内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

ESMTP TLS の設定

確認

トラブルシュート

関連情報

概要

この設定例では、外部ネットワークにあるメールサーバにアクセスするための適応型セキュリティアプライアンス(ASA)の設定方法について説明します。

バージョン 8.3 以降の Cisco Adaptive Security Appliance（ASA）での ASDM を使用した同等な設定の詳細について『ASA 8.3.x 以降：DMZ でのメール（SMTP）サーバ アクセスの設定例」には、ASA セキュリティ アプライアンスをセットアップして、DMZ ネットワークにあるメール/SMTP サーバにアクセスする方法についての詳細が記載されています。

バージョン 8.3 以降の Cisco Adaptive Security Appliance（ASA）での ASDM を使用した同等な設定の詳細について『ASA 8.3.x 以降：内部ネットワーク上のメール(SMTP)サーバアクセスの設定例」を参照してください。

Cisco PIX セキュリティ アプライアンス ソフトウェア バージョン 7.x または Cisco 適応型セキュリティ アプライアンス（ASA）での GRE トンネルを必要としない Open Shortest Path First による VPN/IPsec の設定方法の詳細は、「PIX/ASA 7.x 以降：外部ネットワークでのメール(SMTP)サーバアクセスの設定例」を参照してください。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- バージョン8.3以降が稼働するCisco適応型セキュリティアプライアンス(ASA)

- Cisco 1841 ルータ（Cisco IOS® Software Release 12.4(20)T 搭載）

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細については、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このセクションで使用されるコマンドの詳細については、Cisco CLI Analyzerを使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

注：この設定で使用されるIPアドレッシング方式は、インターネット上で正式にルーティング可能なものではありません。これらは RFC 1918 で使用されているアドレスであり、ラボ環境で使用されたものです。

この例で使用しているネットワーク構成の ASA には、内部ネットワーク（192.168.1.0/30）と外部ネットワーク（209.64.3.0/30）があります。 IPアドレスが209.64.3.6のメールサーバは、外部ネットワーク内にあります。内部インターフェイス(Ethernet0)から外部インターフェイス(Ethernet 1)に渡される192.168.2.xネットワークからのトラフィックが、209.64.3.129 ～ 209.64.3.253の範囲のアドレスに変換されるようにNAT文を設定します。最後に使用可能なアドレス(209.64.3.254)は、Port Address Translation(PAT)用に予約されます。

設定

このドキュメントでは、次の構成を使用します。

- ASA

- ルータ A

- ルータ B

ASA

ASA#show run

: Saved

:

ASA Version 8.3(1)

!

hostname ASA

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

names

!

interface Ethernet0

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet1

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet2

shutdown

no nameif

no security-level

no ip address

!

!--- Configure the inside interface.

?

interface Ethernet3

nameif inside

security-level 100

ip address 192.168.1.1 255.255.255.252

!

!--- Configure the outside interface.

interface Ethernet4

nameif outside

security-level 0

ip address 209.64.3.1 255.255.255.252

!

interface Ethernet5

shutdown

no nameif

no security-level

no ip address

!

passwd 2KFQnbNIdI.2KYOU encrypted

boot system disk0:/asa831-k8.bin

ftp mode passive

pager lines 24

mtu inside 1500

mtu outside 1500

no failover

no asdm history enable

arp timeout 14400

!--- This command states that any traffic !--- from the 192.168.2.x network that passes from the inside interface (Ethernet0) !--- to the outside interface (Ethernet 1) translates into an address !--- in the range of 209.64.3.129 through 209.64.3.253 and contains a subnet !--- mask of 255.255.255.128.

object network obj-209.64.3.129_209.64.3.253

range 209.64.3.129-209.64.3.253

!--- This command reserves the last available address (209.64.3.254) for !--- for Port Address Translation (PAT). In the previous statement, !--- each address inside that requests a connection uses one !--- of the addresses specified. If all of these addresses are in use, !--- this statement provides a failsafe to allow additional inside stations !--- to establish connections.

object network obj-209.64.3.254

host 209.64.3.254

!--- This command indicates that all addresses in the 192.168.2.x range !--- that pass from the inside (Ethernet0) to a corresponding global !--- designation are done with NAT. !--- As outbound traffic is permitted by default on the ASA, no !--- static commands are needed.

object-group network nat-pat-group

network-object object obj-209.64.3.129_209.64.3.253

network-object object obj-209.64.3.254

object network obj-192.168.2.0

subnet 192.168.2.0 255.255.255.0

nat (inside,outside) dynamic nat-pat-group

!--- Creates a static route for the 192.168.2.x network with 192.168.1.2. !--- The ASA forwards packets with these addresses to the router !--- at 192.168.1.2.

route inside 192.168.2.0 255.255.255.0 192.168.1.2 1

!--- Sets the default route for the ASA Firewall at 209.64.3.2.

route outside 0.0.0.0 0.0.0.0 209.64.3.2 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00

timeout mgcp-pat 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

telnet timeout 5

ssh timeout 5

console timeout 0

!

class-map inspection_default

match default-inspection-traffic

!

!

!--- SMTP/ESMTP is inspected since "inspect esmtp" is included in the map.

policy-map global_policy

class inspection_default

inspect dns maximum-length 512

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

!

service-policy global_policy global

Cryptochecksum:8a63de5ae2643c541a397c2de7901041

: end

ルータ A

Current configuration:

!

version 12.4

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the inside Ethernet interface.

ip address 192.168.2.1 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the ASA-facing interface.

ip address 192.168.1.2 255.255.255.252

no ip directed-broadcast

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

shutdown

!

ip classless

!--- This route instructs the inside router to forward all !--- non-local packets to the ASA.

ip route 0.0.0.0 0.0.0.0 192.168.1.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

ルータ B

Current configuration:

!

version 12.4

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the ASA-facing Ethernet interface.

ip address 209.64.3.2 255.255.255.252

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the server-facing Ethernet interface.

ip address 209.64.3.5 255.255.255.252

no ip directed-broadcast

!

interface Serial0

!--- Assigns an IP address to the Internet-facing interface.

ip address 209.64.3.9 255.255.255.252

no ip directed-broadcast

no ip mroute-cache

!

interface Serial1

no ip address

no ip directed-broadcast

!

ip classless

!--- All non-local packets are to be sent out serial 0. In this case, !--- the IP address on the other end of the serial interface is not known, !--- or you can specify it here.

ip route 0.0.0.0 0.0.0.0 serial 0

!

!--- This statement is required to direct traffic destined to the !--- 209.64.3.128 network (the ASA global pool) to the ASA to be translated !--- back to the inside addresses.

ip route 209.64.3.128 255.255.255.128 209.64.3.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

ESMTP TLS の設定

注：Transport Layer Security(TLS)暗号化を電子メール通信に使用する場合、ASAのESMTPインスペクション機能（デフォルトで有効）はパケットをドロップします。TLS が有効な電子メールを許可するには、次の出力のように ESMTP インスペクション機能を無効にします。詳細は、Cisco Bug ID CSCtn08326を参照してください。

ciscoasa(config)#

policy-map global_policy

ciscoasa(config-pmap)#class inspection_default

ciscoasa(config-pmap-c)#no inspect esmtp

ciscoasa(config-pmap-c)#exit

ciscoasa(config-pmap)#exit

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

Cisco CLI Analyzerでは、特定のshowコマンドをサポートします。CLIアナライザを使用して、showコマンド出力の分析を表示します。

logging buffered 7 コマンドで、メッセージが ASA コンソールに転送されます。メール サーバへの接続に問題がある場合は、コンソール デバッグ メッセージを調べて、送信側と受信側のステーションの IP アドレスを見つけ、問題を特定します。

関連情報

- Cisco ASA 5500-Xシリーズファイアウォール

- Requests for Comments (RFCs)

- テクニカル サポートとドキュメント – Cisco Systems