内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

レイヤ 2 のアクセス ポートまたはトランク ポートを使用した IPSec の設定

ルーテッド ポートを使用した IPSec の設定

確認

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、IPSec VPN サービス モジュール（W）を搭載した Cisco Catalyst 6500 シリーズ スイッチと Cisco PIX Firewall の間に IPSec LAN-to-LAN トンネルを作成する方法について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- IPSec VPNサービスモジュールを搭載したCatalyst 6000シリーズスーパーバイザエンジン用Cisco IOS®ソフトウェアリリース12.2(14)SY2

- Cisco PIX Firewallソフトウェアバージョン6.3(3)

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景説明

Catalyst 6500 VPN サービス モジュールには 2 つの Gigabit Ethernet（GE; ギガビット イーサネット）ポートがありますが、外部から見えるコネクタはありません。これらのポートは、設定の目的にのみアドレスを指定できます。ポート 1 は、常に内部ポートです。このポートでは、内部ネットワークと送受信されるすべてのトラフィックが処理されます。2 つ目のポート（ポート 2）では、WAN や外部ネットワークと送受信されるすべてのトラフィックが処理されます。2 つのポートは常に 802.1Q トランキング モードに設定されます。VPN サービス モジュールでは、パケット フローに Bump In The Wire （BITW）と呼ばれる技術が使用されます。

パケットは、1 対の VLAN、1 つのレイヤ 3 内部 VLAN、および 1 つのレイヤ 2 外部 VLAN によって処理されます。内部から外部へ伝送されるパケットは、Encoded Address Recognition Logic（EARL）という方式で内部 VLAN へルーティングされます。VPN サービス モジュールでは、パケットを暗号化した後、対応する外部 VLAN が使用されます。復号化プロセスでは、外部から内部へ入るパケットは外部 VLAN を使用して VPN サービス モジュールにブリッジされます。VPN サービス モジュールがパケットを復号化し、VLAN を対応する内部 VLAN にマッピングすると、パケットは EARL によって適切な LAN ポートへルーティングされます。レイヤ3内部VLANとレイヤ2外部VLANは、crypto connect vlanコマンドで結合されます。Catalyst 6500 シリーズ スイッチには、3 種類のポートがあります。

- ルーテッドポート：デフォルトでは、すべてのイーサネットポートはCisco IOSのルーテッドポートです。これらのポートには、隠し VLAN が 1 つ関連付けられています。

- アクセスポート：これらのポートには、外部またはVLANトランクプロトコル(VTP)VLANが関連付けられています。定義済み VLAN には、複数のポートを関連付けることができます。

- トランクポート：これらのポートは多数の外部VLANまたはVTP VLANを伝送し、すべてのパケットが802.1Qヘッダーでカプセル化されます。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

レイヤ 2 のアクセス ポートまたはトランク ポートを使用した IPSec の設定

外部物理インターフェイスにレイヤ 2 のアクセス ポートまたはトランク ポートを使用して IPSec を設定するには、次のステップを実行します。

1. 内部 VLAN を VPN サービス モジュールの内部ポートに追加します。

VPNサービスモジュールがスロット4にあるとします。内部VLANとしてVLAN 100を、外部VLANとしてVLAN 209を使用します。VPN サービス モジュールの GE ポートを次のように設定します。

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. VLAN 100インターフェイスと、トンネルが終端するインターフェイス(この場合はinterface Vlan 209)を追加します。

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface Vlan209

no ip address

crypto connect vlan 100

3. 外部物理ポートをアクセスポートまたはトランクポートとして設定します(この場合は、FastEthernet 2/48を次に示します)。

!--- This is the configuration that uses an access port.

interface FastEthernet2/48

no ip address

switchport

switchport access vlan 209

switchport mode access

!--- This is the configuration that uses a trunk port.

interface FastEthernet2/48

no ip address switchport

switchport trunk encapsulation dot1q

switchport mode trunk

4. バイパスNATを作成します。次のネットワーク間で NAT を免除するには、no nat ステートメントにこれらのエントリを追加します。

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

5. 暗号設定と、暗号化するトラフィックを定義するための Access Control List（ACL; アクセス コントロール リスト）を作成します。

1. 次のように、内部ネットワーク192.168.5.0/24からリモートネットワーク192.168.6.0/24へのトラフィックを定義するクリプトACL（この場合はACL 100 – 対象トラフィック）を作成します。

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. 次のように、Internet Security Association and Key Management Protocol（ISAKMP）ポリシーのプロポーザルを定義します。

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. 事前共有キーを使用し、定義するために、（この例では）次のコマンドを発行します。

crypto isakmp key cisco address 10.66.79.73

4. 次のように、IPSec プロポーザルを定義します。

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. 次のように、crypto map 文を作成します。

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

6. 次のように、暗号マップを VLAN 100 インターフェイスに適用します。

interface vlan100

crypto map cisco

次の設定が使用されます。

- Catalyst 6500

- PIX ファイアウォール

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that Internet Key Exchange (IKE) !--- is used to establish the IPSec !--- security associations (SAs) to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the outside Layer 2 port that allows !--- VLAN 209 traffic to enter.

interface FastEthernet2/48

no ip address

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the Interface VLAN (IVLAN).

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The Port VLAN (PVLAN) configuration is handled transparently by !--- the VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port !--- of the VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

interface Vlan209

no ip address

crypto connect vlan 100

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration. access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX ファイアウォール

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

ルーテッド ポートを使用した IPSec の設定

外部物理インターフェイスにレイヤ 3 ルーテッド ポートを使用して IPSec を設定するには、次のステップを実行します。

1. 内部 VLAN を VPN サービス モジュールの内部ポートに追加します。

VPNサービスモジュールがスロット4にあるとします。内部VLANとしてVLAN 100を、外部VLANとしてVLAN 209を使用します。VPN サービス モジュールの GE ポートを次のように設定します。

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. VLAN 100 インターフェイスと、トンネルが終端するインターフェイス（次に示すように、この場合は FastEthernet2/48）を追加します。

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface FastEthernet2/48

no ip address

crypto connect vlan 100

3. バイパスNATを作成します。次のネットワーク間で NAT を免除するには、no nat ステートメントにこれらのエントリを追加します。

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

4. 暗号設定と、暗号化するトラフィックを定義するための ACL を作成します。

1. 次のように、内部ネットワーク 192.168.5.0/24 からリモート ネットワーク 192.168.6.0/24 へ送信されるトラフィックを定義する ACL（この場合は ACL 100）を作成します。

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. 次のように、ISAKMP ポリシー のプロポーザルを定義します。

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. 事前共有キーを使用し、定義するために、（この例では）次のコマンドを発行します。

crypto isakmp key cisco address 10.66.79.73

4. 次のように、IPSec プロポーザルを定義します。

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. 次のように、crypto map 文を作成します。

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

5. 次のように、暗号マップを VLAN 100 インターフェイスに適用します。

interface vlan100

crypto map cisco

次の設定が使用されます。

- Catalyst 6500

- PIX ファイアウォール

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that IKE is used to establish the !--- IPSec SAs to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the secure port that is configured in routed port mode. !--- This routed port mode does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path. This is the Layer 2 port VLAN on which the !--- outside port of the VPN service module also belongs.

!

interface FastEthernet2/48

no ip address

crypto connect vlan 100

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the IVLAN.

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The PVLAN configuration is handled transparently by the !--- VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port of the !--- VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.6.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration.

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX ファイアウォール

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

確認

このセクションでは、設定が正常に動作しているかどうかを確認するための情報について説明しています。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

- show crypto ipsec sa：現在のIPSec SAで使用されている設定を表示します。

- show crypto isakmp sa：ピアにある現在のすべての IKE SA を表示します。

- show crypto vlan：暗号設定に関連付けられたVLANを表示します。

- show crypto eli:VPNサービスモジュールの統計情報を表示します。

IPSec の確認とトラブルシューティングの詳細については、『IP Security のトラブルシューティング - debug コマンドの理解と使用』を参照してください。

トラブルシュート

このセクションでは、設定のトラブルシューティングを行うための情報について説明します。

トラブルシューティングのためのコマンド

注：debugコマンドを発行する前に、『debugコマンドの重要な情報』を参照してください。

- debug crypto ipsec：フェーズ 2 の IPSec ネゴシエーションを表示します。

- debug crypto isakmp：フェーズ 1 の ISAKMP ネゴシエーションを表示します。

- debug crypto engine：暗号化されたトラフィックを表示します。

- clear crypto isakmp：フェーズ 1 に関連する SA をクリアします。

- clear crypto isakmp：フェーズ 2 に関連する SA をクリアします。

IPSec の確認とトラブルシューティングの詳細については、『IP Security のトラブルシューティング - debug コマンドの理解と使用』を参照してください。

関連情報

- IPSec に関するサポート ページ

- IPSec ネットワーク セキュリティの設定

- Internet Key Exchange セキュリティ プロトコルの設定

- テクニカルサポート - Cisco Systems