内容

概要

前提条件

要件

使用するコンポーネント

表記法

トポロジ

ノードを追加

Final Configuration

ML 1

ML 2

ML 3

関連情報

概要

このドキュメントでは、Cisco ONS 15454 の ML カードの復元パケット リング（RPR）に 1 つ以上のノードを追加するための手順について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Cisco ONS 15454

- Cisco ONS 15454 ML シリーズ イーサネット カード

- Cisco IOS(R) ソフトウェア

- ブリッジングと IP ルーティング

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- ONSリリース4.1.3が稼働するCisco ONS 15454。

- Cisco IOSソフトウェアリリース12.1(19)EO1が稼働するML(ONS 4.1.3リリースの一部としてバンドル)。

注：このドキュメントの設定は、RPRを介したブリッジングのソリューションに基づいています。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

トポロジ

Resilient Packet Ring(RPR)は、バーストデータトラフィック用に最適化された標準ベースのレイヤ2アーキテクチャです。RPRは、イーサネットスパニングツリーやSONET/SDH保護方式を必要としないリングベースのアーキテクチャを実現し、イーサネットおよびIPサービスのリングコンバージェンス時間を50ミリ秒未満で提供します。RPRは、帯域幅を予約することなく、SONETタイプの保護を提供します。RPRは、SONET保護の有無にかかわらず動作できます。MLカードのRPRでは、Packet over SONET(POS)インターフェイスとイーサネットインターフェイスの間に別のポイントが導入されます。共有パケットリング(SPR)インターフェイスは、このリンクを提供する仮想インターフェイスです。RPRでは、両方のPOSポートがSPRインターフェイスのメンバとして機能します。SPRインターフェイスは自動的に保護ラッピングを実行します。

図1は、SONET上のONS 15454ノードのPOSポート間の2つの回線を示しています。各MLカードの単一のSPR1インターフェイスがRPR機能を処理します。

図1:2ノードの復元力のあるパケットリング

3番目のノードを追加すると、SONET上の15454ノードのPOSポートの間に3つの回線が存在します(図2を参照)。

図2 - 3ノード復元力パケットリング

ノードを追加

RPRにさらに1つのノードを追加するには、次の手順を実行します。

1. 新しいノードを追加するスパンに面しているML1のPOSポートをシャットダウンします。ポートはPOS 1です。

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. 新しいノードを追加するスパンに面しているML2のPOSポートをシャットダウンします。ポートはPOS 0です。

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. RPRの隣接ノード間の同期転送信号(STS)パスを削除します(図3を参照し)。

図3 - STSパスの削除

4. イーサネット接続がRPR（テストセット、および顧客のルーティングテーブル）に存在するかどうかを確認します。

5. 新しいノードを追加します(ノードがターゲットID(TID)、IPアドレス、SONETポートIS、SONET Data Communications Channel(SDCC)が有効などにプロビジョニング済みであるとします)。

6. ML設定を新しいノード(ML 3)にアップロードします。 「最終設定」セクションのML 3の設定を参照してください。

7. ML2のPOS 0からML3のPOS 1へ、およびML3のPOS 0からML1のPOS 1へ、2つの新しい回線を構築します(図4を参照)。 監査ログをチェックして、回線がADMIN_ISまたはADMIN_OOSに入っているかどうかを確認します。

図4 - 2つの新しい回線の追加

8. 新しいノードに面するML 1のPOS 1ポートでno shutdownを実行します。

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. 新しいノードに面するML 2のPOS 0ポートでno shutdownを実行します。

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. イーサネット接続がRPR（お客様のテストセットとルーティングテーブル）に存在するかどうかを確認します

11. ノードの挿入後、少なくとも1時間イーサネットトラフィックを監視します。

Final Configuration

このセクションでは、ML 1、ML 2、およびML3の最終設定について説明します。

ML 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

ML 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

ML 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

関連情報

- 復元力のあるパケットリングの設定

- テクニカル サポートとドキュメント – Cisco Systems