPCパケットを処理します。inspect sunrpcコマンドは、Sun RPCプロトコルのアプリケーション検査を有効または無効にします。Sun RPCサービスは、システム上の任意のポートで実行できます。クライアントがサーバ上のRPCサービスにアクセスしようとすると、特定のサービスが実行されているポートを見つける必要があります。これは、既知のポート番号111でportmapperプロセスを照会することによって行われます。クライアントがサービスのRPCプログラム番号を送信し、ポート番号を取得します。この時点から、クライアントプログラムはその新しいポートにRPCクエリを送信します。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細については、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を参照してください。一部ツールについては、ゲスト登録のお客様にはアクセスできない場合がありますことをご了承ください。

ネットワーク図

このドキュメントでは、次の図で示されるネットワーク設定を使用しています。

設定

このドキュメントでは次の設定を使用します。

- Cisco Secure PIX Firewall

- Cisco Secure VPN Client 1.1

Cisco Secure PIX Firewall

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 100full

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname goss-515A

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

names

access-list 101 permit ip 10.99.99.0 255.255.255.0 192.168.1.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.152 255.255.255.0

ip address inside 10.99.99.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

ip local pool bigpool 192.168.1.1-192.168.1.254

pdm history enable

arp timeout 14400

nat (inside) 0 access-list 101

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

sysopt connection permit-pptp

crypto ipsec transform-set myset esp-des esp-md5-hmac

crypto dynamic-map dynmap 10 set transform-set myset

crypto map mymap 10 ipsec-isakmp dynamic dynmap

crypto map mymap client configuration address initiate

crypto map mymap client configuration address respond

crypto map mymap interface outside

isakmp enable outside

!--- Cisco Secure_VPNClient_key.

isakmp key ******** address 0.0.0.0 netmask 0.0.0.0

isakmp identity address

isakmp client configuration address-pool local bigpool outside

!--- ISAKMP Policy for Cisco VPN Client 2.5 or !--- Cisco Secure VPN Client 1.1.

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

!--- The 1.1 and 2.5 VPN Clients use Diffie-Hellman (D-H) !--- group 1 policy (PIX default).

isakmp policy 10 group 1

isakmp policy 10 lifetime 86400

!--- ISAKMP Policy for VPN Client 3.0 and 4.0.

isakmp policy 20 authentication pre-share

isakmp policy 20 encryption des

isakmp policy 20 hash md5

!--- The 3.0/4.0 VPN Clients use D-H group 2 policy !--- and PIX 6.0 code.

isakmp policy 20 group 2

isakmp policy 20 lifetime 86400

vpngroup vpn3000-all address-pool bigpool

vpngroup vpn3000-all dns-server 10.99.99.99

vpngroup vpn3000-all wins-server 10.99.99.99

vpngroup vpn3000-all default-domain password

vpngroup vpn3000-all idle-time 1800

!--- VPN 3000 group_name and group_password.

vpngroup vpn3000-all password ********

telnet timeout 5

ssh timeout 5

console timeout 0

vpdn group 1 accept dialin pptp

vpdn group 1 ppp authentication pap

vpdn group 1 ppp authentication chap

vpdn group 1 ppp authentication mschap

vpdn group 1 ppp encryption mppe auto

vpdn group 1 client configuration address local bigpool

vpdn group 1 pptp echo 60

vpdn group 1 client authentication local

!--- PPTP username and password.

vpdn username cisco password *********

vpdn enable outside

terminal width 80

Cryptochecksum:d41d8cd98f00b204e9800998ecf8427e

: end

goss-515A#

Cisco Secure VPN Client 1.1

1- TACconn

My Identity

Connection security: Secure

Remote Party Identity and addressing

ID Type: IP subnet

10.99.99.0

255.255.255.0

Port all Protocol all

Connect using secure tunnel

ID Type: IP address

172.18.124.152

Pre-shared Key=CiscoSecure_VPNClient_key

Authentication (Phase 1)

Proposal 1

Authentication method: pre-shared key

Encryp Alg: DES

Hash Alg: MD5

SA life: Unspecified

Key Group: DH 1

Key exchange (Phase 2)

Proposal 1

Encapsulation ESP

Encrypt Alg: DES

Hash Alg: MD5

Encap: tunnel

SA life: Unspecified

no AH

2- Other Connections

Connection security: Non-secure

Local Network Interface

Name: Any

IP Addr: Any

Port: All

Cisco VPN 3000 Client 2.5.x または Cisco VPN Client 3.0

Options > Properties > Authentication の順に選択します。次のように、group_name および group_password が PIX 上の group_name および group_password と照合されます。

vpngroup vpn3000-all password ********

Host-name = 172.18.124.152

Windows 2000 または Win 98 PPTP クライアントのセットアップ

PPTPクライアントを作成するベンダーに連絡できます。この設定方法の詳細は、『PPTPを使用するためのCisco Secure PIX Firewallの設定方法』を参照してください。

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

注：debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

PIX IPSec のデバッグ

- debug crypto ipsec：フェーズ 2 の IPsec ネゴシエーションを表示します。

- debug crypto isakmp - フェーズ 1 の Internet Security Association and Key Management Protocol（ISAKMP）ネゴシエーションを表示します。

- debug crypto engine - 暗号化されたトラフィックを表示します。

PIX PPTP のデバッグ

- debug ppp io:PPTP PPP仮想インターフェイスのパケット情報を表示します。

- debug ppp error:PPTP PPP仮想インターフェイスエラーメッセージを表示します。

- debug vpdn error:PPTPプロトコルエラーメッセージを表示します。

- debug vpdn packets:PPTPトラフィックに関するPPTPパケット情報を表示します。

- debug vpdn events:PPTPトンネルイベントの変更情報を表示します。

- debug ppp uauth:PPTP PPP仮想インターフェイスAAAユーザ認証デバッグメッセージを表示します。

Microsoft関連の問題

- ログオフ後に RAS 接続をアクティブなまま維持する方法 —Windows のリモート アクセス サービス（RAS）クライアントからログオフすると、RAS 接続が自動的に切断されます。ログオフ後も接続を維持するには、RASクライアントのレジストリでKeepRasConnectionsキーを有効にします。

- キャッシュされたクレデンシャルを使用してログインするときにユーザに警告が通知されない – 症状 – Windowsベースのワークステーションまたはメンバサーバからドメインにログオンしようとすると、ドメインコントローラが見つからない場合、エラーメッセージは表示されません。その代わり、キャッシュされたクレデンシャルを使用してローカル コンピュータにログインされます。

- ドメインの検証および他の名前解決に関する問題のために LMHOSTS ファイルを作成する方法 —TCP/IP ネットワークで名前解決に関する問題が発生し、NetBIOS 名の解決のために LMHOSTS ファイルを使用することが必要な場合があります。この記事では、名前解決とドメインの検証に役立つLmhostsファイルを適切に作成する方法について説明します。

関連情報

- IPsecネゴシエーション/IKEプロトコルに関するサポートページ

- PIX コマンド リファレンス

- Cisco PIX 500 シリーズ セキュリティ アプライアンス サポート ページ

- Requests for Comments (RFCs)

- IPsec ネットワーク セキュリティの設定

- Internet Key Exchange セキュリティ プロトコルの設定

- テクニカル サポートとドキュメント – Cisco Systems